041910520500419114052100047570505215004958060522000516706052250053940605230005601050523500582708052400060640705245006275060525000647515052550073331205260007873100526500830607052700085780805275008884070528000918808052850095151005290010026100529501045311053000110761505305011945150530601281309053100133180805315013696080532001401517053250148480505330015058060533501531505053400155171205345016130080535001642908053550167450805360017049100536501742506053700176320505375017790200538001877305053850189840405390019135040539501928604054000194190505405019549050541001969809054150200831005420020545050542502074906054300209140805435021177050544002130838054450232211905450024000130545502449206054600247000505465024917100547002537507054750257030805480025967060548502624910054900266570405495026819040550002699226055050282233505506029858080551003026304055150304120405520030564050552503075104055300308930405535031048050554003121406055450314600505550031665080555503197309055600322930905565032625080557003295709055750333080805580033656080558503398808055900343200805595034649090560003510911056100356220705620035950090563003638913056400369930905650037369080566003766010056700380771205690038652220569503962323057000408000805705041091080571004143411057200419391305730042453100574004281107057500431011005760043469110577004391110057800443221405790045054110579204549606057950456610605796045890150579704650625057980477591104300048278430432505022310043500506350704370050974130437505156513044000521651304450052759120445505338707044600537881404462054478210400005556515040010562601404002056974150400305773518040050585360504010058707130401505933910040200599161404030060588120403506114508040400614470704045061778060405006209309040550626210704060062979080407006342726040800648500704082065126160420006590485030000700172603001071578090300207174109030030719030903004072092090300507226809030060724420903007072628090300807279909030090729640903010073135090301107329709030120734750903013073655090301407382509030150740020903016074172090301707434509030180745160903019074691090302007486009030210750290903022075201090302307537409030240755590903025075742090302607592109030270760945303030078445550303508129842030400828212205100083973760100008603855013000882781501350089188730135509219487013600962107501400099520161150009990928115011016491411502101889151150310263255044751049034204500106608160452510728515045501081170904575108683120460010934711046251099580704650110276150467511114907046801114931204685111988060469011224807046951125620904700113028060470511331413047101139230704715114279530442511689109117501172388611751121848081175212210710117531224880711754122703091175512292109117561231391011757123429221175812414110117601245013905000126130161100012660263110011296252211002130855091100313130228110041323380711007132621141110013346013111011341241511102135089121110313568213110081365121211009136778151101013749007120001377776912001141548121200214224633120031440862612004145651261210014721596121101522321412120152659721213015554674121351584162712140159884251214116134409110111615650611012161823441110416381707111051640971411013164840251101416616167110151692332111016170034061101717023610110181706780711019171073091102017149305110211717230411022171881051102317203809110241724501111025172901101102617325705110271734870411028173664061102917386605110301740280711050174304191105117514325110521760920911053176409051105417658311110551771330211056177205111105717768307110581779582011059179002281106018045508110611806960911062181199141106318191594110641864000811065186645091106618696013110681877081702300188386390240019026238025001922974702525194176510255019609067025751990615002600200927750262520308099027002067767202725208552390275020986939027752112415402800213307740282521530173028502171787502875219301340290022052336031002218271009060222416630906122572854090622286186309063231514540906423439412031102348551503120235359210900023632522091002370863509101239093060910223937205091032395980709104239952060910524017208091062405720609107240846050910824107105097002412895409050243719300905524522012041002456755004800247433120481024807711048202486890404830248811140484024963403048502497240704860250073060487025031210049002508491404903251480190000025232900ADVANCED INFORMATION SCREEN

The advanced information screen contains all editable fields from the
fixed user area of the SSCB, TTRC, SAM and  SECURE codeplugs. 

NUMBER OF CHANNELS 

The NUMBER OF CHANNELS field indicates the number of operating channels
currently enabled in the codeplug, not including the Tuning Channel 
(Channel 0). All stations must have at least Channel 1 enabled. The
NUMBER OF CHANNELS field is non-editable. 

To INSERT or DELETE channels, go to the Channel Information Screen
(F4 on the CHANGE/VIEW CODEPLUG DATA MENU).
.P
Alarm Tone Frequency

The Alarm Tone Frequency field indicates the frequency of the alarm
tone beep. The frequency must be an integer number between 750 and
1600 Hz. Default value is 1200 Hz.
.P
Alarm Tone Duration

The Alarm Tone Duration field indicates the length of a station alarm 
tone. The duration must be an integer value between 0 and 495 milli-
seconds. Default value is 125 msec. 

.P
Alarm Tone Gap

The Alarm Tone Gap field indicates the amount of quiet time between
alarm tones during a given alarm. The tone gap must be an integer
value between 0 and 495 milliseconds.  Default value is 125 msec.

.P
Alarm Word Gap

The Alarm Word Gap field indicates the amount of quiet time between
consecutive alarms. The word gap must be an integer between 0 and
9998 milliseconds. The default is 2000 msec. 

.P
Auto Id Tone Frequency

The Auto ID Tone Frequency field indicates the frequency at which Auto
Id  callsigns  are transmitted. The frequency must be an integer 
value between 750 and 1600 Hz. Default value is 800 Hz.
.P
Auto Id Delay

The Auto Id Delay field indicates the delay period from after a station
dekeys until an Id Callsign is transmitted. The delay must be an integer
value between 0 and 495 seconds. Default value is 5 seconds. 



.P
Auto Id Interval

The Auto Id Interval field indicates the delay period between Id
Callsign transmissions. The delay must be an integer value between 0
and 495 minutes. The default is 15 minutes.  


.P
Auto Id Rate

The Auto ID Rate field indicates the transmission rate of an ID Callsign.
The rate must be an integer value between 5 and 40 words per minute.  
Default value is 20 minutes. 

.P
Channel Control  

The Channel Control field indicates which board drives the channel
number on the MUXbus. The three choices, STATION, REMOTE, EXTERNAL, are
selected via the arrow up and arrow down keys. STATION indicates that
the station control board drives channel number on the MUXbus.  STATION
is typically used in repeater application in which there is no dispatch
console. It is not compatible with trunking models. If this field is
set to STATION, the TTRC boards should not be present, and JU1 on the
station control board  should  be  in  its  alternate  position.
REMOTE indicates that the TTRC board drives channel  number on the
MUXbus, and EXTERNAL indicates Wildcard channel control(option C974).
The default value is REMOTE. 
NOTE: If no TTRC board is present REMOTE will not be a choice for the
   Channel Control field.
.P
Mode Control

The Mode Control field indicates which board drives the mode number
on the MUXbus. The three choices, STATION, REMOTE, EXTERNAL, are
selected via the arrow up and arrow down keys. STATION indicates that
the station control board drives mode number on the MUXbus.  REMOTE
indicates that the TTRC board drives mode number on the MUXbus, and
EXTERNAL indicates Wildcard  mode control.  The default value is
STATION.  

NOTE: If no TTRC board is present REMOTE will not be a choice for the 
   Mode Control field.
.P
Key Control

The Key Control field indicates which board controls the key number
for the station. The choices STATION and REMOTE are selected via the Up/
Down arrow keys. STATION indicates that the station control board controls
the key number. REMOTE indicates that the TTRC module controls the key
number. The default is REMOTE.

NOTE: This field is set to STATION and is non-editable if no TTRC board
   is present.
.P
Memory Station 

The Memory Station field indicates whether or not the channel, mode, and 
key return to their previous values upon reset or power-up. When DISABLED,
the channel,mode and key each revert to "1" after reset or power-up. The
default is ENABLED. 

.P
PA Turn On Delay 

The PA Turn On Delay field indicates the time to wait between antenna
relay switching and keying up the PA.  This delay time must be an
integer number between 0 and 495 msec. The default is 31 msec. 
WARNING!!! CHANGING THIS FIELD MAY SEVERELY AFFECT STATION OPERATION !!!


.P
Key Up Delay

The Key Up Delay field indicates the time to wait before checking for
errors while the PA attempts to reach full power. This delay time must
be an integer betweenn 0 and 495 msec. The default is 39 msec. 
WARNING!!! CHANGING THIS FIELD MAY SEVERELY AFFECT STATION OPERATION !!!

.P
Relay Idle Delay 

The Relay Idle Delay field indicates the delay time period between the
PA shutdown and switching to the antenna relay. The delay must be an
integer value between 0 and 495 milliseconds.  Default value is 31
milliseconds. 
WARNING!!! CHANGING THIS FIELD MAY SEVERELY AFFECT STATION OPERATION !!!

.P
Disable Source

The Disable Source field can have one of the three following fields:
DISABLE, UNSQUELCH or MUTE REQ. DISABLE allows the Receiver Activity 
to be enabled after a CT (connect tone) or PL is decoded/detected.
UNSQUELCH enables the Receiver Activity for the Disable Delay while 
searching for a PL code (conventional station). MUTE REQ enables the
Receiver Activity for the Disable Delay while searching for a CT 
(trunking station). The default value for Disable Source is MUTE REQ.

.P
Disable Delay

The Disable Delay field indicates the amount of time that the 
Disable Source is kept active. This delay must be an integer number
between 0 and 997 msec. The default is 703 msec.

NOTE: If Scanning Receiver is ENABLED, this field must be less than
the Priority Recheck Time. If the Priority Recheck Time is set to its
default of 300 msec, then the Disable Delay field should be set to 280
msec.  
.P
Rptr Gate Holdoff Delay 

The Rptr Gate Holdoff Delay field indicates the delay time period
between the transmitter(repeater) key-up and when the receiver audio is
gated to the modulator for Repeater PTTs (option C587). This option
is not compatible with trunking models or base station models. This
delay can be used to prevent repeating data. Note that the station
does key up during the delay time, but the audio is not gated to the
modulator (it is gated to the wireline as usual). The delay must be an
integer value between 0 and 9998 msec in 8 millisecond increments. Default
value is 0 milliseconds. 
.P
S-TAC Clear Rptr Delay

The S-TAC Clear Rptr Delay field indicates the delay between satisfying
the repeater qualifiers and a clear repeater PTT request. This delay
must be an integer number between 0 and 9998 msec. The default is 750 ms
for all Simulcast and Spectra-TAC stations, and 0 ms for all others. 

Version 5.48 or greater SSCB firmware allows the station to bypass the 
S-TAC Clear/Coded Rptr Delays if it has been determined that the 
comparator connected to the Line input of the station is not working
correctly. That is, as long as a Line or Tx Coded PTT occurs before the
S-TAC Clear/Coded Rptr Delay expires, the delay will remain at its set
value. Once a Repeater PTT occurs the delay will default to 0 ms
(immediate key up upon satisfying the repeater qualifiers) and remain
at 0 ms until a subsequent Line or Tx Coded PTT occurs.
.P
S-TAC Coded Rptr Delay

The S-TAC Coded Rptr Delay field indicates the delay between satisfying
the repeater qualifiers and a coded repeater PTT request. This delay
must be an integer number between 0 and 9998 msec. The default is 750 ms
for all Simulcast and Spectra-TAC stations, and 0 ms for all others.

Version 5.48 or greater SSCB firmware allows the station to bypass the 
S-TAC Clear/Coded Rptr Delays if it has been determined that the 
comparator connected to the Line input of the station is not working
correctly. That is, as long as a Line or Tx Coded PTT occurs before the
S-TAC Clear/Coded Rptr Delay expires, the delay will remain at its set
value. Once a Repeater PTT occurs the delay will default to 0 ms
(immediate key up upon satisfying the repeater qualifiers) and remain
at 0 ms until a subsequent Line or Tx Coded PTT occurs.
.P
Bypass S-TAC Rptr Delay

If the MSF firmware has determined that the wireline link with a S-TAC 
comparator has gone down, the Bypass S-TAC Rptr Delay field, when ENABLED,
allows the firmware to bypass the time delay windows that are set at the
Spectra-TAC Clear/Coded Repeater Delay fields.  This allows the MSF base
station to operate as a repeater with zero delay between the receiver
and the transmitter at the same base station.  The Bypass S-TAC Rptr
Delay field defaults to DISABLE.  
.P
S-TAC Mute Time

The S-TAC Mute Time field indicates the amount of time that the line
output of the station is to be muted when status tone generation begins
(during a dekey) and when the status tone generation ceases (on key
up). Values for this field can range from 0 to 10553 msec. The default
value is 20 msec for conventional stations, and 0 msec for trunked.

.P
S-TAC Tone Frequency

The S-TAC Tone Frequency field indicates the frequency at which a
Spectra-TAC tone is generated. Values for this field can range from
300 to 2500 Hz. The default value is 2175 Hz. This field should contain
the same frequency as the Guard Tone Frequency. The default value
is 2175 Hz.

.P
Status Tone

The Status Tone field indicates whether or not the TTRC generates the
status tone during receiver inactivity. Status Tone is a continuous
tone (usually 2175 Hz) generated on the wireline, usually in Spectra-TAC
and Simulcast stations. The default value is ENABLED. If either
Spectra-TAC or Simulcast Operation is ENABLED in the Station Model/
Options Screen, Status Tone, in most cases, MUST be ENABLED.

NOTE: This field will not have any affect in stations operating in
   Spectra-TAC or Simulcast systems if the TTRC firmware version
.P
   is less than 5.29. Version 5.29 and higher TTRC firmware allows
   the user to DISABLE Status Tone in Spectra-TAC and Simulcast 
   systems. Previous firmware automatically generated Status Tone
   when the station had Spectra-TAC or Simulcast ENABLED.


.P
MCS Timer Period 

The MCS Timer Period field indicates the amount of post-dekey time, in
8 millisecond increments. This period must be an integer between 0 and
495 msec. The default value is 0 msec. 
.P
MCS Update Time

The MCS Update Time field indicates how often the station updates the
EEPROM with respect to the Air Usage Time and the Hit Accumulator.
This time must be an integer between 60 and 1280 minutes. The 
default value is 60 minutes. 
.P
MCS Resolution Time

The MCS Resolution Time field indicates the resolution  of  air-time
accumulators.  This time must be an integer between 0 and 495 seconds.
The default value is 1 second. 
.P
Failsoft

The Failsoft field indicates whether or not the TTRC activates
failsoft. The default value is ENABLED, except for trunked, Simulcast
stations which have the Failsoft field DISABLED.

Failsoft is a mode of operation that allows limited communications in
trunked systems after a connection between the Central Controller and
the station has been disrupted. When a station is in Failsoft, it keys
up and in-cabinet repeats. During this time a sub-audible Failsoft 
"codeword" is transmitted along with a periodic Failsoft Tone (see
Failsoft Tone Duration, Interval, and Frequency fields). 
.P
Failsoft Tone Duration

The Failsoft Tone Duration field indicates the length of time a
failsoft tone is generated. Values for this field can range from 0 to
10553 msec. The default value is 280 msec.

NOTE: Failsoft Tone Duration is NON-EDITABLE if TTRC is version 5.00 or
   greater. 
.P
Failsoft Tone Interval

The Failsoft Tone Interval field indicates the length of quiet time
between each failsoft tone generation. Values for this field can range
from 0 to 10553 msec. The default value is 9700 msec. 

NOTE: Failsoft Tone Interval is NON-EDITABLE if TTRC is version 5.00 or
   greater. 
.P
Failsoft Tone Frequency

The Failsoft Tone Frequency field indicates the frequency at which a
failsoft tone is generated. Values for this field can range from 300
to 2000 Hz. The default value is 900 Hz. 

NOTE: Failsoft Tone Frequency is NON-EDITABLE if TTRC is version 5.00 or
   greater. 
.P
Trunking Tickle Source

The Trunking Tickle Source field determines whether the input to 
Trunking Tickle Source is from TX Data Line or Mute Line. If it comes
from the Mute Line, Trunking Tickle Source is MUTE, and if it comes
from the Tx Data Line (TDATA +/-), The Trunking Tickle Source is 
TX DATA.

The default value for Trunking Tickle Source is TX DATA.

.P
Failsoft Time Out Time

The Failsoft Time Out Time field indicates the length of time before
initiating a tickle. Values for this field can range from 0 to 5400 
sec. The default value is 1 sec. 

.P
Failsoft Line

The Failsoft Line field indicates whether or not the TTRC generates Guard
Tone on the line during failsoft. The default is DISABLED.

.P
Site Failsoft Mode

The Site Failsoft Mode field toggles between the Failsoft mode (FS),
Trunking and Failsoft mode (TR & FS) and Simulcast Site Failsoft mode
(SIMUL FS). The Site Failsoft Mode of operation is used for repeater
in-cabinet-repeat in a trunked voting system. When FS is chosen, the 
repeater mutes the audio lines to and from the comparator and in-cabinet
repeats when failsoft occurs and the site failsoft input on the system
connector is active. When TR & FS is selected, the station in-cabinet
repeats as described above in both failsoft and trunking modes. When
SIMUL FS is selected, the station is forced into Failsoft when the
site failsoft input is activated. It in-cabinet repeats as described 
.P
above. This selection is normally used for simulcast trunking systems
with manual or automatic Site Failsoft. 

Note: SIMUL FS is only available with version 5.00 or later TTRC 
    firmware.

The default for Site Failsoft Mode is FS. 

.P
Switch On LPTT

The Switch On LPTT field indicates whether or not the Tx Source, Line2 Tx Mix
and Line4 Tx Mix audio gates change state during a Line Push To Talk(LPTT).
The default value is DISABLED. 
.P
Line 2 TX Mix

The Line 2 TX Mix field indicates whether or not the TTRC allows
audio transmission out line 2. The default value is DISABLED. 
.P
Line 4 TX Mix

The Line 4 TX Mix field indicates whether or not the TTRC allows
audio transmission out line 4. The default value is DISABLED. 
.P
DC Decode

The DC Decode field indicates whether or not the TTRC activates DC
Remote decode. The default value is DISABLED. 
.P
TRC Decode

The TRC Decode field indicates whether or not the TTRC activates TRC
decode. The default value is ENABLED. 

.P
TRC Tone Mix

The TRC Tone Mix field determines whether the encoded TRC tones should
be routed to Line 2 or Line 4. The default is Line 2.

.P
Guard Tone Frequency

The Guard Tone Frequency field indicates the frequency at which a Guard
Tone is generated. Values for this field can be toggled to 2175, 2100, 
2325 or 2432 Hz. The default value is 2175 Hz. The Status Tone Frequency,
which is also editable from this screen, should be set to the same 
frequency. 

The default Guard Tone Frequency value is 2175 Hz.
.P
HLGT Duration

The HLGT Duration field indicates the length of time a High Level Guard
Tone is generated. This field can be toggled between 60 and 120 msec. 
The default value is 120 msec. 

NOTE: Changing the HLGT Duration field also affects the amount of time 
it takes the TTRC board to detect incoming HLGT. If the HLGT Duration
is set to 120 ms, it will take on average about 70 ms to detect. If it
is set to 60 ms, it will take about 40 ms. 
.P
TX Source

The TX Source field determines whether the input to TX Source is
from ALC audio or UN ALC audio. The default Tx Source value is 
ALC for conventional, and UN ALC for trunked stations.
.P
Un ALC Source

The Un ALC Source field determines whether the input to UN_ALC Source
is from LINE 1 or LINE 3.

The default Un ALC Source value is LINE 1.
.P
Wireline Activity Source

The Wireline Activity Source field determines if the input is from 
Line 1 or Line 3. Default is LINE 1 for both Conventional and 
Trunked Systems.

Option C-115, Console Priority Interface, requires this field to
be LINE 3.
.P
Mute TX Audio

When ENABLED, allows muting of TX audio when no activity is present
on the wireline. Default is DISABLED.

.P
Automatic Access is a trunking software option (C816). In the event
Trunking Central is non-operational, trunking subscriber units will 
scan conventional repeaters until an Automatic Access Repeater is found.
Automatic Access allows conventional repeaters to react to Automatic 
Access interrogations by trunking subscriber units. An interrogation
is a 300 msec DPL burst called the Decode Word. The station responds
to the interrogation with a 700 msec DPL burst called the ACK Word.
Once the trunking subscriber unit has decoded the acknowledge, it
uses the current station mode PL for voice conversations. An Out
of Range condition is generated when trunking subscriber units 
drive out of range of their home system. At this time the operator
can utilize the Automatic Access feature by pressing the Auto button
on the control head. This causes the radio to enter the Automatic
Access mode.
.P
NOTE : ONLY DPL codes are allowed for the Decode and ACK Words
    Decode Word 

The DECODE WORD defines the DPL code that the station will accept
to allow for automatic access. This field accepts all valid DPL 
codes and NO ACC. NO ACC means Automatic Access is not enabled
on this station. If the Decode Word is changed from NO ACC to a
valid DPL code the ACK Word is set to the same DPL code and the
ACK Time is set to 703 msec. 

(cont.)

.P
VALID DPL CODES:

023 025 026 031 032 043 047 051 053 054 065 071 072 073 074 114 
115 116 122 125 131 132 134 143 152 155 156 162 165 172 174 205
212 223 225 226 243 244 245 246 251 252 261 263 265 266 271 306
311 315 325 331 343 346 351 364 365 371 411 412 413 423 425 431 
432 445 446 452 455 464 465 466 503 506 516 521 525 532 546 552
564 565 606 612 624 627 631 632 645 652 654 662 664 703 712 723
725 726 731 732 734 743 754

Note: Automatic Access is only available on station control 
    firmware 4.00 or greater.
.P
ACK Word

The ACK Word is the DPL code that the station transmits after 
receiving and decoding a valid decode word. This field accepts
all valid DPL codes. It displays NO ACC if Automatic Access
is not enabled on this station.

Note: Automatic Access is only available on station control 
    firmware 4.00 or greater.
.P
VALID DPL CODES:

023 025 026 031 032 043 047 051 053 054 065 071 072 073 074 114 
115 116 122 125 131 132 134 143 152 155 156 162 165 172 174 205
212 223 225 226 243 244 245 246 251 252 261 263 265 266 271 306
311 315 325 331 343 346 351 364 365 371 411 412 413 423 425 431
432 445 446 452 455 464 465 466 503 506 516 521 525 532 546 552
564 565 606 612 624 627 631 632 645 652 654 662 664 703 712 723
725 726 731 732 734 743 754

.P
ACK Time 

The ACK Time defines the length of time that the station transmits
the ACK Word after receiving and decoding a valid DPL code. The 
range of this field is from 0 to 9998 msec. This field displays
NO ACC if Automatic Access is not enabled on this station.

When the Decode Word is changed from NO ACC to a valid DPL code,
the ACK Time field is set to 703 msec by default.

Note: Automatic Access is only available on station control 
    firmware 4.00 or greater.

.P
Mute Delay

The Mute Delay field indicates the minimum MUTE active time required to
activate arbitrated MUTE. Values for this field can range from 0 to 
10553 msec. The default value is 100 msec. 

.P
Standby Failure Counter

The Standby Failure Counter field indicates the number of failures
before the station becomes the main station. Values for this field can
range from 1 to 255. The default value is 1.
.P
Bypass RX Notch

The Bypass RX Notch field indicates whether or not the TTRC bypasses
the receiver notch filter. The receiver notch filter is used to filter
out audio around 2175 Hz (Status Tone). The filter is located on the
TTRC board on the Line Audio path from the Station Control Board.
The default value is DISABLED (not bypassed). 

In most cases, whenever the Status Tone field is ENABLED, the Bypass
RX Notch field should be DISABLED.
.P
MRTI Enable/Disable

The MRTI Enable/Disable field indicates if the station is equipped with
a phone patch interface, option C719. Option C719 is not compatible
with trunking models. It allows the MRTI phone patch to be accessed
via its connector (J802) on the station control board.  The default
value is DISABLED. 
.P
MUXBus Seize

When ENABLED, the MUXBus Seize field allows the station to use address
10, bit 0 on the MUXBus as a seize/release input. This input comes from
a GCC interface wildcard in a trunking data system. The default for this
field is DISABLED. 


.P
Power Lvl Chk in Batt Rvrt

This feature is used in trunking or trunking capable (C765) stations.
When DISABLED, power level check is NOT performed if station goes into
battery revert. When ENABLED, power level check is performed regardless.
The default value is ENABLED.
.P
Audio Diagnostics

This field indicates whether or not audio diagnostics will be performed.
If ENABLED, audio diagnostics are performed upon station reset. If 
DISABLED they are not performed. Audio Diagnostics generate 
multi-pitched audible tones that are sent down the wireline. 

NOTE: The Audio Diagnostics field is only editable if a version 4.00 
   or greater SSCB codeplug is loaded.

.P
External SSCB EEPROM

The External SSCB EEPROM field indicates if the station is equipped with an
external serial EEPROM. The default value is DISABLED. 
.P
External TTRC EEPROM

The External TTRC EEPROM field indicates if the TTRC control board
is equipped with an external serial EEPROM. The default value is DISABLED. 
.P
External PTT

The External PTT field indicates which bit on the MUXbus will be activated
when the External PTT input to the station is activated. The External PTT 
input is pin 12 of the System Connector (J2 on the Junction Box), and is
active low.

To set a MUXbus bit in response to the External PTT Input, enter MUX, 
followed by A (indicating the address), followed by the MUXbus address (0-F),
followed by B (indicating the bit), followed by the bit number to set (0-3).

For example, MUXA2B3 sets bit 3 of MUXbus address 2 (TX PL DS) when the 
External PTT Input is active, and clears it when it is inactive. Also, the 
.P
External PTT (cont.)

following inputs are valid: LINE (sets bit 2 of MUXbus address 2), TRNK 
(sets the Trunking PTT bit on the High Speed ring), and NULL (sets nothing).

Only one command may be entered via the RSS field. Some SP stations may use
more than one command, in order to set multiple bits on the MUXbus in 
response to the External PTT Input. When reading a codeplug that contains 
more than one command, the External PTT field will show MULTPLE and will 
be non-editable.

The default for this field is TRNK for trunking stations, and LINE for all 
others.
.P
Spare Output

The Spare Output field indicates which bit on the MUXbus or High Speed Ring 
(HSR) will be used to activate the Spare Output on the stations's Junction 
Box. The Spare Output is pin 9 of the System Connector (J2 on the Junction 
Box), and is active low.

To activate the Spare Output in response to a MUXbus bit being active, enter
MUX, followed by A (indicating the address), followed by the MUXbus address
(0-F, where A through F represent 10 through 15 on the DMP), followed by B
(indicating the bit), followed by the bit number to read (0-3).

For example, MUXA2B3 activates the Spare Output when bit 3 of MUXbus address
2 (TX PL DS) is active, and clears the Spare Output when it is inactive.
.P
Spare Output (cont.)

To activate the Spare Output in response to a High Speed Ring (HSR) bit 
being active, enter HSR, followed by A (indicating the address), followed by
the HSR address (0-4), followed by B (indicating the bit), followed by the 
bit number to read (0-7).

For example, HSRA0B5 activates the Spare Output when bit 5 of HSR address 0
(TSTAT) is active, and clears the Spare Output when it is inactive.

Also, NULL is a valid input, and it leaves the Spare Output always inactive.

Only one command may be entered via the RSS field. Some SP stations may use
more than one command, in order to set the Spare Output when a combination 
.P
Spare Output (cont.)

of MUXbus and/or HSR bits are active. When reading a codeplug that contains
more than one command, the Spare Output field will show MULTPLE and will be 
non-editable.

The default for this field is NULL.
.P
Spare Output Pin Level

The Spare Output Pin Level field indicates the "active" polarity level of 
the spare output signal sent to the Junction Box connector at J2 pin 9.
This signal can also be tapped at the TTRC board at J2900 pin 9.  The
active polarity can be toggled either active HIGH or LOW by means of the 
UP/DOWN arrow keys.  The Spare Output Pin Level field defaults to active
LOW.
.P
Clear Receiver

The Clear Receiver field indicates whether or not an 87 msec beep is
enabled when receiving clear. The default is DISABLED. 
.P
Clear Transmit 

The Clear Transmit field indicates whether or not an 87 msec beep is
enabled when transmitting clear. The default is ENABLED. 
.P
Cross Mode Receiver 

The Cross Mode Receiver field indicates whether or not an 87 msec beep
is enabled when receiving clear and tx wireline mode is coded. Default 
is ENABLED. 
.P
Erase 

The Erase field indicates whether or not a continuous tone is enabled
when the key reset line is active. Default is ENABLED. 
.P
Rx Fail

The Rx Fail field enables/disables modulated tone if current key has
failed and station is receiving a coded signal. Default is ENABLED. 
.P
Tx Fail

The Tx Fail field enables/disables modulated tone if current key has
failed and user is attempting to transmit a coded signal.  Default is
ENABLED.
.P
Proper Code

The Proper Code field indicates whether or not Proper Code Detect is
enabled in an Encode/Decode station. Proper Code Detect must be active
before gating received audio to the wireline (option C304). Default is 
DISABLED. 
.P
Rx Code on Line

The Rx Code on Line allows received code to be routed to the wirelines 
when the field is ENABLED. This field is DISABLED with option C415.
The default for this field is ENABLED.
.P
Beep Delay

The Beep Delay field indicates the length of time to unmute a 750 Hz
tone. The time must be an integer number between 0 and 9998 msec.
Default value is 87 msec. 

         NOTE: CHANGES ARE NOT RECOMMENDED !!!
WARNING!!! CHANGING THIS FIELD MAY SEVERELY AFFECT STATION OPERATION !!! 
.P
Extended Buffer Delay

The Extended Buffer Delay field indicates the length of the extended
buffer. The delay must be an integer between 0 and 9998 msec. The
default value is 80 msec.

         NOTE: CHANGES ARE NOT RECOMMENDED !!!
WARNING!!! CHANGING THIS FIELD MAY SEVERELY AFFECT STATION OPERATION !!! 

.P
Fail Test Delay 

The Fail Test Delay field indicates the length of time to wait for
hybrid failure indication. The delay must be an integer between 0 and
9998 msec. The default value is 25 msec.
  
         NOTE: CHANGES ARE NOT RECOMMENDED !
WARNING!!! CHANGING THIS FIELD MAY SEVERELY AFFECT STATION OPERATION !!! 

.P
Max Code Detect DT Delay

The Max Code Detect DT Delay field indicates the maximum time to
achieve a code detect.  The delay must be an integer between 0 and
9998 msec. The default value is 80 msec.
 
         NOTE: CHANGES ARE NOT RECOMMENDED !
WARNING!!! CHANGING THIS FIELD MAY SEVERELY AFFECT STATION OPERATION !!! 
.P
Rx Code Detect DOD 

The Rx Code Detect DOD field indicates the delay while waiting for the
Rx_Code_Detect to re-activate.  The delay must be an integer value
between 0 and 2720 msec. The default value is 320 msec.

         NOTE: CHANGES ARE NOT RECOMMENDED !!!
WARNING!!! CHANGING THIS FIELD MAY SEVERELY AFFECT STATION OPERATION !!! 

.P
Tx Code Detect DOD

The Tx Code Detect DOD field indicates the delay while waiting for the
Tx_Code_Detect to re-activate.  The delay must be an integer value
between 0 and 2720 msec. The default value is 320 msec.

         NOTE: CHANGES ARE NOT RECOMMENDED !!!
WARNING!!! CHANGING THIS FIELD MAY SEVERELY AFFECT STATION OPERATION !!! 
.P
Rx DC End of Message Delay

The Rx DC EOM field indicates the length of time to generate EOM for
receiver DC glitch. The time must be an integer between 0 and 170 msec.
The default value is 40 msec.

         NOTE: CHANGES ARE NOT RECOMMENDED !!!
WARNING!!! CHANGING THIS FIELD MAY SEVERELY AFFECT STATION OPERATION !!!
.P
Tx DC End of Message Delay

The Tx DC EOM field indicates the length of time to generate EOM for
wireline DC glitch. The time must be an integer between 0 and 170 msec.
The default value is 40 msec.

         NOTE: CHANGES ARE NOT RECOMMENDED !!!
WARNING!!! CHANGING THIS FIELD MAY SEVERELY AFFECT STATION OPERATION !!!
.P
Takeover EOM Delay

The Takeover EOM Delay field indicates the length of time to generate
EOM coded takeover. The delay must be an integer between 0 and 9998 msec.
The default value is 80 msec. 

         NOTE: CHANGES ARE NOT RECOMMENDED !!!
WARNING!!! CHANGING THIS FIELD MAY SEVERELY AFFECT STATION OPERATION !!! 
.P
SAM Decoder Input

The SAM Decoder Input field indicates if LINE or RECEIVER 2 is the 
second input choice for the Tone Input & Binary Input field on the 
SAM Mode screen. The first choice is RECEIVER 1. This is necessary 
since both LINE and RECEIVER 2 cannot be used on the same SAM board.
If this field is changed then any SAM Mode Tone Input or Binary Input 
fields that used LINE or RECEIVER 2 will also be updated to reflect 
the new value.
.P
Non-Priority Scan Delay

If the SSCB codeplug is less than 5.00, this field displays NO SCAN and
is NON-EDITABLE. Scanning is only available in stations equipped with
version 5.00 or greater SSCB firmware.

This field indicates the amount of time that the scan waits after losing
non-priority channel activity before resuming the scan. If channel act-
ivity resumes before the timer expires, the timer will reset. The valid
range is from 0 to 9998 msec. The default value is 2999 msec by default.

.P
Priority Scan Delay

This field indicates the amount of time that the scan waits after losing 
priority channel activity before resuming the scan. The valid range is
from 0 to 9998 msec. The field is NON-EDITABLE and set to NO SCAN if the
SSCB codeplug version is less than 5.00, and is set to 2999 msec by 
default.
.P
Scan Sample Time
          
If the SSCB codeplug is less than 5.00, this field displays NO SCAN and
is NON-EDITABLE. Scanning is only available in stations equipped with
version 5.00 or greater SSCB firmware.

This field indicates the length of time that a channel is checked for 
activity. The valid range is from 0 to 9998 msec. The default for a non-
secure station is 30 msec. The default for a secure station is 90 msec.
.P
Priority Recheck Time

If the SSCB codeplug is less than 5.00, this field displays NO SCAN and
is NON-EDITABLE. Scanning is only available in stations equipped with
version 5.00 or greater SSCB firmware.

This field indicates the interval for which a priority channel is checked
while a non-priority channel is active. The valid range for this field is
0 to 9998 msec. The default is 301 msec.

NOTE: The Priority Recheck Time must be greater than the Disable Delay.
If the Priority Recheck Time is set to its default of 300 msec, then the
Disable Delay field should be set to 280 msec.
.P
Rx Qualify Time

If the SSCB codeplug is less than 5.00, this field displays NO SCAN and
is NON-EDITABLE. Scanning is only available in stations equipped with
version 5.00 or greater SSCB firmware.

This field indicates the time allowed for PL or code detect after a
carrier is detected. The valid range for this field is 0 to 9998 msec.
The default is 348 msec.
.P
Failsoft Carrier Squelch 

The Failsoft Carrier Squelch field indicates whether or not the station is
forced to go Carrier Squelch during failsoft operation. The default
is DISABLED.

NOTE: Failsoft Carrier Squelch only available on Station Control Firmware 
   5.00 or greater.
.P
Gate Tx Always

The Gate Tx Always field allows line audio to always be gated to the 
modulator when ENABLED. This feature is usually used in trunked systems
that do not contain a CIU (Console Interface Unit). It is ENABLED 
with option C415 (Omit Status Tone with Transparent Station). The default 
is DISABLED. 

NOTE: Gate Tx Always is only available on Station Control Firmware 
   5.00 or greater.
.P
RSTAT Mode

The RSTAT Mode field can be toggled between NORMAL and DUAL CT.
NORMAL indicates that RSTAT will go active upon receiver unsquelch. 
DUAL CT (Dual Connect Tone) indicates that RSTAT will go active upon
connect tone detect. Dual Connect Tone is used in trunked systems that
contain more than one connect tone. The default is NORMAL.

NOTE: RSTAT Mode is only available on Station Control Firmware 5.00 
      or greater.The RSTAT Mode field is DISABLED, but reads as NORMAL
      in RSS if the Station Control Firmware is not 5.00 or greater.
    
.P
Rx Loopback Frequency

If an RF Loopback test is desired, the Rx and Tx Loopback Frequency
fields must contain the appropriate frequencies. If the Rx Loopback
Frequency field contains NO SAM and is non-editable, the required 
version 2.00 or greater SAM firmware is not present. If the field 
contains DISABLED and is non-editable, the required version 5.00 or
greater SSCB firmware is not present. 

.P
Rx Loopback Frequency (cont.) 

The Rx Loopback Frequency is entered in MHz. When an entered frequency 
is out of the specified range, an error occurs. Frequency ranges are:

  VHF_Range_1  132-158 MHz     UHF_Range_1  403-435 MHz
  VHF_Range_2  146-174 MHz     UHF_Range_2  435-475 MHz
  800 MHz (Rx)  806-825 MHz and  800 MHz (Tx)  851-870 MHz
  896 MHz (Rx)  896-902 MHz and  896 MHz (Tx)  935-941 MHz  

The Rx Loopback Frequency must be set to one half channel below the 
Channel 1 Rx Frequency and MUST NOT be a multiple of 4.8 MHz.

.P
Tx Loopback Frequency 

If an RF Loopback test is desired, the Rx and Tx Loopback Frequency
fields must contain the appropriate frequencies. If the Tx Loopback
Frequency field contains NO SAM and is non-editable, the required 
version 2.00 or greater SAM firmware is not present. If the field 
contains DISABLED and is non-editable, the required version 5.00 or
greater SSCB firmware is not present. 

.P
The Tx Loopback Frequency is entered in MHz. When an entered frequency 
is out of the specified range, an error occurs. Frequency ranges are:
  VHF_Range_1  132-158 MHz     UHF_Range_1  403-435 MHz
  VHF_Range_2  146-174 MHz     UHF_Range_2  435-475 MHz
  800 MHz (Rx)  806-825 MHz and  800 MHz (Tx)  851-870 MHz
  896 MHz (Rx)  896-902 MHz and  896 MHz (Tx)  935-941 MHz 
                             
The Tx Loopback Frequency must be set as follows for:
  800 MHz -- Tx Loopback Freq=Rx Loopback Freq+43.200 MHz.
  UHF (5 MHz Tx to Rx spacing)--Tx Loopback Freq=Rx Loopback Freq+4.8 MHz.
  Others  -- Tx Loopback Freq = Rx Loopback Freq. 

NOTE: This version of the field programmer does not calculate Loopback
   Frequencies automatically.
.P
EOM Time

The EOM Time field contains the time, in milliseconds, to keep the station 
keyed and generate an EOM signal after a coded PTT goes away. The default
is 193 msec.

NOTE: The EOM Time field is set to 000 msec and is non-editable in SSCB
   firmware versions below 5.00.
.P
TSTAT on MUXbus

The TSTAT on MUXbus field indicates whether or not the RWC5 on the 
MUXbus will indicate a TSTAT failure. TSTAT on MUXbus is ENABLED if
the firmware version is greater than 5.00, and DISABLED for versions
below 5.00. When ENABLED, RWC5 will indicate a TSTAT failure, should
one occur. This field is non-editable.

.P
Fwd & Refl on MUXbus

The Fwd & Refl (Forward and Reflected) on MUXbus field controls whether
RWC7 and RWC6 will indicate forward and reflected power alarms (respectively)
on the MUXbus. If ENABLED alarms will be indicated on the MUXbus. A watt
meter element must be present in the station in order for this feature to
function properly. The default is DISABLED. 

NOTE: The Fwd & Refl on MUXbus field is set to DISABLED and is non-editable
   if the SSCB firmware version is below 5.00. 

.P
LPTT Delay

The LPTT (Line Push-To-Talk) Delay field defines the length of time the
station will wait for a Tx Code detect before keying the station after a
wireline key command has been issued. This is used to prevent a secure 
station from keying in the clear mode when code follows the TRC keyup 
sequence. The range for this field is 0 to 9998 milliseconds. The default
is 0.

NOTE: The LPTT Delay field is set to DISABLED and is non-editable
   if the TTRC firmware version is below 5.00. 


.P
Holdoff Delay with PL        

When the Holdoff Delay with PL field is ENABLED, the station transmits PL/DPL
during the Holdoff Delay. When DISABLED, no PL/DPL is transmitted during the
delay. The default is ENABLED.

NOTE: The Holdoff Delay with PL field is set to ENABLED and is non-editable
   if the SSCB firmware version is below 5.00. 


.P
FT Mute Time 

The FT (Function Tone) Mute Time is the amount of time that TX audio is muted
after a TRC key command. This is used to prevent guard tone or function tone
from being transmitted over the air. The range for this field is 0 to 9998
milliseconds. The default is 30.

.P
Diversity Equipped 


When ENABLED the Diversity Equipped field indicates that an RLC board is
present and diagnostics will be performed for two receivers. When DISABLED
diagnostics will only be performed for one receiver. The default is DISABLED.

NOTE: If the SAM codeplug version is less than 2.00, this field displays
   NO SAM and is non-editable.

.P
GCC-480 Equipped 
         
When ENABLED, SAM is factory programmed to operate with a GCC-480, 
General Communications Controller. If a GCC-480 is present in the
station, special non-editable I/O functions are found in the SAM
Action Table Conditions screen. When DISABLED, SAM will not operate
properly with a GCC-480. 

NOTE: If the SAM codeplug version is less than 2.00, this field displays
   NO SAM and is non-editable.

.P
Gate Data Always
          
When ENABLED the Gate Data Always field indicates that the SAM board will
always gate transmit data to the station's modulator. When DISABLED the SAM 
board will only gate transmit data to the station's modulator when Data PTT 
is active. The default is ENABLED.

NOTE: If the SAM codeplug version is less than 2.00, this field displays
   NO SAM and is non-editable.

.P
MDC Pretime Bit Sync

When ENABLED the MDC Pretime Bit Sync field indicates that during
the pretime of an encoded MDC message from SAM, the MDC bit sync pattern 
will be repeatedly transmitted. This bit sync transmission is in addition 
to the bit sync which is sent at the beginning of the MDC message, as part 
of that message, and is intended to cover the time which is needed for the
transmitter to come to full power. When DISABLED no bit sync will be sent 
during the encode pretime. However, bit sync will be sent at the beginning
of the MDC message, as part of that message. The default is DISABLED.

NOTE: If the SAM codeplug version is less than 2.00, this field displays
   NO SAM and is non-editable.

.P
Inactivity Delay   

The valid range is from 0 to 357913 minutes (approximately 247 days). A 
value of 0 in the Inactivity Delay field indicates an infinite delay. 
This delay determines the amount of time that a receiver can be inactive 
before SAM performs a loopback test to verify that the receiver has not 
failed.

NOTE: If the SAM codeplug version is less than 2.00, this field displays
   NO SAM and is non-editable.
 
.P
RF Couple @ T=R Stations

When ENABLED, the receiver will stay unmutted at T=R stations,
allowing transmitted data to be received and sent out on
line 2.

.P
LLGT Dropout Time

The LLGT dropout time defines the time that the station must lose 
detection of low-level guard tone before it de-keys. Values for 
this field can range from 0 to 9998 msec. The default is 150 msec.

.P
Full Rx Inhibit

The Full Rx Inhibit field determines where Receiver Wireline is muted
when MUXBus RX_INH is active. The default is DISABLED.

When Full Rx Inhibit is DISABLED, the MUXBus RX_INH bit mutes 
Receiver Audio to the Receiver Wireline, but Status Tone, encoded
tones, and alarms are NOT muted. 

When Full Rx Inhibit is ENABLED, the MUXBus RX_INH bit mutes ALL
audio to the Receiver Wireline.

NOTE: The Full Rx Inhibit feature is only present in TTRC firmware
   version 5.00 or greater. If the TTRC version is less than
   5.00 the Full Rx Inhibit field is DISABLED and non-editable.
.P
TSTAT DOD

This field will only be used by the station if the TTRC firmware is
version R5.29 or greater. The TSTAT DOD field is NON-EDITABLE if
the TTRC version is less than 5.00.

The TSTAT DOD (Drop-Out-Delay) determines the amount of time that
the TSTAT signal on the Trunking Connector (Pin 10 on J2901) remains 
active after TX Data (Transmitter Data) ceases (for any reason). This 
gives the Central Controller an indication that the station is not
operating properly, so that it will not assign the particular station.

.P
For example: The TSTAT DOD field is set to 300 msec. If for some
reason TX Data ceased, but resumed within 300 msec (before the TSTAT
DOD time expired), no change in the TSTAT signal would occur (assuming
that forward/reflected power levels are OK). The TSTAT signal would 
still be ACTIVE. If TX Data ceases for more than 300 msec (ie. a line
became disconnected), the TSTAT signal would become INACTIVE, and 
remain there until TX Data resumes.

The TSTAT on the Trunking Connector is not the same as the TSTAT on
the MUXBus (Address 13, D0). It is possible for the TSTAT signal to
fail even though the MUXBus is NOT indicating a problem.

The default for the TSTAT DOD is 300 milliseconds.
.P
RX DETECT SENSITIVITY

Allows the user to control the sensitivity of receiver code 
detection. The default setting is HIGH. HIGH allows a greater
sensitivity than MEDIUM, but also creates a greater chance of false code
detects, or "falsing". LOW requires a stronger signal than MEDIUM, 
with a lower chance of "falsing".  If the field says CUSTOM, the 
programmed sensitivity values in the codeplug are not standard 
values. Once the field has been changed from CUSTOM, the values 
cannot be recalled.
.P
 
EDIT CHANNEL INFORMATION

The EDIT CHANNEL INFORMATION function allows the user to change
channel data.  The Tab/ShiftTab keys are used to move the
cursor between data fields.  The PgUp/PgDn keys are used to
move the cursor between pages.

Upon entering the routine, the user selects the desired channel
by pressing the UP/DOWN Arrow Keys. The user can quickly view
each of the enabled channels by repeatedly pressing the UP or
DOWN Arrow Key. To edit any of the channel information, press
the TAB or ENTER Key to advance to the desired field.

*MODE INFORMATION is only displayed with channels that have
 MODE SLAVING ENABLED.
.P
DELETING CHANNELS
Pressing F7 causes the current channel to be deleted as long
as it is not channel 00, or channel 01 in a one channel 
station. (The codeplug must always have channels 00 and 01).

Example: You have a 5 channel station and want to delete
 channel 3. Select 03 in the EDIT CHANNEL NUMBER field.
 Press F7 to delete channel 3. As a result channel 4
 will now be numbered 3 (while still retaining channel 4
 information) and channel 5 will be numbered 4. 

ADDING CHANNELS
Press F8 to insert a duplicate of the currently displayed
channel. The new channel is placed immediately after the channel
selected. Any channels that have higher channel numbers than the
.P
displayed channel will have their channel numbers increased to
make room for the new channel.

Example: Suppose you have 4 channels enabled, and want to
 add a 5th. If you want the channel placed between channels
 1 and 2, select 1 in the CHANNEL NUMBER field, then press F8. 
 Channels 2, 3, and 4 will become 3, 4, and 5, respectively. 
 Channels 0 and 1 will remain unchanged, and channel 2 will 
 be an exact duplicate of channel 1. 

BEFORE:   0 1 2 3 4                                          
          | |\ \ \ \
AFTER:    0 1 N 3 4 5    {N--new channel (channel 2 in example)}
.P
MODE SLAVING

When ENABLED, MODE SLAVING forces the DEFAULT MODE NUMBER to be used 
with this channel. The MODE SLAVING parameter is ENABLED/
DISABLED by using the Up/Down arrow keys.

If MODE SLAVING is ENABLED, the default mode's information is 
below the DEFAULT MODE NUMBER field. This information may be
edited, or a new default mode can be selected by changing the
DEFAULT MODE NUMBER field.
.P
MODE LOCKED

When DISABLED, MODE LOCKED allows the mode to be changed from 
the default mode via remote control or by using the front panel 
switch.  If MODE SLAVING is disabled, then the MODE LOCKED
parameter is automatically DISABLED and is not accessible.  The 
parameter is ENABLED/DISABLED by using the Up/Down arrow keys.
.P
TX IDLE FREQUENCY

The Tx Idle Frequency is equal to the Tx Frequency unless the Tx
Frequency is equal to the Rx Frequency.  Frequncy ranges are:

    VHF_Range_1    132-158 MHz         UHF_Range_1    403-435 MHz
    VHF_Range_2    146-174 MHz         UHF_Range_2    435-475 MHz
    800 MHz (Rx)   806-825 MHz  and    800 MHz (Tx)   851-870 MHz
    896 MHz (Rx)   896-902 MHz  and    896 MHz (Tx)   935-941 MHz

The RX TRAY field indicates which receiver tray is being utilized.
All TX and TX IDLE frequencies are located in R1.  The RX frequency
may be in either R1 or R2.
.P
TX FREQUENCY

The transmit frequency is entered in MHz.  When an entered frequency 
is out of the specified range, an error occurs.  Frequency ranges are:

    VHF_Range_1    132-158 MHz         UHF_Range_1    403-435 MHz
    VHF_Range_2    146-174 MHz         UHF_Range_2    435-475 MHz
    800 MHz (Rx)   806-825 MHz  and    800 MHz (Tx)   851-870 MHz
    896 MHz (Rx)   896-902 MHz  and    896 MHz (Tx)   935-941 MHz

The RX TRAY field indicates which receiver tray is being utilized.
All TX and TX IDLE frequencies are located in R1.  The RX frequency
may be in either R1 or R2.
.P
RX FREQUENCY

The receive frequency is entered in MHz.  A range error is detected
when an out of range frequency is entered.  Frequency ranges are :

    VHF_Range_1    132-158 MHz         UHF_Range_1    403-435 MHz
    VHF_Range_2    146-174 MHz         UHF_Range_2    435-475 MHz
    800 MHz (Rx)   806-825 MHz  and    800 MHz (Tx)   851-870 MHz
    896 MHz (Rx)   896-902 MHz  and    896 MHz (Tx)   935-941 MHz

The RX TRAY field indicates which receiver tray is being utilized.
All TX and TX IDLE frequencies are located in R1.  The RX frequency
may be in either R1 or R2.
.P
CALL SIGN
         
The CALL SIGN field determines the Morse Code sequence to be generated
by the station. If the CALL SIGN field is left blank, no CALL SIGN will
be generated for the particular channel. If a CALL SIGN is entered,
the station will key and generate the call sign in Morse Code, at user 
selectable intervals and frequencies, while operating on that
particular channel. See the Advanced Information Screen ID CALL SIGN
fields for customizing the generation of the call sign.

The data entered can be up to 10 characters in length and can be any 
combination of alpha-numeric characters, and '/'. 
.P
TX IDLE CALCULATION

This field may be toggled between AUTO and MANUAL.  If AUTO is selected,
the tx idle frequency will automatically be set to the tx frequency unless
the tx frequency is equal to the rx frequency.  If the tx frequency is 
equal to the rx frequency then the tx idle is offset by a predetermined
amount.  If MANUAL is selected, the user must enter the tx idle frequency.  
.P
RX 2 TRAY TUNING FREQUENCY

The range for this field is determined by the range of the second receiver
tray on the model/options screen. Its value is the median frequency of all
R2 tray Rx frequencies.  A range error is detected when an out of range 
frequency is entered.  Frequency ranges are :

    VHF_Range_1    132-158 MHz         UHF_Range_1    403-435 MHz
    VHF_Range_2    146-174 MHz         UHF_Range_2    435-475 MHz
    800 MHz (Rx)   806-825 MHz  and    800 MHz (Tx)   851-870 MHz
    896 MHz (Rx)   896-902 MHz  and    896 MHz (Tx)   935-941 MHz

If no R2 range has been set on the model/options screen, then this field
shows NO RANGE and is non-editable.
.P
DEFAULT MODE NUMBER

The DEFAULT MODE NUMBER field displays the default mode to use with the
current channel. If MODE SLAVING is ENABLED, whenever the channel is
changed the mode will change to the DEFAULT MODE NUMBER. The DEFAULT
MODE's information is displayed below the DEFAULT MODE NUMBER only if
MODE SLAVING is ENABLED.

The DEFAULT MODE NUMBER field can be toggled to any existing mode. If any
of the mode information fields are changed by the user, and the current 
mode is slaved to a different channel (other than the displayed channel), 
upon leaving the current channel screen, a new mode will be created. 
.P
NOTE: If you desire to change common mode information in a mode slaved by
  more than one channel, without creating a new mode, press F10 to return
  to the View/Edit Screen, then press F3 to change to the Mode Information
  Screen. 

Upon exiting the Channel Information Screen, the RSS consolidates all 
identical modes into a single mode to save codeplug space. The mode numbers
may change, but the information will remain the same. 
.P
 
FREQUENCY RANGE R1 TRAY

The following choices of frequency range can be selected via
ARROW UP/ARROW DOWN keys:
  VHF_Range_1  132-158 MHz [5 Khz or 6.25 Khz steps]
  VHF_Range_2  146-174 MHz [5 KHz or 6.25 KHz steps]
  UHF_Range_1  403-435 MHz [5 KHz or 6.25 KHz steps] 
  UHF_Range_2  435-475 MHz [5 KHz or 6.25 KHz steps]
  800 (RX) 806-825  (TX) 851-870 MHz [12.5 kHz steps]
  896 (RX) 896-902  (TX) 935-941 MHz [12.5 kHz steps]

R1 tray contains all Tx frequencies and may contain Rx frequencies
if those Rx frequencies are in the same frequency band as the Tx
frequencies.               WARNING!!!!!
ALL CHANNEL FREQUENCIES WILL CONTAIN ZEROS AFTER CHANGING THIS FIELD!
.P
SYNTHESIZER FOR R1 TRAY

The synthesizer field indicates whether or not a MOSAIC chip is used in
the frequency synthesizer.  This field is not written to the codeplug.
The parameter is toggled between MOSAIC and NON-MOSAIC by using the
Up/Down arrow keys.  Frequencies will remain the same, but they
will be coded to the codeplug differently if the value of this field
is changed. NON-MOSAIC refers to a synthesizer that has a prescaler
chip and a divider chip. MOSAIC synthesizers do not have the prescaler
synthesizer chip (Prescaler is located in the divider chip).

The Defaults for the various bands are:
                MOSAIC     -- 800 MHz, 896 MHz
                NON-MOSAIC -- UHF, VHF
.P
FREQUENCY RANGE R2 TRAY

The following choices of frequency range can be selected:
  VHF_Range_1  132-158 MHz [5 Khz or 6.25 Khz steps]
  VHF_Range_2  146-174 MHz [5 KHz or 6.25 KHz steps]
  UHF_Range_1  403-435 MHz [5 KHz or 6.25 KHz steps] 
  UHF_Range_2  435-475 MHz [5 KHz or 6.25 KHz steps]
  800 (RX) 806-825  (TX) 851-870 MHz [12.5 kHz steps]
  896 (RX) 896-902  (TX) 935-941 MHz [12.5 kHz steps]
  DISABLED
The R2 tray contains only Rx frequencies.  DISABLED indicates that the R2
tray does not exist.  This field must be set to a valid frequency range,
not DISABLED, before setting channels to R2 on the Scanning Receiver
screen.                     WARNING!!!!!
ALL CHANNEL FREQUENCIES WILL CONTAIN ZEROS AFTER CHANGING THIS FIELD!
.P
SYNTHESIZER FOR R2 TRAY

The synthesizer field indicates whether or not a MOSAIC chip is used in
the frequency synthesizer.  This field is not written to the codeplug.
The parameter is toggled between MOSAIC and NON-MOSAIC by using the
Up/Down arrow keys.  If an R2 tray is not present, this field will show
DISABLED. The frequency values will remain the same, but they will be
coded to the codeplug differently if the value of this field is changed.
NON-MOSAIC refers to a synthesizer that has a prescaler chip and a 
divider chip. MOSAIC synthesizers do not have the prescaler synthesizer 
chip (Prescaler is located in the divider chip).



The Defaults for the various bands are:
                    MOSAIC     -- 800 MHz, 896 MHz
                    NON-MOSAIC -- UHF, VHF

.P
REPEATER OPERATION

This option if ENABLED allows in-cabinet repeat.  If changed to
DISABLED, the station will change from a REPEATER station to a 
BASE station.
.P
TRUNKING OPERATION

This option is non-editable.  If necessary to change this option, three
trunking codeplugs exist on your original program disks: TRNK.DEF,
TRNKSTAC.DEF and TRNKSIMU.DEF that will enable the user to change this
station type. Return to GET/SAVE/PROGRAM Codeplug Data Menu and read
the desired file from disk.

WARNING!!!  The channel frequencies will be zero.  It will be necessary
to enter the proper frequencies via the Channel Information screen.
Re-reading the codeplug data will overwrite the present codeplug.  To
preserve the present codeplug, save to disk prior to reading any code-
plug.
.P
SPECTRA TAC OPERATION          

This is a non-editable field.  If ENABLED this option generates a 2175 Hz 
tone onto Line 2 (only) during time of no receiver activity and no Rx Code
Detect.  Also, clear receiver audio is routed through the SpectraTAC
equalizer filter before being sent to Line 2.  If necessary to change this
field, two SpectraTAC codeplugs exist on the original program disks:
CONVSTAC.DEF and TRNKSTAC.DEF.  These enable the user to change the 
station type.  Return to GET/SAVE/PROGRAM Codeplug Data Menu and read the
desired file from disk.
.P
SECURE OPERATION

This field indicates if the station will operate as a transparent station
or an encode/decode station.  A secure board is necessary (option C514) 
to toggle this field.  For proper station operation for an encode/decode
station, at least one of the following options is also necessary:
C388 - DES Encryption
C794 - DVP Encryption
C795 - DES-XL Encryption
C797 - DVP-XL Encryption
If a secure board is not present this field will contain DISABLED and be
non-editable.  If a TTRC board is present, the Status Tone field in
the Advanced Information Screen will be ENABLED when SECURE OPERATION is
TRANSPARNT, and DISABLED when ENC/DECODE.
.P
XL DECRYPTION OPERATION

This field indicates the mode of secure operation.  When disabled, 
the station operates in a secure Cipher Feedback (CFB) mode.  CFB 
is used with asynchronous communications and does not require the 
station to buffer the incoming secure data.  When enabled, the station 
operates in a secure XL mode.  XL is used with synchronous communications 
and uses the station's 80 msec buffer so that no portion of the received
data is lost.

Options C388(DES Encryption) or C794 (DVP Encryption) will DISABLE
this field.
.P
DUPLEX OPERATION

Option C332 enables FULL DUPLEX operation. The option moves JU4202 to its
normal position and JU4205 to its alternate position on the TTRC board.
The other toggle choice is HALF DUPLEX.

If TRUNKING OPERATION is ENABLED this field is not editable and will be
FULL DUPLEX.
.P
SIMULCAST OPERATION

This field is non-editable. If necessary to change this field, two codeplug
files exist on the original program disks: CONVSIMU.DEF and TRNKSIMU.DEF.
These will enable the user to change the station to a simulcast type.
Return to GET/SAVE/PROGRAM Codeplug Data Menu and read desired file from
disk.
.P
TTRC EQUIPPED

When ENABLED, this field indicates a TTRC board is present. The other
choice is DISABLED. If this field is changed from ENABLED to DISABLED, all
TTRC information is removed and cannot be recovered. If DISABLED, all
associated fields on the Advanced Information Screen will display NO TTRC.
.P
SECURE EQUIPPED

When ENABLED, this field indicates a Secure board is present. The other
choice is DISABLED. If this field is changed from DISABLED to ENABLED, a
temporary screen will appear while the program reads in the default Secure
codeplug. The default codeplug is configured for transparent operation. 
If this is changed from ENABLED to DISABLED, all Secure board information
is removed and cannot be recovered. If DISABLED, all associated fields on 
the Advanced Information Screen will display NO SECURE.
.P
MCS EQUIPPED

When ENABLED, this field indicates an MCS board is present. The other
choice is DISABLED. If this field is changed from ENABLED to DISABLED, all
MCS information is removed and cannot be recovered. If this field is
changed from DISABLED to ENABLED, a default MCS table is created and slaved
to mode zero to match factory programming.
.P
SAM EQUIPPED

When ENABLED, this field indicates a SAM board is present. The other choice
is DISABLED. If this field is changed from DISABLED to ENABLED, a temporary
screen will appear while the program reads in the default SAM codeplug. If
this field is changed from ENABLED to DISABLED, all SAM information is
removed and cannot be recovered. If DISABLED, all associated fields on the
Advanced Information Screen will display NO SAM.
.P
PASSWORD EQUIPPED

When ENABLED, the PASSWORD EQUIPPED field indicates that the station is 
password protected.  If the station is password protected, the RSS user
will be required to enter a password before any communication with the 
station is allowed. If the SSCB firmware is version 5.XX or greater, the 
PASSWORD Equipped field can be toggled between DISABLED and ENABLED by 
using the Up/Down Arrow keys.  The PASSWORD EQUIPPED field reads DISABLED 
and is non-editable, if the SSCB firmware version is less than 5.XX.

NOTE: PASSWORD PROTECTION IS A FEATURE PRESENT ONLY IN VERSION 5.XX
      OR GREATER STATION CONTROL FIRMWARE.
.P
PASSWORD EQUIPPED

If the PASSWORD EQUIPPED field is changed from DISABLED to ENABLED, the
user will be prompted to enter a password when an attempt to program the 
station is made.  The station WILL NOT be password protected UNTIL the
station is successfully programmed with the PASSWORD EQUIPPED field set
to ENABLED.

If the PASSWORD EQUIPPED field is changed from ENABLED to DISABLED, the
station remains password protected until the station is programmed. The
user will be required to enter the current password when an attempt to
program the station is made.  When the data is successfully programmed
to the codeplug, the station is no longer password protected, and any
subsequent communication with the station will not be password protected.
.P
SP NUMBER

If Special Product (SP) code is loaded in the current codeplug image, 
the SP NUMBER field displays the SP number.  This field contains NO SP 
if an SP is not loaded. The SP NUMBER field is always non-editable. 
SP code is loaded via the GET/Save Menu.

.P
SMARTZONE OPERATION

SmartZone is a complex wide-area, trunked system configuration. 

At the time of the release of this RSS, SmartZone Operation is only
available by ordering the X235ADSP option, which includes special
SSCB and TTRC firmware, and special codeplug files. The current
shipping MSF firmware (SSCB R5.52, TTRC R5.41, SECURE R4.28) DOES
NOT SUPPORT SMARTZONE OPERATION.  There are plans to include SmartZone
Operation in the standard shipping firmware. When this is done, the
SMARTZONE OPERATION field will control the firmware. CURRENTLY THIS
FIELD HAS NO AFFECT ON STATION OPERATION. When the SmartZone Operation
is available in standard MSF firmware, the field (FTR's) will be 
notified via MSIN (Motorola Servicers Information Network).
.P

 
CHANGE/VIEW REMOTE CONTROL INFORMATION

The  Change/View Remote Control Information  screen  contains all of the
editable fields concerning tone remote control commands.  This  screen 
allows  configuration of the station's  remote control capabilities by 
entering various commands. Invalid commands are flagged with a warning 
message.

Defined function keys provide the following functions:
      F1  - HELP 
      F3  - RESET COMMANDS TO ORIGINAL VALUE
      F5  - PRINT PAGE                                    
      F10 - EXITS THE CHANGE/VIEW REMOTE CONTROL INFORMATION SCREEN
.P
CHANGE/VIEW REMOTE CONTROL INFORMATION (cont.)
There are 16 function tones, FT0 (Guard  Tone) through  FT15, and 12 DC
functions  which  can  contain  a maximum of 8  executable  commands per 
function.  Commands may be edited by using TAB and ShiftTAB to position
the  cursor  at  the   desired   field  and  typing  the  new  command.
Valid  commands are listed in the COMMAND DESCRIPTIONS table. 

                     COMMAND DESCRIPTIONS
ACK         Send acknowledge handshake for this function. 
ALM ON      Enable station alarms. 
ALM OFF     Disable station alarms. 
CHN xx      Select Channel xx (xx: 0-15).
CONT xx     CONTinue executing  commands at tone xx, (xx: 0-15).
DVP1        Select DVP Code 0.
DVP2        Select DVP Code 1.
.P
CHANGE/VIEW REMOTE CONTROL INFORMATION (cont.)
ECHO        Send back function and Guard tones. 
ECHOLLGT    Send back function and Guard tones followed
            by a Low Level Guard Tone (LLGT). 
ENCRYPT ON  Enable voice encryption. 
ENCRYPT OFF Disable voice encryption. 
FNCON x,y   Activate a FuNCtion bit on MUXbus address x bit y (x:0-15,
            y:0-3).
FNCOFF x,y  Deactivate FuNCtion bit on MUXbus address x bit y (x:0-15,
            y:0-3).
KEY         Keys transmitter until low-level guard tone is removed.
KEY ON      Manually KEY station.  Used for timed operations.
KEY OFF     Manually DEKEY station.  Used for timed operations.
KEYNUM xx   Select a secure key xx (xx = 1 to 8). This applies to
            Secure Equipped radios only.
.P
CHANGE/VIEW REMOTE CONTROL INFORMATION (cont.)
KEYRST      Clears  all encryption keys.  This applies to Digital
            Equipped (Secure  Equipped) radios only.
LLT         Perform phone line loop test sequence.
MODE xx     Select Mode xx (xx: 0-15).
MON         Monitor channel.  Disables receiver PL  until next key.
MORE        Reset function tone buffer and look for more tones.
NIB x,y     Set data NIBble on MUXbus address x to value y. (x:0-15, y:0-15).
NULL        No further action.
R2M ON      Auxillary receiver audio mute on.
R2M OFF     Auxillary receiver audio mute off.
.P
CHANGE/VIEW REMOTE CONTROL INFORMATION (cont.)
RCV2 xx     Select Receiver 2 channel xx (xx: 0-15).
RES         Resets the TTRC Board.
RPL ON      Enable receiver PL.
RPL OFF     Disable receiver PL.
RPT ON      Set-up repeater operation.
RPT OFF     Sets-up Knock down and disables repeater operation.
RXINH ON    Receiver Inhibit On.
RXINH OFF   Receiver Inhibit Off.
SALA ON     Turn On Continuous Selective Alarm feature.
SALB ON     Turn On Selective Alarm feature for 100 msec.
SAL OFF     Turn Off Continuous Selective Alarm feature.
SCAN ON     Enable channel scan feature.
SCAN OFF    Disable channel scan feature.
STBY ON     Enable Hot Standby operation.
.P
STBY OFF    Disable Hot Standby operation.
TPL ON      Enable transmitter PL.
TPL OFF     Disable transmitter PL.
TXINH ON    Transmitter Inhibit On.
TXINH OFF   Transmitter Inhibit Off.
UNECHO      Terminate Low Level Guard Tone (LLGT) initiated by ECHOLLGT.
WAIT xxxx   WAIT  for xxxx  milliseconds  (xxxx: 5-21100).
WC1 ON      Turn On Wild Card 1 function.
WC1 OFF     Turn Off Wild Card 1 function.
WC2 ON      Turn On Wild Card 2 function.
WC2 OFF     Turn Off Wild Card 2 function.
WC3 ON      Turn On Wild Card 3 function.
WC3 OFF     Turn Off Wild Card 3 function.
WC4 ON      Turn On Wild Card 4 function.
WC4 OFF     Turn Off Wild Card 4 function.
.P
 
GET/SAVE/PROGRAM MENU
The Function Keys in the GET/SAVE/PROGRAM Menu have the following meanings:
    F1  - Displays this screen.
    F2  - Read Codeplug Data from the Station into the program's memory.
    F3  - Read Codeplug Data from a DOS file into the program's memory.
    F4  - Read SP (Special Product) Code from a DOS file and Install 
          into current codeplug.
    F5  - Read Codeplug Data from the Base Station into the program's memory.
          This key will interrupt normal Base Station operation and will
          also reset the Base Station upon completion of the read.
    F7  - Write the codeplug data from memory to a DOS file. This will
          overwrite the DOS file if it already exists.
    F8  - Program the codeplug data from memory into the Station.
    F9  - Convert current Codeplug to a newer version.
    F10 - Exit to the previous menu.
.P
GET/SAVE/PROGRAM MENU (cont.)

For the manual conversion of codeplugs, first read the station or file that
contains the "old" codeplug.  Next, perform the necessary conversion(s) via
the F9 from this menu.  Then disconnect the station's power to insert the
"new" firmware into the proper board(s) using the proper static protection.  
After power-up of the station, error code(s) will be appearing on the front 
panel.  Temporarily ignore these as they are due to a codeplug and firmware 
mismatch.  Program the station via F8 from this menu.  The station should 
now be operating properly with its "new" firmware and "new" codeplug 
information.
.P

      WARNING!  CODEPLUG DATA HAS BEEN CORRUPTED!

  Channel Dev Pointer is out of range.
  Check SSCB Codeplug.



          Press F10 to continue.
.P

      WARNING!  CODEPLUG DATA HAS BEEN CORRUPTED!

  MCS Tables Pointer is out of range.
  Check SSCB Codeplug.



          Press F10 to continue.
.P

      WARNING!  CODEPLUG DATA HAS BEEN CORRUPTED!

  Station Control Codeplug Last Address Pointer is out of range.
  Check SSCB Codeplug.



          Press F10 to continue.
.P

      WARNING!  CODEPLUG DATA HAS BEEN CORRUPTED!

  Begin Variable User Area Pointer is out of range.
  Check SSCB Codeplug.



          Press F10 to continue.
.P

      WARNING!  CODEPLUG DATA HAS BEEN CORRUPTED!

  End Variable User Area Pointer is out of range.
  Check SCCB Codeplug.



          Press F10 to continue.
.P

      WARNING!  CODEPLUG DATA HAS BEEN CORRUPTED!

  Station Control Background Mailbox Pointer is out of range.
  Check SSCB Codeplug.



          Press F10 to continue.
.P

      WARNING!  CODEPLUG DATA HAS BEEN CORRUPTED!

  Station Control IPCB Mailbox Pointer is out of range.
  Check SSCB.



          Press F10 to continue.
.P

      WARNING!  CODEPLUG DATA HAS BEEN CORRUPTED!

  Channel Table Pointer is out of range.
  Check SSCB Codeplug.



          Press F10 to continue.
.P

      WARNING!  CODEPLUG DATA HAS BEEN CORRUPTED!

  ID Callsign Pointer in Channel Table is out of range.
  Check SSCB.



          Press F10 to continue.
.P

      WARNING!  CODEPLUG DATA HAS BEEN CORRUPTED!

  Mode Table Pointer is out of range.
  Check SSCB Codeplug.



          Press F10 to continue.
.P

      WARNING!  CODEPLUG DATA HAS BEEN CORRUPTED!

  Push-To-Talk Pointer in Mode Table is out of range.
  Check SSCB Codeplug.



          Press F10 to continue.
.P

      WARNING!  CODEPLUG DATA HAS BEEN CORRUPTED!

  Time Out Timer Pointer in Mode Table is out of range.
  Check SSCB Codeplug.



          Press F10 to continue.
.P

      WARNING!  CODEPLUG DATA HAS BEEN CORRUPTED!

  TTRC Spare Control Pointer is out of range.
  Check TTRC Codeplug.



          Press F10 to continue.
.P

      WARNING!  CODEPLUG DATA HAS BEEN CORRUPTED!

  TTRC External PTT Control Pointer is out of range.
  Check TTRC Codeplug.



          Press F10 to continue.
.P

      WARNING!  CODEPLUG DATA HAS BEEN CORRUPTED!

  TTRC Codeplug Last Address is out of range.
  Check TTRC Codeplug.



          Press F10 to continue.
.P

      WARNING!  CODEPLUG DATA HAS BEEN CORRUPTED!

  TTRC Begin Variable User Area is out of range.
  Check TTRC Codeplug.



          Press F10 to continue.
.P

      WARNING!  CODEPLUG DATA HAS BEEN CORRUPTED!

  TTRC End Variable User Area is out of range.
  Check TTRC Codeplug.



          Press F10 to continue.
.P

      WARNING!  CODEPLUG DATA HAS BEEN CORRUPTED!

  TTRC Background Mailbox Pointer is out of range.
  Check TTRC Codeplug.



          Press F10 to continue.
.P

      WARNING!  CODEPLUG DATA HAS BEEN CORRUPTED!

  TTRC IPCB Mailbox Pointer is out of range.
  Check TTRC Codeplug.



          Press F10 to continue.
.P

      WARNING!  CODEPLUG DATA HAS BEEN CORRUPTED!

  Response Table Pointer(s) is out of range.
  Check TTRC Codeplug.



          Press F10 to continue.
.P

      WARNING!  CODEPLUG DATA HAS BEEN CORRUPTED!

  DC Response Table Pointer(s) is out of range.
  Check TTRC Codeplug.



          Press F10 to continue.
.P

      WARNING!  CODEPLUG DATA HAS BEEN CORRUPTED!

  Secure Last Address Pointer is out of range.
  Check Secure Codeplug.



          Press F10 to continue.
.P

      WARNING!  CODEPLUG DATA HAS BEEN CORRUPTED!

  Secure Begin Variable User Area Pointer is out of range.
  Check Secure Codeplug.



          Press F10 to continue.
.P

      WARNING!  CODEPLUG DATA HAS BEEN CORRUPTED!

  Secure End Variable User Area Pointer is out of range.
  Check Secure Codeplug.



          Press F10 to continue.
.P

      WARNING!  CODEPLUG DATA HAS BEEN CORRUPTED!

  Pointer Secure Background Mailbox is out of range.
  Check Secure Codeplug.



          Press F10 to continue.
.P

      WARNING!  CODEPLUG DATA HAS BEEN CORRUPTED!

  Pointer Secure IPCB Mailbox is out of range.
  Check Secure Codeplug.



          Press F10 to continue.
.P
PATHNAMES AND FILENAMES

This Screen consists of 6 fields.

The four CODEPLUGS TO READ fields allow the user to create a station
codeplug configuration using modules from several files. For example, a
user can read the SSCB and SECURE codeplugs from one file, and a TTRC
codeplug from another file. For more information on these fields, move
the cursor to one of the four CODEPLUGS TO READ fields and press F1.
 
The ENTER DIRECTORY NAME field contains the directory path that is searched
for codeplug files. The valid disk drive letters are A-G.  The directory 
may be changed by entering in a new directory pathname. Once a valid 
directory pathname has been entered the files contained in that directory
will be displayed below and on subsequent pages, if neccessary.
.P
The ENTER FILE NAME consists of the filename.  It may be entered in one of 
two fashions.  The first is to directly enter in the filename.  The second
is to navigate through the files using the following keys:


PgUp/PgDn: Display more files if all of the directory's files can not fit 
           on one page.

Up/Dn Arrow: These keys will move cursor up or down to the next file.

Tab: Moves cursor to filename in the same row in the next column.  
     If cursor is in last column the cursor will move to the last filename.
.P
ShiftTab: Moves cursor to filename in the same row in the previous 
          column. If cursor is in first column on first page then cursor 
          will move up to the directory pathname field so that a new 
          directory pathname may be entered. 

Enter: Will read or save using the filename that is displayed on the 
       'Enter Filename' line.
                     
The following function keys are valid on this screen:
F1: Display help information for this screen.
F5: Print out the current screen to the printer.
F10,Esc: Leave the current screen without reading or saving to a file.

.P
ALT-F9: 


        


        Used to read only desired board's codeplug from a file.
     
        For example, it allows reading TTRC from one file, and 
        SSCB from another. ALT-F9 will only work in the Enter
        Pathname field. For more information on the ALT-F9 
        functionality, press ALT-F9 then navigate to the
        CODEPLUGS TO READ line, then press F1.
.P
Upgrade Codeplug Version

The purpose of the Upgrade Codeplug Version screen is to enable the 
RSS user to upgrade a codeplug to a newer version. All programmed
settings are retained in the conversion. This allows the user to
upgrade the station to newer firmware without losing current settings.

SYSTEM VERSION

The SYSTEM VERSION refers to groupings of shipping firmware that are
able to operate together in the station. The SYSTEM VERSION field can
be toggled between 1, 2, or 3. As the SYSTEM VERSION field is changed
the numbers in the CHANGE TO column will change if an upgrade is 
possible. For example if the SSCB version is currently 4 and the SYSTEM
.P
VERSION is changed to 3, the SSCB CHANGE TO column will change to 5. But,
if the SYSTEM VERSION is changed to 1 the SSCB CHANGE TO column will
remain at 4, because downgrading of codeplugs is not supported. If a 
board is not present (ie. NO SAM), the CHANGE TO column will be blank
and remain blank regardless of the system chosen. Press F3 to perform
the upgrade(s).

      SYSTEM VERSION     SSCB     TTRC    SECURE    SAM
           1              3        4        3        1
           2              4        5        4        1
           3              5        5        4        2

.P
CHANGE TO (version)

This is an entry field in which the user can enter the new desired 
individual codeplug version. The range of new version numbers can be 
selected using the UP/DOWN Arrow Keys. If the CHANGE TO field fails to 
toggle, the CURRENT codeplug version is upgraded to the most recent version 
and cannot be upgraded further. If no conversion is allowed, or the codeplug
is not loaded, the upper right-hand window displays the message 
'NON-EDITABLE FIELD'.

The user toggles to the new desired version number(s) and then initiates the
conversion by pressing F3. The program performs all conversions selected
and redisplays the screen with the new versions in the CURRENT column.

.P
The following is the procedure to be followed when performing a firmware 
upgrade:
1) Read the station with old firmware installed. 
2) Save the old codeplug to a disk file.
3) Remove power from the station. While taking precautions against electro-
   static discharge, replace the old firmware with the new (in all boards).
4) Re-connect the power to the station. At this point you can program the
   station directly* or upgrade the codeplug manually (using Upgrade Codeplug
   screen) and then program the station.
5) Save the new codeplug information to a disk file.

* If you program directly without manually upgrading the codeplugs, the RSS
  will automatically detect a missmatch in codeplug and firmware versions 
  and prompt the user on whether or not to perform the neccessary upgrade
  during the programming operation.
.P
This Screen consists of 2 editable fields. 
 
The first field is the directory that contains the 
SP (Special Product) code files. It may be changed by 
entering in a new directory pathname. Once a valid 
directory pathname has been entered the files contained 
in that directory will be displayed.

The second field consists of the filename.  It may be 
entered in one of two fashions.  
The first is to directly enter in the filename.  
(cont.)

.P
The second is to navigate through the files using the following keys:

PgUp/PgDn: Display more files if all of the directories files
  can not fit on one page.

Up/Dn Arrow: These keys will move cursor up or down to the next file.

Tab: Moves cursor to filename in the same row in the next column.  
  If cursor is in last column the cursor will move to the last filename.

ShiftTab: Moves cursor to filename in the same row in the previous 
  column. If cursor is in first column on first page then cursor 
  will move up to the directory pathname field so that a new 
  directory pathname may be entered. 
(cont.)
.P
Enter: Will intall the SP from the file whose name is displayed on
  the 'Enter Filename' line.
                     
The following function keys are valid on this screen:

F1: Display help information for this screen.

F3: Display information about the SP contained in the file.

F5: Print out the current screen to the printer.

F10,Esc: Leave the current screen without reading or saving
  to a file.

.P
CODEPLUG TO BE READ>

The four fields on this line indicate which codeplug(s) the RSS should
attempt to find and read from the file displayed in the ENTER FILE
NAME field. If a codeplug type contains a YES next to it, the RSS 
will attempt to read that particular codeplug data from the file.

Use the UP/DOWN Keys to toggle between YES and NO. By default, all
codeplugs are set to YES. The YES in this field indicates that an
attempt to read the particular codeplug from a file will be made.

If there is no codeplug information currently read in the RSS, the
SSCB field will be set to YES and NON-EDITABLE (All stations must
contain SSCB codeplug information). 
.P
Caution should be used when combining codeplug information from more
than one file. It is possible to read incompatible codeplug versions
(ie. SSCB 5.xx and TTRC 4.xx). If you are uncertain of the 
compatibility of codeplugs, enter the Upgrade Codeplug Version screen
after reading the codeplugs. The Upgrade Codeplug Version screen will
list compatible versions, and, if neccessary, allow upgrading of 
specific codeplugs to make the versions compatible.
.P
 
IPCB COMMANDS

IPCB command structure is as follow:
  Start of     
  Message   -  Module  -  Command  -  Data
 Character       ID
   ("/")
 
                 Module ID List
                 --------------
    module #    ASCII Character   Board Name
       1             1            Station Control, SSCB
       2             2            TRC,TTRC
       3             3            MCS
       4             4            Second Receiver
.P
IPCB_COMMANDS(cont.)

       5             5                PURC Control
       6             6                DTMF
       7             7                DRC
       8             8                VOX
       9             9                GCC
      10             A                Secure
                 COMMAND LIST
                 ------------
     Command                   Command
   Description      Command #  Format
   Read Address        A       /idAa3a2a1a0
   Read Next           B       /idB
   Read Current        C       /idC
.P
IPCB_COMMANDS(cont.)

   Read Previous       D       /idD
   Read String         E       /idEa3a2a1a0b3b2b1b0
   Read MUXbus         F       /idF
   Read EEPROM 
    into RAM           G       /idG
   Seize Data for      
    Operation          H       /idH
   Read EEPOT
    Setting            I       /idIpid(pot id #)
   Solicited BSW
    Transfer           S       /idS
   Test IPCB           T       /idTd1d0

.P
IPCB_COMMANDS(cont.)

   Unsolicited 
    BSW Transfer       U       /idU
   Add error           Z       /idZ
   Write Address       a       /idaa3a2a1a0d1d0
   Write Next          b       /idbd1d0
   Write Current       c       /idcd1d0
   Write Previous      d       /iddd1d0
   Write String        e       /idea3a2a1a0b3b2b1b0dn..d0
   Write MUXbus        f       /1fd15..d0
   Write EEPROM 
    from RAM           g       /idg
   Release from
    Data Operation     h       /idh
.P
IPCB_COMMANDS(cont.)

   Write EEPOT
    Setting            i       /idipidd1d0











.P
 
MAIN MENU                               

The MAIN Menu is  the top level of the program from which you 
select the type of function that you wish to perform.  All 
selections are made via the "Function Keys", labeled F1 thru F10 
on your keyboard. 
                                                                         
After making a selection, you will be directed to similar menus 
and/or data entry screens for codeplug data.

.P
MAIN MENU (cont)

Function Key Descriptions:

F1 - Additional information is available for every menu via the F1(HELP)
     key.  Specific help is also available for each field on all data 
     entry screens.  Keyboard help is available within any HELP screen via 
     the F2 key.  Version and RVN numbers for this version are available
     via the F9 key. Various Front Panel Error Message definitions are
     available by pressing F6, F7, or F9 from any help screen.

F2 - SERVICE AND ALIGNMENT section allows the user to adjust 
     the Soft Pots in order to set-up the station for proper 
     operation.

.P
MAIN MENU (cont)

F3 - GET/SAVE/PROGRAM Codeplug Data routine gives 
     the user the capability retrieve data for modification.  After 
     modifying the data the user can program the information into the 
     station or save it for future reference.

F4 - CHANGE/VIEW Codeplug Data function allows the user to modify all
     editable information in the codeplug.

F5 - PRINT Codeplug Data routine makes a paper copy of the                
     codeplug information.
   
F6 - Not used at this time.

.P
MAIN MENU (cont)

F7 - Not Used At This Time.

F8 - Not Used At This Time.

F9  - SETUP COMPUTER CONFIGURATION is used to configure your BASE STATION
      Radio Service Software to your particular application.  Communication 
      ports and even screen colors may be customized to your specific needs.

F10 - Select EXIT to quit the program and return to DOS.   Be sure all 
      desired codeplug changes have been programmed back into the radio and 
      that an archive copy has been made.  Otherwise all changes will be 
      lost since returning to DOS erases this data from the computer's 
      memory.
.P
                            KEYBOARD OPERATION
      TAB:                    Advance Cursor to Next Data Field
      ENTER:                  Advance Cursor to Next Row
      Shift TAB:              Backup Cursor to Last Data Field
      UP / DOWN Arrow Keys:   Increment / Decrement Value or Selection
      LEFT / RIGHT Arrow:     Move Cursor Within Data Field
      INSERT:                 Insert Space at Current Cursor Position
      BACKSPACE:              Erase Data Within Field & Move Cursor Left
      DELETE:                 Erase Current Character
      PAGE UP / PAGE DN:      Scroll Displayed Data UP or DOWN
      HOME:                   Move Cursor To Upper Left Data Field
      F1:                     Help
      F2 - F8:                Execute Labeled Function
      F10:                    Return to the PREVIOUS Menu
      ESC:                    Return to the MAIN Menu
.P
MSF 5000/10000 DIGITAL "E" ERROR CODES

Below is a list of brief explanations of Operational error codes
that may be displayed on the digital LED display on the front 
panel of the MSF 5K/10K Digital Base Stations. 

Operational Error Codes:
------------------------
E00:  Push-to-Talk Type HSR Image Mismatch
E10:  RF Band not Designated
E20:  Secure Module Coded Rx Level EEPOT lower limit out-of-bounds
E21:  SSCB Flutter-Fighter Clip Level EEPOT lower limit out-of-bounds
E22 - 2E:  SSCB EEPOT Value out-of-bounds
E30 - 3E:  TTRC EEPOT Value out-of-bouds
E3F:  RAC/SAM EEPOT limit out-of-bounds
.P
E40:  Receive Loop Control Signal Error
E41:  Transmit Loop Control Signal Error
E42:  Bad MCS Update Time value in SSCB codeplug.
E43:  MCS Transfer Error
E44:  MCS ASCII Data Transfer Error
E45:  Rx Level Adjust Error
E46:  Tx Synthesizer Failed To Unlock
E47:  Tx Synthesizer Failed To Lock
E48:  Rx Synthesizer Failed To Unlock
E49:  Rx Synthesizer Failed To Lock
E4A:  Rx2 Synthesizer Failed To Unlock
E4b:  Rx2 Synthesizer Failed To Lock  
E4C:  Illegal Number of Scan Channels
E4d:  Rx1 Tuning Channel Is Zeroed
E4E:  Rx2 Tuning Channel Is Zeroed
.P
E4F:  Tx Tuning Channel Is Zeroed
E50:  TTRC ALC Xmit EEpot Codeplug Value Invalid
E51:  TTRC Un-ALC Xmit EEpot Codeplug Value Invalid
E52:  Invalid HSR Address In External PTT Control Table
E53:  Invalid HSR bit IN External PTT Control Table
E54:  TTRC Encode Echo Busy
E55:  TTRC Encoder Active Too Long
E56:  Bad TTRC Tone Request
E57:  Invalid DC Current Present (TTRC)
E58:  Invalid HSR Address Specified in Spare Control Table
E60:  Callsign Too Long (SSCB)
E70-78: RAC/SAM Errors
E80:  Invalid SSCB Timer Usage
E81:  Invalid SSCB EEPOT Operation Requested
.P
E82:  Invalid Push-To-Talk Request
E83:  Invalid Push-To-Talk Arbitration State
E84:  Invalid Transmitter Operations State Detected
E85:  Missing MCS Module
E86:  Invalid EEPOT Adjustment State Detected
E87:  Invalid High Speed Ring Display State Detected
E88:  Invalid Push-To-Talk Priority List Detected
E89:  Too Many Channels and Modes Defined
E8A:  Invalid SSCB I/O State Detected
E8b:  Invalid SSCB IPCB Command State Detected
E8C:  Invalid Power Level Trip Display State Detected
E8d:  SSCB Sp Address Table Error
E8E:  Invalid Scan Operation State Detected
E90:  Invalid TTRC Timer Usage
E91:  Invalid TTRC EEPOT Operation Requested
.P
E92:  Invalid TTRC Tone Requested
E93:  Invalid TTRC Command Requested
E94:  Invalid TTRC ALC State Detected
E95:  Invalid TTRC DC Current Number Detected
E9b:  Invalid TTRC IPCB Command State Detected
E9D:  TTRC SP Address Error
EA0:  Invalid Secure Timer Usage 
EA1:  Invalid Secure Takeover State Detected 
EA2:  RAC/SAM Output Response Number Out-of-Range
EAA:  RAC/SAM Output Line Number Out-of-Range
EAb:  Invalid Secure IPCB Command State Detected
EAD:  Secure SP Address Error
Eb0 through EE1:  Undefined Interrupt Vector Fetched
EFF:  COP Failure
.P
MSF 5000/10000 DIGITAL "d" ERROR CODES

Below is a list of brief explanations of Digital Diagnostic error codes
that may be displayed on the digital LED display on the front panel of 
the MSF 5K/10K Digital Base Stations. 
 
Digital Diagnostic Error Codes
------------------------------ 
d01:  SSCB Primary User Area Has Bad Check Byte
d10:  TTRC Module did not receive IPCB Wakeup Command from SSCB
d11:  TTRC Primary User Area Has Bad Check Byte
d13:  Bad Guard Tone Frequency
d20:  Secure Module did not receive IPCB Wakeup Command from SSCB
d40:  MCS did not receive IPCB Wakeup Command from SSCB
d80:  Corrupted User Area of SSCB Codeplug
.P
d81:  Corrupted SSCB Codeplug
d82:  Bad SSCB Serial EEPROM
d83:  SSCB Codeplug Type Mismatch
d84:  Incorrect SSCB Codeplug Version Number
d85:  Incorrect SSCB Codeplug Checksum
d86:  Incorrect SSCB Firmware Checksum
d90:  Faulty SSCB Internal RAM:
d91:  No SSCB MUXbus Data Strobe (internal loopback mode)
d92:  No SSCB MUXbus Data Strobe (normal operating mode)
d93:  Improper SSCB MUXbus Operation (internal loopback mode)
d94:  Improper SSCB MUXbus Operation (normal operating mode)
d97:  No SSCB High Speed Ring Clock/Sync Signal (internal loopback mode)
d98:  No SSCB High Speed Ring Clock/Sync Signal (normal operating mode)
d99:  Improper SSCB High Speed Ring Operation (internal loopback mode)
d9A:  Improper SSCB High Speed Ring Operation (normal operating mode)
.P
d9b:  Defective SSCB IPCB Interface
d9E:  SSCB Processor Configuration Register Altered
d9F:  SSCB EEPROM Codeplug Erased
dA0:  Corrupted User Area of TTRC Codeplug
dA1:  Corrupted TTRC Codeplug
dA2:  Bad TTRC Serial EEPROM
dA3:  TTRC Codeplug Type Mismatch
dA4:  Incorrect TTRC Codeplug Version Number
dA5:  Incorrect TTRC Codeplug Checksum
dA6:  Incorrect TTRC Firmware Checksum
dA7:  Missing TTRC Module
dA8:  TTRC Module Present But Not Responsive
dA9:  TTRC Codeplug Station_Type Mismatch
dAA:  TTRC System Version Number Mismatch
dAC:  TTRC EEPROM Programming Timeout Error
.P
db0:  Faulty TTRC Internal RAM:
db1:  No TTRC MUXbus Data Strobe (internal loopback mode)
db2:  No TTRC MUXbus Data Strobe (normal operating mode)
db3:  Improper TTRC MUXbus Operation (internal loopback mode)
db4:  Improper TTRC MUXbus Operation (normal operating mode)
db7:  No TTRC High Speed Ring Clock/Sync Signal (internal loopback mode)
db8:  No TTRC High Speed Ring Clock/Sync Signal (normal operating mode)
db9:  Improper TTRC High Speed Ring Operation (internal loopback mode)
dbA:  Improper TTRC High Speed Ring Operation (normal operating mode)
dC0:  Corrupted User Area of Secure Codeplug
dC1:  Corrupted Secure Codeplug
dC3:  Secure Codeplug Type Mismatch
dC4:  Incorrect Secure Codeplug Version Number
dC5:  Incorrect Secure Codeplug Checksum
dC6:  Incorrect Secure Firmware Checksum
.P
dC7:  Missing Secure Module
dC8:  Secure Module Present But Not Responsive
dC9:  Secure Codeplug Station Type Mismatch
dCA:  Secure System Version Number Mismatch
dCC:  Secure EEPROM Programming Timeout Error
dd0:  Faulty Secure Internal RAM:
dd1:  No Secure MUXbus Data Strobe (internal loopback mode)
dd2:  No Secure MUXbus Data Strobe (normal operating mode)
dd3:  Improper Secure MUXbus Operation (internal loopback mode)
dd4:  Improper Secure MUXbus Operation (normal operating mode)
dd5:  Secure Standard Mode ASIC Output Latch/Input Buffer Error (internal 
      loopback mode)
dd7:  No Secure High Speed Ring Clock/Sync Signal (internal loopback mode)
dd8:  No Secure High Speed Ring Clock/Sync Signal (normal operating mode)
dd9:  Improper Secure High Speed Ring Operation (internal loopback mode)
.P
ddA:  Improper Secure High Speed Ring Operation (normal operating mode)
ddb:  Faulty Secure Module Transmit Phase Lock Detector Circuits
ddC:  Faulty Secure Module Receive Phase Lock Detector Circuits
dE0 - dF6 : RAC/SAM Error Codes
dEA: RAC/SAM Board System Version # is incompatible with SSCB's







.P
MSF 5000/10000 DIGITAL "OTHER" ERROR CODES

Below is a list of brief explanations of error codes which are not Digital 
Diagnostic or Operational. These error codes may be displayed on the 
digital LED display on the front panel of the MSF Digital Base Stations. 

Diagnostic Error Indications:
=============================  
Entire Status Display Flashes Twice: Faulty SSCB Display Driver or No
   Interrupt Request Interrupt.
Entire Status Display Flashes Four Times:   Faulty SSCB External RAM
TTRC FAIL LED Flashes Two Times:  No Interrupt Request interrupt 
   to the TTRC microprocessor.
TTRC FAIL LED Flashes Four Times: Faulty TTRC External RAM
TTRC FAIL LED Flashes Six Times: Faulty IPCB operation on the TTRC module.
.P
Secure FAIL LED Flashes Two Times: No RX_Interrupt Request or TX_Interrupt
   Request signal (should be pulses every 667 uS)
Secure FAIL LED Flashes Four Times: Faulty Secure Module External RAM
Secure FAIL LED Flashes Six Times: Faulty IPCB operation on the Secure
   module.
Audio Diagnostic Errors:
------------------------
A00:  PL Encoder Error
A01:  Alert Tone Encoder Error
A02:  PL Modulation Path Error
A03:  Limiter/Splatter Filter/MAX DEV EEPOT Error
A04:  Receive Audio Path Error
A05:  Receive Squelch Detector Error
A06:  Repeater Squelch Detector Error
A07:  Select Audio (TP1) Error
.P
A08:  Line Audio Path Error
A09:  Repeater Path Error
A0A:  SSCB MC68HC11 Analog-to-Digital Converter system failure
A0b:  Alert Tone Transmit Gate Failure
A0C:  Defective Receive Audio Gate
A0d:  PL Decoder Error
A20:  TTRC MC68HC11 Analog-to-Digital Converter system failure
A21:  TRC Encoder Failure
A22:  TRC Encoder to Line 2 Path Failure
A23:  TRC Encoder to Line 4 Path Failure
A24:  TRC Encoder to Line 2 Path Failure
A25:  Bade Line 2 Gate (No Mute)
A26:  TRC Encoder to Line 2 Path Failure or Line 4 EEpot Failure
A27:  Bad Line 4 Gate (No Mute)
A28:  STAC Encoder Failure or STAC EEpot Failure
.P
A29:  STAC Encoder to Line 2 Path Failure
A2A:  ALC Audio Circuitry Failure
A2b:  Function Tone Decode Circuitry Failure
A2E:  ALC Audio to Tx Audio 4 Path Failure or Tx Level EEpot 
      Failure
A2F:  ALC Audio to TX Audio 2 Path Failure or Tx Level EEpot
      Failure
A30:  Un-ALC Audio to Tx Audio Path Failure
A31:  Failsoft Tone Trunking Mod Audio Path Failure
A32:  Failsoft Codeword Trunking Mod Audio Path Failure or
      Trunking Dev EEpot Failure
A33:  Bad Data/Failsoft Gate
A40:  Secure MC68HC11 Analog-to-Digital Converter system failure
A41:  Secure Alert Tone Encoder/Filter failure
A42:  Secure Coded Modulation Splatter Filter Failure
.P
A43:  Secure Coded Modulation Audio Gate Failure
A44:  Secure Coded Receive Audio Line Filter Failure
A45:  Secure Rx Coded Audio Gate Failure
Special Test Mode Errors:
-------------------------
o80-o89, o8C-o8F: Undefined SSCB Interrupt Vector Fetched
oA0-ob2:  Undefined TTRC Interrupt Vector Fetched
obE:  TTRC Processor Configuration Register Altered
obF:  TTRC EEPROM Codeplug Erased
oC0-od1:   Undefined Secure Interrupt Vector Fetched
odE:  Secure Processor Configuration Register Altered
odF:  Secure EEPROM Codeplug Erased
Undefined Error Codes:
----------------------
U00 through UFF:   Unrecognized Error Code Class
.P
                               STATUS HELP
                              -------------

                   RSS Software Version....R05.21

                   Release Date............11-20-1994

                   Part Number.............RVN-4077G

                   Manual Number...........68P81125E68-F

                   Firmware Upgrade Kit....QVN-1000A
     


.P
 
PL/DPL CODES                                                    
                                                                
The Rx & Tx Code (PL/DPL) information can be entered by using code 
or frequency representation.  After entering  the PL/DPL data, its 
associated representation is displayed beside it.  When an invalid 
code  is  entered,  the  user  is  prompted  and  forced  to  make 
corrections. There is a Maximum of 61 users per table. The Rx Code 
for each user must be a unique PL/DPL code and there are a maximum
of 24 DPL Rx codes allowed for each MCS table.  The Tx Code deter-
mines what PL or DPL code will be repeated when the user (Rx Code)
is decoded. The Tx Code may be set to any PL, DPL, or CSQ code and 
duplicate transmit codes are permitted. The following page contains
a listing of valid  PL and DPL codes.
.P
VALID PL CODES:                                                 
XZ - 67.0  XA - 71.9  WA - 74.4  XB - 77.0  WB - 79.7  YZ - 82.5  
YA - 85.4  YB - 88.5  ZZ - 91.5  ZA - 94.8  1Z -100.0  1A -103.5 
1B -107.2  2Z -110.9  2A -114.8  2B -118.8  3Z -123.0  3A -127.3  
3B -131.8  4Z -136.5  4A -141.3  4B -146.2  5Z -151.4  5A -156.7  
5B -162.2  6Z -167.9  6A -173.8  6B -179.9  7Z -186.2  7A -192.8
M1 -203.5  M2 -210.7  M3 -218.1  M4 -225.7  M5 -233.6  M6 -241.8
M7 -250.3 ( CSQ-Only valid for the Tx code)
VALID DPL CODES:
023 025 026 031 032 043 047 051 054 065 071 072 073 074 114 
115 116 125 131 132 134 143 152 155 156 162 165 172 174 205
223 226 243 244 245 251 261 263 265 271 306 311 315 331 343 
346 351 364 365 371 411 412 413 423 431 432 445 464 465 466 
503 506 516 532 546 565 606 612 624 627 631 632 654 662 664 
703 712 723 731 732 734 743 754
.P
ACCESS

The MCS user is granted access to the station if this field 
is ENABLED.  The Up/Dn  Arrow keys will toggle this option.
If DISABLED, the user is 'turned off' and the user's
Rx Code will not be decoded. 





  


.P
PRIORITY

The MCS module can operate in two modes, Normal Decode Mode
and Priority  Decode Mode.   Upon  power up, reset or after
reprogramming, the MCS board enters the Normal Decode Mode.

In this mode, the state of the priority status parameter is
not checked when decoding a PL or DPL code. As a result, any 
access enabled user (regardless of priority status) can access
the  station; however, pressing F2 will place the MCS module 
in the priority decode mode.  While in the priority mode, the 
MCS module will not decode non-priority users.  This feature
can be used to restrict station access  during special or 
emergency situations.  The default for this field is NO.  The
Up/Dn Arrow keys will toggle this field.
.P
MCS TABLE

The MCS table field allows for entry of an MCS table for editing.
To edit an MCS table enter the number of the MCS table in the
MCS table field.  To add an MCS table enter in a number one greater
than the total number of MCS tables, this will provide a default
MCS table.  If an invalid number is entered the user will be 
flagged and forced to enter a correct MCS table number.

The Slaved To Mode(s) field indicates which modes this MCS table
is slaved to.  If the MCS table is slaved to more than 10 modes 
the individual modes are not listed, only a message indicating
that the table is slaved to more than 10 modes. 
(cont.)
.P
FUNCTION KEY DEFINITIONS

F1 - Provides HELP associated with the MCS table.
F2 - Places the MCS module in the priority decode mode.  While in 
     the priority mode, the MCS module will not decode non-priority
     users.  This feature can be used to restrict station access 
     during special or emergency situations.
F3 - Removes the MCS module from the priority decode mode so that
     all users have access to the station.
F4 - Deletes the current MCS table.  This key only works on the MCS
     table field.  The MCS table cannot be deleted if it is slaved 
     to a mode or if it is the only MCS table.
F5 - Prints the current page.

(cont.)
.P
FUNCTION KEY DEFINITIONS(cont.)

F6 - Adds a user to the end of the user list.  There is a maximum of 
     61 users.
F7 - Delete the user that the cursor is on.  This will move the 
     remaining users up.
F8 - Resets the Elapsed Time and Number of Accesses of the user
     that the cursor is on.
F9 - Resets the Elapsed Time and Number Of Accesses for all of the 
     users in the MCS table.
F10- Exits the MCS table. 
(cont.)
.P
ELAPSED TIME

This field indicates the amount of time a user has accumulated for 
billing purposes.  This field may be reset to zero by either F8 or
F9 function keys. 

NUMBER OF ACCESSES

This field indicates how many times a user has accessed this 
station.  This field may be reset to zero by either F8 or F9 
function keys. The maximum NUMBER OF ACCESSES is 65535. After
the maximum has been reached, subsequent accesses do not increment
the NUMBER OF ACCESSES field.
.P
 
PL/DPL CODES                                                    

                                                                
The PL/DPL information can be entered by using code or frequency
representation.  After entering  the PL/DPL data, its associated
representation is displayed beside it.  When an invalid code is 
entered, the user is prompted and forced to make corrections. If
the RX PL/DPL displays MCS, this indicates that the RX PL/DPL is 
slaved to an MCS table (MCS Table Number field contains an MCS Table
Number) and the RX PL/DPL field is non-editable.    




.P
PL/DPL CODES (cont.)                                                               



VALID PL CODES:                                                 
XZ - 67.0  WZ - 69.3  XA - 71.9  WA - 74.4  XB - 77.0  WB - 79.7
YZ - 82.5  YA - 85.4  YB - 88.5  ZZ - 91.5  ZA - 94.8  ZB - 97.4
1Z -100.0  1A -103.5  1B -107.2  2Z -110.9  2A -114.8  2B -118.8
3Z -123.0  3A -127.3  3B -131.8  4Z -136.5  4A -141.3  4B -146.2
5Z -151.4  5A -156.7  5B -162.2  6Z -167.9  6A -173.8  6B -179.9
7Z -186.2  7A -192.8  M1 -203.5  8Z -206.5  M2 -210.7  M3 -218.1  
M4 -225.7  9Z -229.1  M5 -233.6  M6 -241.8  M7 -250.3  CSQ - 0.0


.P
PL/DPL CODES(cont.)

 


VALID DPL CODES:
023 025 026 031 032 043 047 051 053 054 065 071 072 073 074 114 
115 116 122 125 131 132 134 143 152 155 156 162 165 172 174 205
212 223 225 226 243 244 245 246 251 252 261 263 265 266 271 306
311 315 325 331 343 346 351 364 365 371 411 412 413 423 425 431 
432 445 446 452 455 464 465 466 503 506 516 521 525 532 546 552
564 565 606 612 624 627 631 632 645 652 654 662 664 703 712 723
725 726 731 732 734 743 754

.P
CONNECT TONES

The connect tone is a sub-audible tone transmitted with the mobile's 
clear audio for detection by the station and Central Controller.  One 
or two connect tones may be decoded simultaneously by the station.
Connect Tone 1 is also encoded to the Central Controller during coded
transmissions from the mobile to allow the Central to detect a connect
tone.  Connect Tone 2 will not be encoded to the Central under any 
circumstances.  The valid Connect Tone list is show below. 


Connect Tones:
CT#0 = 105.9 Hz  CT#1 =  76.6 Hz  CT#2 =  83.7 Hz  CT#3 =  90.0 Hz
CT#4 =  97.3 Hz  CT#5 = 116.1 Hz  CT#6 = 128.6 Hz  CT#7 = 138.5 Hz
CSQ  =  0 Hz

.P
PTT PRIORITY

Five editable types of Push-To-Talk's (PTT's) can be prioritized in the 
PTT PRIORITY field: Wireline(W), Local(L), Repeater(R), MRTI(M),  and 
Data(D). The PTT's are entered, by the user, in priority order. Whenever
two or more PTT's are active at the same time, only the PTT with the 
highest priority will be recognized by the station. Only the letters W,
L, R, M, and D, may be entered. The defualt configuration is DWRLM 
(DATA>WIRELINE>REPEATER>LOCAL>MRTI). 

If a PTT is left out of the PTT PRIORITY field the station will NEVER
key as a result of that PTT type going active. For example, if DWR is 
entered, the station will not key as a result of a Local or MRTI PTT.
In this example, Data PTT has higher priority than Wireline PTT, and
Wireline PTT has higher priority than Repeater PTT. 
.P
TIME-OUT-TIMERS
               
There are five types of TIME-OUT-TIMERS: LINE, LOCAL, REPEATER, DATA AND 
MRTI.  Each dictates the amount of time the station may be keyed up by that 
particular method(Line PTT, Local PTT, Repeater PTT, Data PTT or MRTI PTT)
before the station dekeys.  The time-out-timer prevents a particular user
from dominating the station's transmitter. The time-out-time is entered in 
seconds.  The time-out-time must be an integer between 0 and 495.  If any 
other time-out-time is entered, the user will be forced to change it.
.P
RECEIVER CONTROL

This parameter dictates the audio qualifiers needed to unsquelch 
the receiver.  The three kinds of audio qualifiers are S(audio 
squelch), C(PL detect) and A(auxillary detect). The user toggles  
to any combination of the three audio qualifiers.   After toggling 
to an audio qualifier, its description will appear next to it.  For
example if CA is entered, then PL Detect, AUX. Detect will be shown 
next to it.  This means that a PL Detect and an AUX. Detect are required
before the receiver unsquelches.  ON and OFF are also valid choices. 
If ON, the receiver will always unsquelch; if OFF the receiver will never
unsquelch.
.P
REPEATER CONTROL

There are two parameters in this category REPEATER  ACTIVATE and 
REPEATER HOLDIN.  These dictate the audio qualifiers needed to 
activate and hold repeater PTT.  There are three kinds of audio 
qualifiers that may be used S(audio squelch), C(PL detect) and 
A(auxillary detect).   After toggling to an audio qualifier, 
its description will appear next to it.  For example,if CA is 
entered, then PL Detect, AUX. Detect will be shown next to it.
ON and OFF are also valid choices. ON needs no further qualifiers
to activate or hold repeater PTT.  OFF disallows any qualifiers.
.P
RPTR DROP-OUT DELAY

This parameter dictates the amount of time the repeater stays
keyed after the loss of the repeat audio signal.  The drop-out delay
is entered in seconds.  The delay must be an integer between 0 and
495.  All other entries will result in an error and force the user to
make corrections.
.P
ALARM TONES ROUTING

Alarm tones are generated when any of the Reverse Wildcard (RWC) Bits
are active on the MUXBus. Alarms may be routed in two ways: OVER-THE-AIR
and OVER-THE-WIRELINE. Each method may be ENABLED/DISABLED independently
by using the Up/Down arrow keys. The defaults for both OVER-THE-AIR and
OVER-THE-WIRELINE are ENABLED. The alarms are recognized by a number
of consecutive beeps. For example, 6 beeps followed by a brief pause,
followed by 5 more beeps signals that RWC6 (Reflected Power) and RWC5 
(TSTAT Failure) are both active.  
                              ALARMS
   RWC1  Battery Backup                   RWC5  TSTAT Failure  
   RWC2  PA Alarm                         RWC6  High Reflected Power
   RWC3  Synthesizer Out of Lock          RWC7  Low Forward Power
   RWC4  Battery Overvoltage              RWC8  --not defined--
.P
TX AUDIO/EXTERNAL DATA MIXING

This parameter determines whether a particular kind of transmit audio
will be mixed with data audio.  Five kinds of transmit audio may be
mixed with data LINE, LOCAL, REPEAT, MRTI and ID ALARM.  Each audio
can be set to mix with data YES/NO independently by using the Up/Down 
arrow keys.             
.P
PRE-EMPHASIS  DE-EMPHASIS

When ENABLED, clear receive audio is de-emphasized and clear transmit 
audio is pre-emphasized.  This is the default configuration for most 
clear voice applications.
When DISABLED, clear receive and transmit audio signals are not
emphasized.  This allows the station to have a flat repeater frequency
response.

Note:
  It is not possible to selectively disable either pre-emphasis or 
  de-emphasis only. They are simultaneously enabled or disabled.
.P
PA Cutback Allowed

When ENABLED, the station's RF power output will be decreased by
3 dB when operating on battery backup.  When DISABLED, full
power will be supplied from the station during battery operation.
The default for this field is ENABLED.
.P
Mode Power Level

When ENABLED, the power supply, whether from a battery or a.c. source,
will supply 3 dB less than full power when the station is operating
in the mode this field is enabled in.  When DISABLED, full power will
be supplied from the power source. The Default for this field is 
DISABLED.
.P
Rpt TOT DOD Rset

When ENABLED, the stations time-out-timer resets after a drop-out-delay
has been cleared.  This allows for a longer user time with key-rekey
operation.  If DISABLED, the station's time-out-timer does not reset
after a  drop-out-delay has been cleared.  This allows for a shorter
station user time limited by the time-out-timer period. The default 
for this field is ENABLED.                                                           

.P
Tx Code Line Qualifier

When ENABLED, the station does not key on code detect and requires a
guard tone/function tone sequence to key the station during coded and
clear transmission.  When DISABLED, the station will key on code detect.
The default for this field is DISABLED.
.P
MRTI PP Mode

This field sets the tx audio type to a MRTI phone patch.  There are four
possible settings:
       
            -CLEAR             (always transmits out clear audio)
            -CODED             (always transmits out coded audio)
            -RX SLAVED         (transmits out the type of audio that
                                was received)
            -LATCHED           (Once coded information is received code
                                is always sent for the duration of the 
                                phone call)  
The default for this field is RX SLAVED.
.P
MCS TABLE NUMBER

This field indicates which MCS table this mode uses.  If the table
number is set to OFF, then this mode is not slaved to any MCS table
but MCS tables do exist.  If the field shows 'NO MCS' then MCS is not
enabled for this station.  MCS may be enabled via STATION MODEL
OPTIONS SCREEN.  The valid range for this field is 1 - 9.
.P
EDIT MODE INFORMATION

The MODE INFORMATION can be edited via the EDIT MODE INFORMATION
screen. MODE INFORMATION can also be edited in the EDIT CHANNEL
INFORMATION screen, if the mode is slaved to any channel. The Tab/
ShiftTab keys are used to move the cursor between data fields.
The PgUp/PgDn keys are used to move the cursor between pages.
                              
EDIT MODE NUMBER
To VIEW/EDIT a specific mode, use the Up/Down Arrow keys to select
the mode. As the mode number is changed, the screen information is
changed to reflect the newly selected mode. 
.P
DELETING MODES
To delete a specific mode, select the desired mode in the EDIT MODE
NUMBER field, then press the F7 key. The mode will be deleted if the
following criteria are met:
     1) The selected mode is not MODE 00. 
     2) The selected mode is not MODE 01 in a 1 mode codeplug. The
        codeplug must always contain MODES 00 and 01. 
     3) The selected mode is not slaved to any channels.
Once the mode is deleted, all higher-numbered modes will have their 
mode numbers decremented by 1.

Example: Suppose you have a 4-mode station (station contains modes
0,1,2,3,4) and want to delete mode 2. If mode 2 is not slaved to any
channels, select mode 2 in the EDIT MODE NUMBER field, then press F7.
.P
Mode 2 will be deleted, and the old mode 3 will become the new mode 2,
and the old mode 4 will become the new mode 3. Any channels slaved to
old modes 3 or 4, will now be slaved to modes 2 or 3, respectively.
 
INSERTING MODES  
A new mode is created by pressing the F8 key. The positioning of the
new mode is determined by the mode selected in the EDIT MODE NUMBER
field. The new mode is always an exact duplicate of the currently
selected mode, and is placed directly after the currently selected
mode. All higher-numbered modes will have their mode numbers increased
by 1, and any slaved channels will be correctly adjusted.

Example: Suppose you have a 4-mode station (station contains modes
0,1,2,3,4) and you want to create a new mode #4. Select mode 3 in the 
.P
EDIT MODE NUMBER field, then press F8. A duplicate of mode 3 will
be created after mode 3, and the old mode 4 will become mode 5. If
Channel 4 was slaved to the old mode 4, it will now be slaved to
mode 5.                               

BEFORE:  0 1 2 3 4     EDIT MODE NUMBER: 03
         | | | |\ \
AFTER:   0 1 2 3 4 5    

**NOTE: ANY TWO OR MORE MODES THAT MATCH EXACTLY WILL BE CONSOLIDATED
  INTO A SINGLE MODE, WHEN LEAVING THE MODE SCREEN. THIS IS DONE TO 
  CONSERVE CODEPLUG SPACE.
 
.P
ID OVER-THE-WIRELINE

When ENABLED, the ID OVER-THE-WIRELINE allows the Auto ID Callsign to
be sent down the wireline. If a CALLSIGN is entered for the particular 
channel then it will always be sent over the air. The ID OVER-THE-
WIRELINE field is ENABLED/DISABLED by using the Up/Down arrow keys.

The Default is set to DISABLED.
.P
 
REMOTE CALLUP

The Remote Callup Screen contains up to 100 users that may be dialed
and connected to the RSS.  A maximum of 10 users are displayed on 
each page.  Each user entry consists of the following fields:  Number,
Name, Baud Rate, Parity, Data, Stop Bits and Tone/Pulse.  This screen
also contains a status line which indicates parameters of the current 
call-in-progress.  The <TAB> and <BACKTAB> keys are used to move the
cursor through the fields of each user.  The <ENTER> key is used to 
advance the cursor to the next user.  The <PgUp> and <PgDn> keys are
used to move the cursor between pages.  Users may be added or deleted
via the function keys.  Remember to press F8 to save the file after
adding or deleting users.  The above mentioned fields are described
further in the following pages.
.P
Pressing the F9-Auto Answer key gives the user the ability to 
configure a modem for operation at a remote station. It also gives
the ability to re-configure the modem for normal operation. Once
the F9 key is pressed, the user presses F2 to set the modem for
auto-answer (Auto-answer after 1 ring, turn off echo mode, save
to non-volatile modem memory), or F5, To return the modem to it's
normal operating mode (Disable auto-answer, re-enable echo mode,
and save the configuration to non-volatile modem memory). 

NOTE: If you have a non-Hayes Compatible modem or a modem with
configuration switches, this procedure will need to be performed
manually by toggling the correct switches (See your modem owner's 
for the correct procedure). IT IS EXTREMELY IMPORTANT THAT
THE MODEM CONNECTED TO THE STATION HAS ECHO MODE DISABLED!!
.P
Function Key Definitions:
F1 - Provide HELP associated with the Remote Callup screen.
F2 - Dial the number of the user that the cursor is located on.
F3 - Hang up the line connection if the system is currently `On-Line'.
F4 - Indicates the amount of `On-Line' usage time of current call-
     in-progress.  If there is no call-in-progress then the last
     completed call usage time is displayed.
F5 - Print the current page.
F6 - Add a user to the end of the user list.  There is a maximum of
     100 users.
F7 - Delete the user that is currently being highlighted.
F8 - Save the current Remote Callup user list to the `Phone.cfg' file.
F9 - Setup MODEM for Auto-Answer (Remote) or Normal (Local) operation.
F10 -Exit the Remote Callup Screen.
ALT-F5 -Terminal Mode: Allows user to type commands to the modem.
.P
REMOTE CALLUP (cont.)

Status Line:

The Status Line is a display only line to indicate information about
the current communication session.  The Status Line indicates current
dialing status (Off-Line, Busy, Dialing, No-Carrier or On-Line),
communication port parameters (Serial Port, Baud Rate, Parity, Data
Bits and Stop Bits), start of call, current time and pass number 
(current attempt to establish connection).  The Serial Port may be
changed via the Computer Configuration Menu which is F9 from the Main
Menu.  The other port parameters may be changed on a per user basis 
from this screen.

.P
REMOTE CALLUP (cont.)

Number:

The Number field is the telephone number that is to be dialed.  A 1-30
character field must be entered.  The digit/characters 0-9 # * A B C D
- , ! are used to specify the number to dial.  The characters A B C D
# * represent specific tone pairs and therefore can be used only when
tone dialing is selected.  These symbols are ignored when pulse dial-
ing is used.  The hookflash dial modifier `!' issues a flash (hook-
flash) signal, which causes the modem to hang up for 1/2 second, then
reconnect.  This feature can be used to access such PBX features as 
call transfer.  The `,' modifier in the Number field causes the modem
to pause for 2 seconds before processing the next character symbol in
the Number field.  The comma is frequently inserted after the `9'
.P
REMOTE CALLUP (cont.)

Number: (cont.)

(digit generally used to gain outside access from a PBX) to allow 
sufficient time for the dial tone to occur before the modem dials the 
telephone number.  Multiple commas can be used to produce longer
pauses.  a dash `-' can be used to separate sections of the number,
however it is ignored when the number is dialed.  The following is an
example of a valid number: 9,255-2368 !,#71234
This number instructs the modem to use 9 to access a number outside 
a PBX, pause before dialing, dial the number 555-2368, enter a hook-
flash, pause and issue the PBX transfer code #7 before dialing exten-
sion number 1234.
.P
REMOTE CALLUP

Name:

The Name field is a descriptor for the number that is to be dialed.  
This field may be left BLANK or up to 10 characters may be entered.
If an embedded blank is encountered, it will be replaced with an
underscore character.
.P
REMOTE CALLUP

Baud Rate:

The Baud Rate field is based on the rate of transmission between the
modem and the local computer and the rate from the modem across the
telephone link to the remote system.  Baud Rate is expressed in
bits-per-second (bps).  The four choices 1200, 2400, 4800 and 9600 
are selected by use of the Up/Dn arrow keys.  The default is
1200 bps.
.P
REMOTE CALLUP

Parity:

The Parity field indicates the type of Parity to be used in sending 
data.  The three choices NONE, EVEN and ODD are selected by use of
the Up/Dn arrow keys.  The default is NONE.
.P
REMOTE CALLUP

Data Bits:

The Data Bits field indicates the number of Data Bits to be sent with
each character.  The two choices 7 and 8 are selected by use of the 
Up/Dn arrow keys.  The default is 8.


.P
REMOTE CALLUP

Stop Bits:

The Stop Bits field indicates the number of Stop Bits to be sent with
each character.  The two choices 1 and 2 are selected by use of the 
Up/Dn arrow keys.  The default is 1.


.P
REMOTE CALLUP

Tone / Pulse:
 
The Tone / Pulse field indicates whether TONE or PULSE dialing should
be used.  This field is dependent upon the type of phone line being
used. The two choices TONE and PULSE are selected by use of the Up/
Dn arrow keys.  The default is TONE.


.P
REMOTE CALLUP

Network Controller:

The Network Controller allows the RSS to connect to different types
of network access systems.  The five choices are BLACKBOX, HEATHKIT,
BAYTECH, GENERIC and NONE.  If NONE is entered then no network may
accessed.  GENERIC is any network controller that is not in the list.




.P
REMOTE CALLUP

Function Key Definitions:

F1  - Provide HELP associated with the Remote Callup screen.
F3  - Sends the entered network password or command to the controller
      specified in the Network Controller field.
F5  - Print the current page.
F8  - Save the current Network Controller settings to the 'MSF.CFG' file.
F10 - Exit the Network Controller Screen.
.P
REMOTE CALLUP

Password / Command:

This field is for the RSS user to enter in a network access password
or command to send to the specified Network Controller.  To send the
Password / Command to the Network Controller it is necessary to press
the <F3> key.  The Network Controllers' response to the Password / 
Command will then be displayed.
 
.P
TERMINAL MODE

This screen is used to converse directly with the modem. All characters
are transmitted to the modem as they are typed. Printable characters are
printed to the screen as they are received from the modem.

BREAK KEY
The F8 Key is used to send a break signal to the modem. When the F8
key is pressed the modem holds the Transmit Data (TD) signal active
(SPACE) for the user-defined BREAK Duration.

This command is used for various purposes, depending on the equipment
being addressed. For example: some network controllers use the 
sequence BREAK QQQ in order to signal to the controller that you are
ready to switch to a different station (or port on the controller).
The BREAK Duration can be changed in the SERIAL PORT CONFIGURATION
SCREEN.
.P
ECHO MODE

The F8 Key  is used to toggle the terminal echo mode. 
Normally, the ECHO MODE is disabled so that the keys pressed only
appear on the screen after they are repeated by the modem. If the
modem you are using has the echo mode turned off, you will be unable
to see your keystrokes with the ECHO MODE disabled. In this case
press F8,  and your keystrokes will be echoed to the screen as they
are typed.

IPCB/MODEM MODE

The terminal mode screen is capable of sending characters in two 
formats : IPCB or MODEM. 
.P

The IPCB Mode is used to converse with the MSF station. In this 
mode all characters are not transmitted until the ENTER key is 
pressed. The MSF requires IPCB commands to be tightly packed 
together in order to be recognized.

In the MODEM Mode all characters are transmitted as they are typed.
.P
 
PRINT CODEPLUG DATA

The PRINT function is used to produce permanent records of the station
configuration.  A printer is required and should be connected to your
computer per your computer user's manual.  Graphics capability is NOT 
required.  

The printer must be hooked to the parallel port output of your computer.
Before printing make sure the computer paper is aligned properly.  When
you are ready for printing Press the F9 function key.





.P
 
SAM (Station Access Module) Menu

F1- This key in any menu will bring up a help screen for the
    current screen or for the current editable field on a 
    working screen. 
F3- This key will display one SAM Mode or Local SAM Mode.
F4- This key will display one SAM Action Table.
F5- This key will display the SAM Action Table Conditions.
F6- This key will display the SAM Encoder Sequences.
F7- This key will display SAM Wildcard Inputs.
F8- This key will display the SAM Encoder/Decoder Schemes.
F9- This key will display SAM Wildcard Outputs.
F10-This key will return the program to the View / Edit Menu.
The following is an example on how to configure SAM for Automatic
Repeater Access. 
.P
Repeater operation of the station is disabled by default - the Repeater
Knockdown bit on the MUXbus is active. In order to allow repeater 
operation, i.e. access the repeater, subscriber radios and/or dispatch
equipment automatically send a signalling sequence at the beginning of
every transmission. The signalling sequence can be an MDC1200 sequence,
a Select V sequence, or a DTMF sequence. The following is an example of 
how the SAM board would be programmed to do Automatic Repeater Access
in Mode 1 using a ZVEI Select V sequence received via the station 
receiver.

SAM Mode Tables Programming (F3 from SAM MENU):
     SAM MODE NUMBER           1
     REPEATER KNOCKDOWN        ENABLED
     TONE DECODER              ZVEI
     TONE INPUT                RECEIVER 1
.P
SAM Mode Tables Programming (Cont.):
     TONE DECODER TARGET       1
     TARGET                    12345
     ACT TBL                   1
SAM Action Tables Programming (F4 from SAM MENU):
     ACTION TABLE NUMBER       1
 
     ACTION #1
     CLRMUXQUAL
     MUXADDR                   5
     MUXDATA                   2
     QUALADDR                  1
     QUALMASK                  8
     TIME                      10
.P
This action will deactivate RPT_KD (MUXbus Address 5, Data 2) as long as
RPT_PTT (MUXbus Address 1, Data 8) is active, plus 10ms (TIME field). 
OPERATION SEQUENCE:
1. The station is in Mode 1 and RPT_KD is active. The mobile keys up,
 automatically sending ZVEI sequence 12345.
2. The SAM board decodes ZVEI sequence 12345, compares it to its Mode 1
 tone decoder target(s) and finds a match with Tone Decoder Target 1.
3. Since Action Table 1 is "tied to" Target 1, the SAM board executes
 Action Table 1. Action Table 1, as shown programmed above, will make 
 RPT_KD go inactive, allowing repeater operation, as long as RPT_PTT is
 present. NOTE: RPT_PTT will be active as long as the station has the
 conditions required for Repeater Unsquelch.
.P
4. The mobile dekeys removing the conditions needed for Repeater 
 Unsquelch, thereby causing RPT_PTT to go inactive. The SAM board sees
 RPT_PTT go inactive and activates RPT_KD 10ms later, disabling repeater
 operation. 

(See Appendix F in the FIELD PROGRAMMER MANUAL for more examples
 of SAM usage.)
.P
SAM Mode Number

This field allows SAM Mode & Local SAM Mode numbers to be entered. 

A SAM Mode can only be created when a new Station Mode is added.  The
SAM Mode created will be the same number as the Station Mode that was 
created.  Any references to Local SAM Modes or SAM Modes in the SAM Action
Tables will be updated if a SAM Mode or Local SAM Mode is created/deleted.
If two or more Station Modes are found to be identical then the user 
will be asked if the duplicate Station Mode should be deleted. This will
cause deletion of the corresponding SAM Mode.  If the SAM Mode to be 
deleted is referenced in a SAM Action Table then the Station & SAM Mode
deletion is cancelled.                    
.P
If a SAM Mode number is entered that is greater than the number of 
Station Modes then that SAM Mode is considered to be a Local SAM Mode.
The only Modes that may be created or deleted from this screen are 
Local SAM Modes.  This is done by use of the F6 & F7 function keys.
A Local SAM Mode can only be deleted from this field and only if a 
new SAM Mode number has not been entered. 

The F8 function key is used to edit the SAM Action Table.  This key is
only valid on an Action Table field.
.P
Repeater Knockdown:

This toggle field indicates what the initial status of the Repeater 
Knockdown bit (RPT KD) on the MUXbus will be set to upon switching
to a SAM Mode or a Local SAM Mode. This field is changed by use of 
the Up/Down arrow keys.  If ENABLED, the Repeater Knockdown bit is 
initially set and no repeater operation is allowed.  If DISABLED, 
the Repeater Knockdown bit is cleared and repeater operation is 
allowed.
.P
Tone Decoder

Indicates which Tone Decoder scheme is used in this Mode.

This field allows the Tone Decoder to be toggled between the
following values: 
ZVEI    - ZVEI standard tone decoding scheme
ZVEIFR  - ZVEI french tone decoding scheme
ZVEIMOD - ZVEI modified tone decoding scheme
CCIR    - CCIR standard tone decoding scheme
CCIRMOD - CCIR modified tone decoding scheme
EEA     - EEA tone decoding scheme
CUSTOM  - Customized tone decoding scheme
(cont.)
.P
See the SAM Encode/Decode screen for setting the parameters
of each decoding scheme.

If DISABLED is selected then all of the Targets associated with
the Tone Decoder will be cleared along with the Receiver.

If a valid Tone Decoder scheme is entered then when the SAM's Tone 
Decoder  has decoded a message, it will compare this message against 
a list of words which are called 'Targets'. If a match is found, the 
SAM board will execute a sequence of actions specified by the matching 
Targets corresponding SAM Action Table number.



.P
Tone Input

This field specifies which input the SAM Tone Decoder will monitor. 
The choices are RECEIVER 1, RECEIVER 2, or LINE.  A fourth choice,
DIVERSITY, is given if the SAM board is version 2.xx or greater.
These may be selected by use of the UP/DOWN arrow keys.
  
.P
Tone Decoder Targets

TARGET:
This field defines the sequence of tones that must be matched to execute
the action table.  Each tone in the sequence is specified as a hex number
(0 - E) which corresponds to a particular frequency for the current 
tone decoder signalling scheme.  This correspondence is defined in the SAM
Encode/Decode screen. Each Target is allowed a maximum of seven tones.  
Wildcards are allowed and are indicated by an 'X'.  The SAM Tone Decoder 
will interpret an 'X' as a match for any tone number.  For example, the 
sequences '12345' and '12045' will both match the Target '12X45'. 
Note: The order of the Targets in the list is important to the SAM'S tone
      decoder and will be adjusted automatically by the field programmer.
      i.e. Longer Targets must be listed before shorter Targets.
.P
ACT TBL (Action Table)

The Action Table field describes which SAM Action Table will be executed 
when the Decoder Target matches the tones sent on the wireline. 
A current Action Table number or an Action Table number that
is one greater than the current number of existing Action Tables may be
entered (valid entries for this field are displayed in the message window).
If an Action Table number is entered that does not exist then the user 
will get a prompt to create an empty Action Table or a duplicate Action 
Table.  After the Action Table number is entered the user will be taken
to the Action Table screen to edit the Action Table.   


.P
GROUP

The group scheme defines what group scheme has to be used with the
Target.  The SAM board supports two group calling methods. Selection of 
the group calling method is done via the UP/DOWN arrow keys. The field may
be toggled between the following values: N = NONE, S = STANDARD, E = 
EXPANDED.  If 'S' is selected then the Group Target requires the following
standard rule:  Once the 'Group Tone' (defined in the SAM Encode/Decode 
tables for each valid scheme) is detected, all following tones in the Target
must also be Group Tones for a Group Target match to occur.  The start of a
Group Tone sequence can be detected in any position defined by the Group 
Target (see help for GR TAR field).  If 'E' is selected (expanded group 
call), then the Group Target requires that Group Tones are allowed only in 
marked positions and the rest of the tones must match the Target. If 'N' is 
selected then no group calling method will be used. 
.P
GR TAR (Group Target)

This field specifies the Group Target. The letter 'G' indicates
where a Group Tone is to be present in the Target.  A '-' 
indicates that no Group Tone is to be present at the corresponding 
location in the Target.  If Group is set to 'N' then no Group
Tones are allowed to be entered.  If Group is set to 'S' then
the first Group Tone encountered in the Group Target MUST be followed 
by Group Tones.  If Group is set to 'E' then Group Tones may
occur anywhere in the Group Target.  
The length of the Group Target must match the length of the Target.

.P
GR ACT TBL (Group Action Table)

The Group Action Table field describes which SAM Action Table will be 
executed when the Group Target matches the message sent on the wireline. 
If the Action Table field is set to BLANK then no Action Table will be
executed.  A current Action Table number or an Action Table number that
is one greater than the current number of existing Action Tables may be
entered (valid entries for this field are displayed in the message window).
If an Action Table number is entered that does not exist then the user 
will get a prompt to create an empty Action Table or a duplicate Action 
Table.  After the Action Table number is entered the user will be taken
to the Action Table screen to edit the Action Table.  If the Group Scheme
is set to 'N' then this field should be set to '--'.
.P
Binary Encoder

This field allows the Binary Encoder to be toggled between ENABLED
or DISABLED by use of the Up/Down arrow keys.

If ENABLED is selected then the assigned encoder can be used by
the SAM otherwise the encoder will be deactivated.





.P
Binary Decoder

This field allows the Binary Decoder to be toggled between DISABLED
and MDC1200 by use of the Up/Down arrow keys. 

If the field is toggled to DISABLED then all of the Targets and
the Binary Input field are cleared and are no longer editable.

If the field is toggled to MDC1200 then the MDC1200 binary signalling 
scheme will be used for decoding in the current mode.  When the
SAM's binary signalling decoder has decoded a message, it will compare
this message against a list of binary signalling words which are
called 'Targets'.  If a match is found, the SAM board will execute a
sequence of actions specified by the matching Targets corresponding
SAM Action Table number.
.P
Binary Input

This field specifies which input the SAM Binary Decoder will monitor. 
The choices are RECEIVER 1, RECEIVER 2, or LINE.  If the SAM board
is version 2.xx or greater a fourth choice, DIVERSITY, is given.
These may be selected by use of the UP/DOWN arrow keys.
  
.P
SAM (Station Access Module) Wildcard Inputs
The SAM Wildcard Inputs screen defines 16 Wildcard Inputs and 2 Front
Panel Inputs (Function A and Function B).  Each Wildcard Input and  
Front Panel Input contain the following fields: Active, Input Type, 
Input Response, Active Action Table and Inactive Action Table.

I/O Configuration  
This is a non-editable field that indicates how the Wildcard Inputs and
Front Panel Inputs of the Station Access Module are configured.  There 
are four possible choices: EXP_DATA, DATA, DIAGNOSTIC or WILDCARD. This 
field is changed whenever function keys F2, F3, F4 or F6 are invoked 
to change to a new setup.  The status of this field determines which
fields of the Wildcard Inputs and Front Panel Inputs are available for
editing.
.P
Input Type
The Input Type field describes how the Wildcard Input or Front Panel 
Input has been configured.  This field is edited by use of the Up/
Down arrow keys.  The two Front Panel Inputs may be toggled between 
the following choices: SWITCH or BLANK.  SWITCH indicates that the 
Front Panel Input is connected to an input.  Valid Wildcard Inputs 
are as follows: If the I/O Configuration field is EXP_DATA then the 
Input Type field is non-editable.  If the I/O Configuration field is
DATA and the Input Type field is set to DATA then the Input Type 
field is non-editable, if the Input Type field is not set to DATA 
then the Input Type field may be toggled between WILDCARD and BLANK.
If the I/O Configuration field is DIAGNOSTIC or WILDCARD then the 
Input Type field may be toggled between the following values: 
EXP_DATA (only on Wildcard Inputs 0, 1, 3, 4, 5, 10, 11, 12, 13), DATA
(only on Wildcard Inputs 0, 1, 3, 4, 5, 10, 11, 12, 13), DIAGNOSTIC
.P
(only on Wildcard Inputs 1, 11, 12, 13), WILDCARD or BLANK.  If the
Input Type field is set to BLANK then the following fields are non-
editable: Active, Input Response, Active Action Table and Inactive
Action Table.  If the Input Type field is set to BLANK then that 
input is never monitored by the SAM board.

Definition of function keys:

Note: Pressing F2, F3, F4, F6 to change setups will also change the
      SAM Wildcard Outputs screen to the same setup.  This will 
      delete all Action Tables referenced in the SAM Wildcard Input
      screen provided the Action Table is not referenced in any
      of the SAM Mode Tables.  All references to Action Tables in the
      SAM Mode Tables will be updated to account for any Action Tables
      that are deleted.
.P
F1 - Provide Help

F2 - Set the I/O Configuration to WILDCARD.  The Input Type field is 
     set to BLANK for all of the Wildcard Inputs and the Front Panel 
     Input.

F3 - Set the I/O Configuration to DATA.  The Input Type field is set
     to DATA for the following Wildcard Inputs: 0, 1, 3, 4, 5, 10,
     11,12 and 13.  The remaining Input Type fields are set to BLANK.

F4 - Set the I/O Configuration to EXP_DATA.  The Input Type field is set
     to EXP_DATA for the following Wildcard Inputs: 0, 1, 3, 4, 5, 10,
     11,12 and 13.  The remaining Input Type fields are set to BLANK.
.P
F5 - Print the current page.

F6 - Set the I/O Configuration to DIAGNOSTIC.  The Input Type field is
     set to DIAGNOSTIC for the following Wildcard Inputs: 1, 11,12 and
     13.  The remaining Input Type fields are set to BLANK.

F8 - If in the Active or Inactive Action Table field and a valid Action
     Table is entered then that Action Table will be displayed and 
     available for editing.  When in the Action Table it is possible
     to switch to the alternate state by pressing the F8 function key.

F10  Exit the SAM Wildcard Input screen and return to the SAM menu.
.P
ACTIVE

The Active field determines if the Wildcard Input or Front Panel Input
is active high or active low.  This field is non-editable if the Input
Type field = EXP_DATA, Input Type = DATA or if on a Front Panel Input
line.  This field may be toggled between the following values: HIGH and
LOW.  If the Wildcard Input or Front Panel Input makes a transition to
its Active state then the Input Response and Active Action Table fields
will be executed if they are defined (not BLANK).  If the Wildcard Input 
or Front Panel Input makes a transition to its Inactive state then the 
Input Response will be cancelled and the Inactive Action Table will be 
executed if it is not BLANK.
.P
Input Response

The Input Response field describes a specific event that is to be 
executed when the Wildcard Input or Front Panel Input makes a transition
to the Active State.  If the Input Type field is set to EXP_DATA, DATA or
DIAGNOSTIC then this field is set to a unique Input Response which is
dependent on the Wildcard Input and is non-editable.  If the Input
Type field is set to WILDCARD then this field may be set to any valid
Input Response.  If the Input Response field is set to BLANK then this
field is non-editable.  The following is a list of Input Responses that
may be toggled through if the Input Type field is set to WILDCARD:
.P
Input Response  Description
---------------------------
TX PL INH       Send current transmission without PL.
RFLOOP EN1      Indicate to the MSF that the GCC / BSC needs to perform
                an RF Loopback test of the base station transmitter and
                receiver combination.
RFLOOP EN2      Sets up the base station in loopback mode.
SEIZE/REL       Indicate to the MSF that the GCC / BSC has taken control
                of base station upon command from the trunking central
                controller.
DATA PTT        Indicate to the MSF base station that the GCC/ BSC 
                desires to key up the base station transmitter.
RX MUTE         Mute receive audio to the console.  Used by GCC / BSC
                in data / voice applications only.
.P
Input Response  Description  (cont.)
---------------------------
MAJORFAULT      Indicates a major fault exists in the BSC.  The MSF
                will ignore all other request from the BSC.
ALARM RES       Used to test each alarm output for proper operation.
STN RESET       Force the MSF base station into a full reset.
BLANK           No input response is executed.

.P
Active Action Table

The Active Action Table field describes which Action Table will be 
executed whenever a Wildcard Input or Front Panel Input makes a 
transition to its Active state.  If the Action Table field is set
to BLANK then no Action Table will be executed.  If the Input Type
field is set to BLANK then this field is non-editable.  A current
Action Table number or an Action Table number that is one greater
than the current number of existing Action Tables may be entered 
(valid entries for this field are displayed in the message window).
If an Action Table number is entered that does not exist and the 
Inactive Action Table is set to BLANK then the user will get a prompt
to create an empty Action Table or a duplicate Action Table.  After
the Action Table number is entered the user will be taken to the
Action Table screen to edit the Action Table.  If an Action Table
.P
number is entered that does not exist and the Inactive Action Table
is not set to BLANK then the user will get a prompt to create an 
empty Action Table or duplicate an existing Action Table.  After 
the Action Table number is entered the user will be taken to the
Action Table screen to edit the Action Table. When in the action 
table screen, it is possible to toggle between the alternate
states' Action Table (if it exists) by pressing the F8 function key.

Note:  If an Active Action Table is entered it is recommended that an
       Inactive Action Table also be entered to cancel the actions
       executed by the Active Action Table.
.P
Inactive Action Table

The Inactive Action Table field describes which Action Table will be 
executed whenever a Wildcard Input or Front Panel Input makes a 
transition to its Inactive state.  If the Action Table field is set
to BLANK then no Action Table will be executed.  If the Input Type
field is set to BLANK then this field is non-editable.  A current
Action Table number or an Action Table number that is one greater
than the current number of existing Action Tables may be entered 
(valid entries for this field are displayed in the message window).
If an Action Table number is entered that does not exist and the 
Active Action Table is set to BLANK then the user will get a prompt
to create an empty Action Table or a duplicate Action Table.  After
the Action Table number is entered the user will be taken to the
Action Table screen to edit the Action Table.  If an Action Table
.P
number is entered that does not exist and the Active Action Table
is not set to BLANK then the user will get a prompt to create an 
empty Action Table, or duplicate an existing Action Table.  After 
the Action Table number is entered the user will be taken to the 
Action Table screen to edit the Action Table. When in the action 
table it is possible to toggle between the alternate states' Action 
Table (if it exists) by pressing the F8 function key.

Note:  If an Inactive Action Table is entered it is recommended that an
       Active Action Table also be entered to cancel the actions
       executed by the Inactive Action Table.
.P
SAM (Station Access Module) Wildcard Outputs
The SAM Wildcard Outputs screen defines 24 Wildcard Outputs (0 - 23).
For each Wildcard Output there are 3 fields that describe it.
They are OUTPUT TYPE, ACTIVE and OUTPUT ENABLE CONDITIONS.

I/O CONFIGURATION
This is a non-editable field that indicates how the Wildcard Outputs
of the Station Access Module are configured. There are four possible
values: EXP_DATA, DATA, DIAGNOSTIC or WILDCARD. This field is changed
whenever function keys F2, F3, F4 or F6 are pressed to change to a new
setup. The status of this field determines how the 24 Wildcard Outputs
are configured and which fields are available for editing.



.P
OUTPUT TYPE
The Output Type field describes how the Wildcard Output has been configured.
This field is edited by use of the Up/Down arrow keys. If I/O Configuration
is EXP_DATA, this field is not editable. Also, if I/O Configuration is DATA,
this field is not editable for Outputs 15, 17, 18, 19 and 20. Otherwise, the
following describes what values this field may be set to.

      Wildcard Output      Output Type (allowed Values)
      ---------------      ----------------------------------------
      0 - 15, 17, 19       WILDCARD, DATA, EXP_DATA*, DIAGNOSTIC, blank
      16, 21, 22, 23       WILDCARD, DATA, DIAGNOSTIC, blank
           18              WILDCARD, DIAGNOSTIC, blank
           20              WILDCARD, DATA, EXP_DATA, blank

* Changing one of outputs 0-14 to EXP_DATA changes all of 0-14 to EXP_DATA
.P
Only if the Output Type field is set to WILDCARD are the Active and
Output Enable Conditions fields made accessable and editable. Otherwise,
the user cannot change them. If the Output Type field is made blank then
the SAM board doesn't switch that output.

Definition of function keys:

Note: Pressing F2, F3, F4, F6 to change setup will also change the
      SAM Wildcard Inputs to the same setup.  This will
      delete all Action Tables referenced in the SAM Wildcard Input
      screen provided the Action Table is not referenced in any
      of the SAM Mode Tables.  All references to Action Tables in the
      SAM Mode Tables will be updated to account for any Action Tables
      that are deleted.
.P
F1 - Provide Help

F2 - Set the I/O Configuration to WILDCARD. All fields are cleared.
     The Output Type field for Wildcard Output 0 is set to WILDCARD.

F3 - Set the I/O Configuration to DATA. All Wildcard Outputs are changed
     to their default DATA configuration values (described below).

F4 - Set the I/O Configuration to EXP_DATA. All Wildcard Outputs are changed
     to their default EXP_DATA configuration values (described below).

F5 - Print the current page.



.P
F6 - Set the I/O Configuration to DIAGNOSTIC. All Wildcard Outputs are
     changed to their default DIAGNOSTIC configuration values (described
     below).

F10- Exit the SAM Wildcard Output screen and return to the SAM menu.

                    DEFAULT CONFIGUATIONS

            EXP_DATA              DATA                DIAGNOSTIC 
Wildcard      Output Enable        Output Enable        Output Enable
Output Active  Conditions    Active Conditions   Active  Conditions
  0.    HIGH   ALM BIT 0      HIGH  DC PWR ALM    HIGH   DC PWR ALM
  1.    LOW    ALM BIT 1      LOW   R1 SYN ALM    LOW    R1 SYN ALM
  2.    LOW    ALM BIT 2      LOW   RCVR1 ALM     LOW    RCVR1 ALM
  3.    LOW    ALM BIT 3      LOW   AC MN FAIL    LOW    AC MN FAIL
.P
            EXP_DATA               DATA                DIAGNOSTIC 
  4.    LOW    ALM BIT 4      LOW   IPA RF ALM    LOW    IPA RF ALM
  5.    LOW    ALM BIT 5      LOW   RSSI/DIV      LOW    RSSI/DIV
  6.    LOW    ALM BIT 6      LOW   FIN PA RF     LOW    FIN PA RF
  7.    LOW    ALM BIT 7      LOW   SSCB ALM      LOW    SSCB ALM
  8.    LOW    ALM BIT 8      LOW   LOOPB CIRC    LOW    LOOPB CIRC
  9.    LOW    ALM BIT 9      LOW   RCVR2 ALM     LOW    RCVR2 ALM
 10.    LOW    ALM BIT 10     LOW   ALM INT F     LOW    ALM INT F
 11.    LOW    ALM BIT 11     LOW   R2 SYN ALM    LOW    R2 SYN ALM
 12.    LOW    ALM BIT 12     LOW   RV PWR ALM    LOW    RV PWR ALM
 13.    LOW    ALM BIT 13     LOW   BATT OVOLT    LOW    BATT OVOLT
 14.    LOW    ALM BIT 14     LOW   TX SYN ALM    LOW    TX SYN ALM
 15.    LOW    LN PTT SEN     LOW   LN PTT SEN    LOW    SEC BD ALM
 16.     not defined          LOW   PTT DEKEY     LOW    PTT DEKEY
 17.    LOW    RX PL DET      LOW   RX PL DET     LOW    DR RF PWR
.P
            EXP_DATA            DATA                DIAGNOSTIC 
 18.     not defined           not defined        LOW    TTRC ALM
 19.    LOW    CARR DET       LOW   CARR DET      LOW    RED RF PWR
 20.    LOW    RPTR PTT       LOW   RPTR PTT       not defined 
 21.     not defined          LOW   RPGM STN      LOW    RPGM STN
 22.     not defined          LOW   DOOR ALM      LOW    DOOR ALM
 23.     not defined          LOW   ACC DIS       LOW    ACC DIS
.P
ACTIVE

The Active field determines if the Wildcard Output is active high or
active low. This field is editable only if the Output Type is WILDCARD.
If editable, it may be toggled between the following values: HIGH and
LOW. This field must be HIGH if Output Enable Conditions is set to
DC PWR ALM (DC POWER ALARM). It must be LOW if Output Enable Conditions
is set to ALM INT F (ALARM INTERFACE FAULT).






.P
OUTPUT ENABLE CONDITIONS

The Output Enable Conditions field specifies an alarm, control or MUXbus
condition (up to 3 allowed). When the condition(s) is met, the SAM board
causes the Wildcard Output to switch to its Active state. This field is
only editable if the Output Type field is set to WILDCARD.

MUXbus conditions have the following format:  Mux Address, Compare Criteria

Where: Mux Address      : a decimal number between 0 and 15
       Compare Criteria : four characters, where each character can be 0, 1
                        or X (ie. don't care).
Example:    14,XX10

This means the output goes active when MUXbus address 14, b0 = 0 and b1 = 1.
.P
If more than one MUXbus condition is present for this output, an additional
field containing AND or OR is required, which describes the combining logic
for these conditions.

Example:    14,XXX1  2,1XXX  OR

This means the output goes active when MUXbus address 14, b0 = 1 OR
                                       MUXbus address  2, b3 = 1.

The following is a list of the alarms and controls along with their
abbreviations. Their descriptions may be found in the manual.



.P
     Alarm/Control              Abbreviation

     DC POWER ALARM             DC PWR ALM 
     RX1 SYNTHESIZER ALARM      R1 SYN ALM
     RECEIVER 1 ALARM           RCVR1 ALM
     AC MAINS FAILURE ALARM     AC MN FAIL
     IPA RF ALARM               IPA RF ALM
     RSSI/DIVERSITY ALARM       RSSI/DIV
     FINAL PA RF ALARM          FIN PA RF
     STATION CONTROL BD ALARM   SSCB ALM
     LOOPBACK CIRCUIT ALARM     LOOPB CIRC
     RECEIVER 2 ALARM           RCVR2 ALM
     REVERSE POWER ALARM        RV PWR ALM
                        (cont.)
.P
     RX2 SYNTHESIZER ALARM      R2 SYN ALM
     ALARM INTERFACE FAULT      ALM INT F
     BATTERY OVERVOLTAGE ALARM  BATT OVOLT
     TX SYNTHESIZER ALARM       TX SYN ALM
     LINE PTT SENSE             LN PTT SEN
     PTT DEKEY ALARM            PTT DEKEY
     RX PL DETECT               RX PL DET
     CARRIER DETECT             CARR DET
     REPEATER PTT               RPTR PTT
     REPROGRAM STATION          RPGM STN
     DOOR ALARM                 DOOR ALM
     ACCESS DISABLE             ACC DIS
     REDUCED RF POWER ALARM     RED RF PWR
                        (cont.)
.P
     DRIVER RF POWER ALARM      DR RF PWR
     SECURE BOARD ALARM         SEC BD ALM
     TTRC BOARD ALARM           TTRC ALM
     ALARM WORD BIT n           ALM BIT n (where n = 0..14)

Note: If one of outputs 0 - 14 is made an ALARM WORD BIT, then outputs 0 - 14
      are all changed to ALM BIT n (where n = 0..14). Conversely, if an
      output is changed from an ALARM WORD BIT to something else, then all
      remaining outputs in 0 - 14 range revert to their default values,
      depending on current I/O CONFIGURATION.





.P
TRIGGER CONDITIONS

The Trigger Conditions fields specify an alarm, control or MUXbus
condition (up to 3 allowed). When the condition(s) is met, the SAM board
causes the specified Action Table to be executed. 

If the Trigger Condition field contains UNKNOWN, this signifies that 
a section of the SAM codeplug has been programmed with an undefined
Action Table Condition. For example, if  a GCC-480, General Communications
Controller, is present in the station, special factory programming was 
required to ensure proper function. The UNKNOWN Condition may be deleted,
but may not be added with the present RSS.
.P
MUXbus conditions have the following format:  Mux Address, Compare Criteria

Where: Mux Address      : a decimal number between 0 and 15
       Compare Criteria : four characters, where each character can be 0, 1
                        or X (ie. don't care).
Example:    14,XX10

This means the Active Action Table gets executed when
                           MUXbus address 14, b0 = 0 and b1 = 1.
.P
If more than one MUXbus condition is present on this line, an additional
field containing AND or OR is required, which describes the combining logic
for these conditions.

Example:    14,XXX1  2,1XXX  OR

This means the Active Action Table gets executed when 
                           MUXbus address 14, b0 = 1 OR
                           MUXbus address  2, b3 = 1.

The following is a list of the alarms and controls along with their
abbreviations. Their descriptions may be found in the manual.



.P
     Alarm/Control              Abbreviation

     DC POWER ALARM             DC PWR ALM 
     RX1 SYNTHESIZER ALARM      R1 SYN ALM
     RECEIVER 1 ALARM           RCVR1 ALM
     AC MAINS FAILURE ALARM     AC MN FAIL
     IPA RF ALARM               IPA RF ALM
     RSSI/DIVERSITY ALARM       RSSI/DIV
     FINAL PA RF ALARM          FIN PA RF
     STATION CONTROL BD ALARM   SSCB ALM
     LOOPBACK CIRCUIT ALARM     LOOPB CIRC
     RECEIVER 2 ALARM           RCVR2 ALM
     REVERSE POWER ALARM        RV PWR ALM
                        (cont.)
.P
     RX2 SYNTHESIZER ALARM      R2 SYN ALM
     ALARM INTERFACE FAULT      ALM INT F
     BATTERY OVERVOLTAGE ALARM  BATT OVOLT
     TX SYNTHESIZER ALARM       TX SYN ALM
     LINE PTT SENSE             LN PTT SEN
     PTT DEKEY ALARM            PTT DEKEY
     RX PL DETECT               RX PL DET
     CARRIER DETECT             CARR DET
     REPEATER PTT               RPTR PTT
     REPROGRAM STATION          RPGM STN
     DOOR ALARM                 DOOR ALM
     ACCESS DISABLE             ACC DIS
     REDUCED RF POWER ALARM     RED RF PWR
                        (cont.)
.P
     DRIVER RF POWER ALARM      DR RF PWR
     SECURE BOARD ALARM         SEC BD ALM
     TTRC BOARD ALARM           TTRC ALM







.P
ACTIVE ACTION TABLE

The Active Action Table field describes which Action Table will be 
executed whenever the specified Trigger Conditions become true. If
the Action Table field is set to BLANK then no Action Table will be
executed. A current Action Table number or an Action Table number
that is one greater than the current number of existing Action Tables
may be entered (valid entries for this field are displayed in the
message window). If an Action Table number is entered that does not
exist and the Inactive Action Table is set to BLANK then the user will
get a prompt to create an empty Action Table or a duplicate Action
Table.  After the Action Table number is entered the user will be
taken to the Action Table screen to edit the Action Table. If an
Action Table number is entered that does not exist and the
.P
Inactive Action Table is not set to BLANK then the user will get a
prompt to create an empty Action Table, copy of the Inactive Action
Table or a duplicate Action Table. After the Action Table number is
entered the user will be taken to the Action Table screen to edit the
Action Table. When in the action table it is possible to toggle
between the alternate states Action Table (if it exists) by pressing
the F8 function key.

Note:  If an Active Action Table is entered it is recommended that an
       Inactive Action Table also be entered to cancel the actions
       executed by the Active Action Table.


.P
INACTIVE ACTION TABLE

The Inactive Action Table field describes which Action Table will be 
executed whenever the specified Trigger Conditions go away. If the
Action Table field is set to BLANK then no Action Table will be
executed. A current Action Table number or an Action Table number that
is one greater than the current number of existing Action Tables may
be entered (valid entries for this field are displayed in the message
window). If an Action Table number is entered that does not exist and
the Active Action Table is set to BLANK then the user will get a
prompt to create an empty Action Table or a duplicate Action Table.
After the Action Table number is entered the user will be taken to
the Action Table screen to edit the Action Table. If an Action Table
number is entered that does not exist and the Active Action Table
is not set to BLANK then the user will get a prompt to create an 
.P
empty Action Table, copy of the Active Action Table or a duplicate
Action Table.  After the Action Table number is entered the user
will be taken to the Action Table screen to edit the Action Table.
When in the action table it is possible to toggle between the alternate
states Action Table (if it exists) by pressing the F8 function key.

Note:  If an Active Action Table is entered it is recommended that an
       Inactive Action Table also be entered to cancel the actions
       executed by the Active Action Table.

.P
DTMF Input

This field specifies which input the SAM Binary Decoder will monitor. 
The choices are RECEIVER 1, RECEIVER 2, DIVERSITY, or LINE.  These 
may be selected by use of the UP/DOWN arrow keys.  

.P


 
Binary DOS Mute

This toggle field specifies whether or not the SAM board
will activate the Data Operated Squelch (DOS) MUXbit when
it detects the presence of a binary signalling word.
Use the UP/DOWN arrow keys to select between ENABLED/DISABLED.
.P
OPCODE  

The following fields may be entered by use of the Up/Down arrow keys: 
SETUP, KNOCKDOWN, PTT (Push-To-Talk) OR REPEAT ACC (Repeater Access). 
These fields are known as Opcodes and are sent as signalling packets.
 
REPEAT ACC - 
  Allows for detection of both Automatic and Manual Repeater Access. In
  an Automatic Repeater Access system the Repeater Access codeword is 
  sent on voice transmissions and other user initiated data transactions.
  The Repeater Access codeword is decoded by the repeater, and not 
  transmitted to the ultimate destination of the message.  In a Manual 
  Repeater Access system the user is willing to send the Repeater Access 
  codeword separately in exchange for a faster access time for subsequent 
.P
(REPEAT ACC continued)
  voice messages.  This "dialing up" of the repeater is usually accomplished
  by a separate "Repeater" button on the unit.  In both Automatic and Manual
  Repeater Access systems the repeater address can either be operator
  selectable or Mode slaved.

PTT  - 
  If a mobile keys up and sends a Push-To-Talk (PTT) opcode followed by the
  matching ID then the station will pass the transmission.
.P
SETUP -
  Clears the Repeater Knockdown bit (RPT KD) on the MUXbus if the matching
  repeater ID is also sent.  This enables the repeater operation of the
  station.

KNOCKDOWN -
  Sets the Repeater Knockdown bit  (RPT KD) on the MUXbus if the matching
  repeater ID is also sent.  This disables the repeater operation of the
  station.

ACK - Acknowledge Opcode.

MSG1..MSG4 -
  Miscellaneous opcodes with no current definitions. Added to allow for
  future expansion. (MDC codes 4701 through 4704)
.P
A Target may be cleared by deleting the entry in the Opcode field
or by deleting all of the entries for a Target. If there are any
blank Targets between Targets with data then the program will
remove the blank Targets.  It is not necessary to manually move
Targets up.

.P
ID

This field contains the ID of the Repeater that is to be accessed.
Every Repeater has its own unique four digit ID.  The ID is set
by the system designer or the customer.  The ID is usually the last
four digits of the serial number.
The valid range is 0000 - FFFF.
.P
ACTION TABLE

The Action Table field describes which SAM Action Table will be executed 
when the current Binary Decoder Opcode is decoded.  A current Action Table
number or an Action Table number that is one greater than the current number
of existing Action Tables may be entered (valid entries for this field are
displayed in the message window).  If an Action Table number is entered that
does not exist then the user will get a prompt to create an empty Action
Table or a duplicate Action Table.  After the Action Table number is
entered the user will be taken to the Action Table screen to edit the Action
Table. 

A limit of 30 Action Tables may be programmed with the RSS, with a total
of 20 Actions per Action Table.
.P
ACTION TABLE

This field displays the SAM Action Table number of the Table displayed on
the screen. If the Action Table Screen was entered through the SAM MENU, the
Up/Down Arrows may be used to toggle through all existing SAM Action Tables.

This screen may also be entered via the SAM Mode, SAM Action Table 
Conditions, or SAM Wildcard Inputs Screens. If entered through one of these
screens the ACTION TABLE field is NON-EDITABLE.

NOTE: SAM Action Tables cannot be added in this screen. Action Tables may
be added in the Action Table fields of the SAM Wildcard Input, SAM Mode,
of SAM Action Table Conditions Screens, by entering an Action Table number
that is 1 larger than the largest existing SAM Action Table.
.P
The F7-CLEAR TABLE key can only be used on the ACTION TABLE field.
This key will delete all of the actions in the current SAM Action
Table. Once a SAM Action Table has been created it is not possible
to delete the SAM Action Table.  

The F8-CHANGE STATE key is only valid if the SAM Action Table was entered
via the SAM Wildcard Input or SAM Action Table Conditions Screens. It allows 
a user to toggle between the Active Action Table and Inactive Action Table.

A limit of 30 Action Tables may be programmed with the RSS, with a total
of 20 Actions per Action Table.
.P
The following is a list of valid actions that may be entered
in the SAM Action Table. A brief explanation of each action
follows.  For more detailed information, enter the action
in the field, then press F1 for help.  

  CLEARMUX    MANIBIT     SELLOCMODE    TUNEEPOT
  CLRMUXQUAL  QUICKKEY    SELMODE       WAIT
  GENENSEQ    RESLOCMODE  SETMUX        WAITSET 
  GENID       SELCHAN     SETMUXMOM     WAITCLEAR
  GENIPCB     SELCHAN2    SETMUXQUAL

CLEARMUX - This action will clear a bit(s) on the MUXbus.

CLRMUXQUAL - Clear MUXbus qualifier. 
.P
GENENSEQ - Generate Encode Sequence.  

GENID  - Generate Station ID.
  These actions will generate a SAM Encode Sequence.  The difference 
  between the two,is if at the time when GENID has to be executed the 
  transmitter is already active (MUXbus signal TX_ACT) the reduced 
  modulation level will be used. 

GENIPCB - This action will generate an IPCB (Inter-Processor 
  Communications Bus) command.  IPCB commands are actions that allow
  access of off-board devices using the IPCB.      

MANIBIT - Change the state of any writeable bits at a user-defined 
  address on the SAM board. 
.P
QUICKKEY - This actions allows the next action in SAM Action Table to be 
  executed if data at user-defined MUXbus address matches the 
  Mask within the specified amount of time, otherwise the next 
  action in SAM Action Table is skipped. 

RESLOCMODE - Returns SAM board to previous station mode immediately.

SELCHAN - This action allows selection of the station channel on the
  MUXbus. IMPORTANT! The Local Channel Control field in the Advanced 
  Information screens MUST be set to EXTERNAL when SELCHAN is selected.  

SELCHAN2 - This action allows selection of the 2nd receiver channel on 
  the MUXbus. IMPORTANT! The Local Channel Control field in the Advanced
  Information screens MUST be set to EXTERNAL when SELCHAN2 is selected. 
.P
SELLOCMODE - This action allows selection of a Local SAM 
  Mode for a user-defined amount of time. 

SELMODE - This action allows selection of the station mode on the
  MUXbus. IMPORTANT! The Local Mode Control field in the Advanced
  Information screens MUST be set to EXTERNAL when SELMODE is selected..

SETMUX   - This action will set a bit(s) on the MUXbus. 

SETMUXMOM - This action will set a bit(s) on the MUXbus for a specified 
  amount of time.

SETMUXQUAL - Set MUXbus qualifier. 
.P
TUNEEPOT - This action will change the setting of the EEpot on the SAM 
  board by a user-defined amount.

WAIT - Hold execution of the following actions within the same SAM 
  Action Table for a user-defined amount of time.

WAITSET,WAITCLEAR - Allow SAM Action Table to continue if the data at
  a user-defined Address matches a Mask within a specified amount
  of time, otherwise the SAM Action Table will abort. If Waitset 
  then a 1 in the Mask indicates bit to be set at user-defined 
  Address for a match, if Waitclear then 1 indicates bit to 
  be clear at user-defined Address for a match.
.P
ENCODER SEQUENCES

This table contains the various Encode Sequences that may be 
generated. To clear an Encode Sequence simply clear the SCHEME field. 

SCHEME
This toggle field defines which signalling scheme will be used for the 
current encoder sequence.  Use the UP/DOWN arrow keys to select the
scheme.  The choices are:  

ZVEI    - ZVEI standard tone encoding scheme
ZVEIFR  - ZVEI french tone   encoding scheme
ZVEIMOD - ZVEI modified tone encoding scheme
CCIR    - CCIR standard tone encoding scheme
CCIRMOD - CCIR modified tone encoding scheme
.P
SCHEME Field continued:

EEA     - EEA tone encoding scheme
CUSTOM  - Customized tone encoding scheme
MDC1200 - MDC1200 binary encoder signalling scheme
DTMF    - DTMF encoding scheme  (if SAM version 2.xx or greater)
.P
PRETIME 

The Pretime field specifies the time the Tone or DTMF Encoder delays the 
generation of the Sequence after Push-To-Talk (PTT).  The range for this 
field is 10 - 2550 milliseconds.

.P
ENCODE/DECODE TABLE

This screen displays the encoder/decoder schemes.  The scheme choices are
highlighted via the Up/Dn arrow keys or Tab/Shift Tab keys.  Upon 
pressing the Enter key, editable and non-editable information will be
displayed for that scheme.  CUSTOM is the only scheme that is completely 
editable.  

If the SAM Version is 2.xx or greater, the screen will display DTMF as
an additional encoder/decoder scheme.
.P
TONE SEQUENCE
Tone frequencies and durations for each of these signalling schemes 
are specified in the SAM Encode/Decode screen.  Enter the tone 
numbers in the order they are to be encoded.  The valid range is 
0 - E. The number correpsonds to the frequencies on the SAM 
Encode/Decode screen. A maximum of seven tones may be entered 
to be encoded. i.e. 0 = tone#0, 1 = tone#1 ...
.P
DTMF SEQUENCE

DTMF Tone frequency pairs and time-out-times for each of these
signalling schemes are specified in the SAM Encode/Decode screen.  
Enter the tone numbers in the order they are to be encoded.  The 
valid characters are 0 - 9, A - D, *, and #.  The character 
correpsonds to the frequency pairs on the SAM Encode/Decode
screen. A maximum of ten characters may be entered in the SEQUENCE
field.
.P
BANDWIDTH

The valid range if 0 to 9.99 percent.  The value of this field is not 
stored in the codeplug.  It is the percent bandwidth allowed for the
the CUSTOM scheme.  The center frequencies are entered on the screen.
.P
TONE FREQUENCY

The valid range is 280 - 3300 Hz.  This is the center frequency for the
tone decoder.  These are only editable for the CUSTOM scheme.
.P
FIRST DUR

This field indicates the duration in milliseconds of the first tone
in a tone encoder sequence. The valid range is 10 to 21100 msecs.  

.P
FIRST TONE TOT

The valid range is 70 - 290 msec for ZVEI, ZVEIMOD, ZVEIFR, CCIR, EEA,
and CCIRMOD schemes, and 0 - 655350 for the CUSTOM scheme. Default for
CCIRMOD, ZVEI, ZVEIMOD and ZVEIFR is 120 msec.  Default for CCIR is 
170 msec. Default for EEA is 100 msec. This field defines the maximum
duration between detection of the first tone in a sequence and the 
detection of a second tone.     

.P
SUCCEEDING TONES TOT

The valid range is 0 - 655350 msec for CUSTOM and 70 - 290 msec for all
other schemes. Default for CCIRMOD, ZVEI, ZVEIMOD and ZVEIFR is 
120 msec.  Default for CCIR is 170 msec.  Default for EEA is 100 msec.
This field defines the maximum duration between detection of a tone 
(except first) in a sequence and the detection of the following
tone.  

This field is only editable if the CUSTOM scheme is displayed.

.P
REPEAT TONE

The valid range is 0 - E.  This field defines which tone is used for the
repeat tone.  

A Repeat Tone is a tone used when identical tones are to be encoded/
decoded that are immediately following each other.
Example: If tone sequence to be sent is 2115 and the Repeat Tone is
         tone #E then the sequence sent is 21E5.  

.P
GROUP TONE

This is the tone that is used by the Group Target field on the SAM Mode
Tables.  The target must be matched as defined on the SAM Mode Table for
a Group Action Table to be executed.  The valid range is 0 - E.
.P
First Tone Duration: (for tone encoder schemes)

This is the duration of the first tone in the Target field that is to 
be encoded. The valid range is 10 - 21100 msecs.
.P
DURATION

This field indicates the length in msec of all DTMF tones for the
particular scheme.  The default value for the DTMF DURATION field is 
50 msec with a range from 50 to 21100 msecs.

.P
DTMF Inter-Tone Gap

This field defines the duration of the pause between two DTMF tones.
The valid range is 50 - 21100 msec.  The default is 50 msec. 

.P
DTMF DECODER TOT

The DTMF Decoder TOT field defines the maximum amount of time that
the DTMF Decoder will wait from the detection of a DTMF tone and
the detection of the following tone in a sequence.The valid range 
is 10 - 655350 msec. The default is 3000 msec.

.P
SETMUX   - This action will set a bit(s) on the MUXbus. 
CLEARMUX - This action will clear a bit(s) on the MUXbus.

MUXAddr- Address of bit(s) on the MUXbus to set(Setmux) / clear
         (Clearmux).  Valid range is 0 - 15.
MUXData- Data to be stored at MUXAddr. The following is
         a table of bit(s) which are set (Setmux) or cleared 
         (Clearmux) for each possible MUXData value (0 - F).
         The bit(s) marked with an 'x' are the only bit(s) 
         affected.
.P
                   
                        MUXData
              0 1 2 3 4 5 6 7 8 9 A B C D E F
         ------------------------------------
         b0|    x   x   x   x   x   x   x   x
MUXbus   b1|      x x     x x     x x     x x
bits     b2|          x x x x         x x x x
         b3|                  x x x x x x x x

.P
SETMUXMOM
This action will set a bit(s) on the MUXbus for a specified
amount of time.

MUXADDR- Address of bit(s) on the MUXbus to set. Valid range
         is 0 - 15.
MUXDATA- Data  to be stored at MUXAddr for a user-defined 
         amount of time. Valid range is 0 - F.  
TIME   - The amount of time to set the bit(s) for. Valid 
         range is 10 - 655350 milli-seconds. 

         The following is a table of bit(s) which are set 
         for the specified amount of time for each MUXData
         value (0 - F). The 'x' indicates the only MUXbus 
         bit(s) at MUXAddr which are affected.
.P

                        MUXData
              0 1 2 3 4 5 6 7 8 9 A B C D E F
         ------------------------------------
         b0|    x   x   x   x   x   x   x   x
MUXbus   b1|      x x     x x     x x     x x
bits     b2|          x x x x         x x x x
         b3|                  x x x x x x x x


.P
SELCHAN - This action allows selection of the station 
          channel on the MUXbus.
SELCHAN2- This action allows selection the 2nd receiver
          channel on the MUXbus.

CHANNEL#- Channel or 2nd Receiver Channel to select.
          Valid range is 0 to highest station channel
          number.

.P
SELMODE 
This action allows selection of the station mode on the MUXbus.

SAM MODE# - Station mode to select. Valid range is 0 to highest 
            station mode.
.P
SELLOCMODE
This action allows selection of a Local SAM Mode for a user-
defined amount of time. 

LOCAL MODE - Local SAM Mode to select. Valid range is lowest 
             Local SAM Mode to highest Local SAM Mode.
TIME       - Amount of time the SAM board should stay in the 
             Local SAM Mode.  Valid range is 0 - 2550 milli-seconds.
             A value less than 10 will be interpreted as 0 msec.
             If the Time field is 0, there will be no time limit 
             for the SAM board to stay in Local SAM Mode.
.P
RESLOCMODE
Return SAM board to previous station mode immediately.
.P
MANIBIT
Change the state of any writeable bits at a user-defined address
on the SAM board. 

ADDRESS  - Address on the SAM board that contains bit to change. 
           Valid range is 0000 - FFFF.
TARG BIT - Bit at the Address to be ENABLED/DISABLED. Valid range is 
           0 - 7.
POLARITY - Indicates if the bit at the Address and Bit position is to
           be ENABLED or DISABLED.  This field may be changed by use
           of the Up/Down arrow keys.
.P
WAIT
Hold execution of the following actions within the same SAM Action Table
for a user-defined amount of time.

WAIT TIME - Amount of time to suspend execution of the following actions in
          the SAM Action Table.  Valid range is 10 - 2550 milli-seconds.

.P
WAITSET,WAITCLEAR  

Allow SAM Action Table to continue if the data at a user-defined Address
matches a Mask within a specified amount of time, otherwise the SAM Action
Table will abort. If Waitset then a 1 in the Mask indicates bit to be set
at user-defined Address for a match, if Waitclear then 1 indicates bit to 
be clear at user-defined Address for a match.

ADDRESS- Address on the SAM board that contains data to compare
         to the Mask. Valid range is 0000 - FFFF.
MASK   - Eight bit mask that must match data at Address. Example:  7F 
         means bits 0-6 must be set (Waitset) or clear (Waitclear) at
         Address location within the time allowed for the SAM Action 
         Table to  continue.
.P
WAITSET,WAITCLEAR (cont.)

TIME   - Time to wait for Mask to to match data at Address. Valid range
         is 0 - 655350 milli-seconds. Values less than 10 will be 
         interpreted as 0. If the Time field is 0, there will be no
         time limit to wait for Mask to match data at Address.
.P
SETMUXQUAL-Set MUXbus qualifier. 
CLRMUXQUAL-Clear MUXbus qualifier. 
These actions will  set(Setmuxqual) or clear(Clrmuxqual) a bit(s) on the 
MUXbus as long as the qualifier bit(s) match the qualifier mask and the 
timer has not expired.  Timer is reset if the qualifier bit(s) is set.  

MUXADDR- Address of the bit(s) on the MUXbus to set/clear.  Valid range
         is 0 - 15.
MUXDATA- Data to be stored at MUXAddr.  Valid range is 0 - F.
QUALADDR(Qualifier Address) - Address on the MUXbus for the bit(s) that 
         qualify the timing function. Valid range is 0 - 15.
QUALMASK(Qualifier Mask) - Mask of bit(s) at Qualaddr that qualify the 
         timing function.  Valid range is 0 - F.
TIME   - Duration of how long the bit(s) at MUXAddr will be set(Setmuxqual)
         / clear(Clrmuxqual) after qualifier bit(s) at Qualaddr is cleared. 
         Range is 10 - 655350 milli-seconds.  
.P
The table below indicates bit(s) which are set (Setmuxqual) or clear
(Clrmuxqual) for the MUXData field at the specified MUXAddr.
These bit(s) are only affected for the duration specified in the 
Time field.
                        MUXData
              0 1 2 3 4 5 6 7 8 9 A B C D E F
         ------------------------------------
         b0|    x   x   x   x   x   x   x   x
MUXbus   b1|      x x     x x     x x     x x
bits     b2|          x x x x         x x x x
         b3|                  x x x x x x x x

.P
TUNEEPOT
This action will change the setting of the EEpot on the SAM board by a 
user-defined amount.

STEP SIZE - The number of steps that the EEpot will be incremented
            or decrecmented.  Valid range is -99 to +99.


.P
QUICKKEY
This actions allows the next action in SAM Action Table to be executed if 
data at user-defined MUXbus address matches the Mask within the specified 
amount of time, otherwise the next action in SAM Action Table is skipped. 

MUXADDR- MUXbus address of data to compare to Mask.  Valid range is 0 - 15.
MASK   - Mask compared to data at MUXAddr. Valid range is 0 - F.
QUICK KEY TIME- Time to wait for data at MUXAddr to match the Mask. 
         Valid range is 10 - 655350 seconds.
.P
GENENSEQ-Generate Encode Sequence.  
GENID   -Generate Station ID.
These actions will generate a SAM Encode Sequence.  The difference between
the two,is if at the time when GENID has to be executed the transmitter is
already active (MUXbus signal TX_ACT) the reduced modulation level will be
used. 

ENC DEST(Encode Destination) - Defines the destination that the generated 
        SAM Encode Sequence should be sent to. Valid choices are LINE,
        TRANS(Transmitter) or TRANS+LINE(Transmitter and Line).
ENC SEQ#(Encode Sequence) - Defines which SAM Encode Sequence should be
        generated.  These sequences are defined on the SAM Encode Sequence
        screen.  Valid range is 1 - 10.

.P
GENIPCB
This action will generate an IPCB (Inter-Processor Communications Bus) 
command.  IPCB commands are actions that allow access of off-board devices
using the IPCB.      

DEVICE# - Board that the IPCB command will be sent to.  Valid choices:
          1 = SSCB  2 = TTRC  A = Secure  B = SAM

COMMAND - IPCB command to be sent to Device#.  Each command can have an 
          associated address, data or other subcommand parameters. The 
          following is a list of valid commands and the parameters that
          go with each command: 

.P
Definition of parameters for IPCB command:
  bbbb = beginning address eeee = ending address
  aaaa = Target address
  d    = one byte of data 
  p    = EEpot number
  s    = subcommand
NOTE: All letters are expressed in hexadecimal format (0-F).

Command                      Addr / Data
---------------------        -----------------------------
a = write address            aaaadd
A = read address             aaaa
i = change eepot value       ptt
I = read eepot value         d
(table cont.)
.P
Command                      Addr / Data
---------------------        -----------------------------
y = execute subcommand       see table below for valid 
                             subcommands.  
1 = reset host               no argument
T = test IPCB                dd
E = read string              bbbbeeee


.P
Subcommand Name                                   Argument Format
---------  ----                                   ---------------
0F         Set forward power trip point, SSCB     no argument
0R         Set reflected power trip point, SSCB   no argument
1          Set station config.                    d
2          Save Xmit deviation current channel    no argument 
7          Read system version and station type   no argument
30         EEprom programming ended, SSCB         no argument
31         EEprom programming started, SSCB       no argument
50         Wake up/begin diagnostics, SSCB        no argument
51         Enter background, SSCB                 no argument
52         Shut up/ don't begin diagnostics,SSCB  no argument
80         Disable test tone generation           no argument
           SAM and Secure       
.P
Subcommand Name                                   Argument Format
---------  ----                                   ---------------
81         Enable test tone generation            no argument
           SAM and Secure  
A0         Save system level, SSCB                no argument
A1         Adjust receive level, SSCB             no argument
C0         Clear PA - test mode                   no argument
C1         Set PA - test mode                     no argument
D          Display high-priority data, SSCB       ddd
E          Hold station for programming, SSCB     no argument
F          Save ALC/UN-ALC Tx-level EEpot         no argument
G          Read Tx coarse-level adjustment, TTRC  no argument
g          Set Tx coarse-level adjustment, TTRC   d
H0         Disable Failsoft, TTRC                 no argument
H1         Enable Failsoft, TTRC                  no argument 
.P
Subcommand Name                                   Argument Format
---------  ----                                   ---------------
I0         Disable Compandor and Flutter Fighter  no argument
I1         Disable Compandor,                     no argument
           Enable Flutter Fighter                            
I2         Enable Compandor,                      no argument
           Disable Flutter Fighter
I3         Enable Compandor and Flutter Fighter   no argument
J          Read firmware version number           no argument
K0         Disable MCS user priority              no argument
K1         Enable MCS user priority               no argument
S          Compute codeplug checksum, non-SAM     no argument
s          Compute & store codeplug checksum      no argument                            
.P
Example of IPCB Commands:
Device#    Command       Addr/Data
----------------------------------
1          E             16FF1703
This command reads four bytes of data at starting at location
16#16FF on the SSCB board and ending at location 16#1703 on the 
SSCB board.

02          y             G
This command will read the Tx coarse-level adjustment on the TTRC 
board.

B          y             s
This command will compute and store the SAM codeplug checksum.

.P
FOLLOWING DUR

This is the duration of the all tones except the first tone in the 
Target field that is to be encoded. This field is only editable 
when the tone encoder scheme is 'CUSTOM'.  The valid range is 
10 - 21100 seconds.


.P
ID (for binary encoder schemes)

This field contains the ID of the Repeater that is to be accessed.
Every Repeater has its own unique four digit ID. The ID is set
by the system designer or the customer.  The ID is usually the
last four digits of the serial number.
The valid range is 0000 - FFFF.   


.P
DTMF DECODER TARGETS

This field defines the sequence of DTMF tones that must be matched to execute
the action table.  Each DTMF tone in the sequence is specified by the
characters on a standard telephone keypad, plus the letters `A' through
`D'.  Each Target is allowed a maximum of ten DTMF tones. Wildcards are 
allowed and are indicated by an 'X'.  The SAM DTMF Decoder will interpret 
an 'X' as a match for any tone number.  For example, the sequences '12345' 
and '12045' will both match the Target '12X45'.  

Note: The order of the Targets in the list is important to the SAM'S DTMF 
      Decoder and will be adjusted automatically by the field programmer.
      i.e. Longer Targets must be listed before shorter Targets.
.P
DTMF DECODER

This field allows the DTMF Decoder to be toggled between DISABLED
and ENABLED by use of the Up/Down arrow keys. 

If the field is toggled to DISABLED then all of the Targets and
the DTMF Input field are cleared and are no longer editable.

If the field is toggled to ENABLED then the DTMF signalling 
scheme will be used for decoding in the current mode.  When the
SAM's DTMF decoder has decoded a message, it will compare
this message against a list of DTMF strings, which are
called `Targets'.  If a match is found, the SAM board will execute a
sequence of actions specified by the matching Targets corresponding
SAM Action Table number.
.P

 
SERVICE AND ALIGNMENT

The SERVICE AND ALIGNMENT section allows the user to align the Base
Station's EEPOTs or to add a Secure Board or SAM Board to the 
Station.

F3 - The Individual Station Adjustment function prompts the user
     with a list of possible station adjustments.  The user
     selects the adjustment by using the Tab/ShiftTab or Up/Down
     arrow keys to place the cursor on the adjustment he wishes
     to perform.  Then, to make the adjustment the user must
     press the ENTER key.  The user will only be allowed to
     access adjustments existing on the station being serviced. 
.P
SERVICE AND ALIGNMENT (cont)

F4  - The SAM Upgrade screen allows a user to 
      upgrade a station with a SAM board.  This screen
      prompts the user to set up their system before the
      upgrade.  When ready, the F3 key can be hit to begin
      the upgrade.  When done, the screen will display 
      Installation Complete!
F5  - The Secure Transparent Upgrade screen allows a user to 
      upgrade a station to a secure station.  This screen
      prompts the user to set up their system before the
      upgrade.  When ready, the F3 key can be hit to begin
      the upgrade.  When done, the screen will display 
      Installation Complete!
.P
SERVICE AND ALIGNMENT (cont)

F6  - The Change Password screen is used to change a current
      password in a password protected station. This screen
      is also used to change forgotten passwords.
F7  - The Alarm screen displays the status of all alarms.  
F8  - The MUXbus Diagnostics screen displays the current status
      of the MUXbus and current channel number. It also allows
      the user to set and clear MUXbus bits and change channel. 
F9  - Used to change current password on a password protected 
      station.
F10 - Returns to the previous menu.
.P
INDIVIDUAL STATION ADJUSTMENTS

In this section the user is given a list of possible station
adjustments.  Current station settings are displayed to the
right of each EEPOT adjustment. The user selects the adjustment 
he wishes to perform by using the Tab/ShiftTab or Up/Down Arrow
keys to move the cursor onto the adjustment, then presses the 
ENTER key to make the adjustment.  The list of possible 
adjustments and their availability based on station model/options
is shown below. The number to the left of each adjustment 
corresponds to the EEPOT number displayed when adjusting the 
station through the front panel. EEPOTS #0 through #6 are 
physically located on the SSCB board; #7 through #D on the
TTRC board; #F on the SAM (Station Access Module) board.
.P
ADJUSTMENT                              USAGE
----------                              -----
#0 DECRYPTED RX LEVEL                   Stations w/Option C794 or
                                        C797
#1 FLUTTER FIGHTER LEVEL                896 MHz Stations ONLY
#2 REPEATER SQUELCH LEVEL               All Repeater Stations
#3 RECEIVER SQUELCH LEVEL               All Stations
#4 MAX DEVIATION LEVEL                  All Stations
#5 RX LEVEL                             All Stations
#6 CODED DEVIATION LEVEL                Stations w/Option C514
#7 TX LINE LEVEL                        Stations Equipped w/TTRC
#8 STATUS TONE LEVEL                    Stations w/Option C269
#9 HIGH END EQUALIZATION LEVEL          Stations w/Option C269
#A LOW END EQUALIZATION LEVEL           Stations w/Option C269
.P
ADJUSTMENT                              USAGE
----------                              -----
#B TRUNKING DATA DEVIATION LEVEL        Trunking Stations Only
#C LINE 2 OUTPUT LEVEL                  Stations Equipped w/TTRC
#D LINE 4 OUTPUT LEVEL                  Stations Equipped w/TTRC
#F SAM ENCODER LEVEL                    Stations Equipped w/SAM
FORWARD POWER ALARM SET                 
REFLECTED POWER ALARM SET


.P
#B TRUNKING DATA DEVIATION LEVEL

Note: The deviations settings given are for 25 kHz channel spaced
      systems.  Deviation settings for 12.5 kHz channel spaced 
      systems are given in brackets "{ }".   

To properly set the Trunking Data Deviation Level EEPOT the following 
equipment is required: Audio Generator and
                       Communication Systems or Modulation Analyzer
The adjustment is made as follows:
     1. Connect the station to an operational trunking central controller.
        Insure that the station is not the voice channel.
     2. Key the station by using the <F7> key of the Field Programmer
        (sets the LOC PTT MUXbus bit).
.P
     3. Adjust the EEPOT by using the Up/Down Arrows to yield 0.85 {0.425}
        kHz deviation.
     4. Dekey the station by using <F2> key of the Field Programmer.

The function keys are defined as follows:

F1 - Provides HELP associated with the particular adjustment
     being performed.

F2 - Dekeys the station, if the station was keyed via the field
     programmer.

F3 - Sets EEPOT to the minimum value.  The relative value will be
     set to zero.
.P
F4 - Saves the current EEPOT setting.  This becomes the new orginal
     value.

F5 - Dumps the information on the screen to a printer connected
     to your computer.

F6 - Restores the EEPOT setting to its original value.  The
     original value is defined as the value upon entering the
     adjustment routine or the last saved value.

F7 - Keys the station by issuing a LOC PTT.

F8 - Returns the user to the preceding adjustment as shown in the
     Individual Adjustments Screen.
.P
F9 - Advances the user to the next adjustment as shown in the
     Individual Adjustments Screen.

F10 - EXITs the adjustment screen and returns the user to the
      Individual Adjustment Screen.
.P
#4 MAX DEVIATION

Note: The deviations settings given are for 25 kHz channel spaced
      systems.  Deviation settings for 12.5 kHz channel spaced 
      systems are given in brackets "{ }".  

To properly set the Max Deviation EEPOT the following
equipment is required:  
  Communications Systems Analyzer or Modulation Analyzer
  Audio Generator

The Adjustment is made as follows:
     1. Input a 1Vrms 1.0 kHz tone at MIC AUDIO (J812-3) input on the
        front panel Control jack or via TP8 on the SSCB. 
.P
     2. Select channel 1.
     3. Key Station by using the <F7> key of the Field Programmer.
     4. Set to 4.6 {2.3} kHz deviation (w/PL).
     5. Dekey the station by using the <F2> key of the Field Programmer.

Note:   If the station has multiple channels (excluding the tuning channel),
        repeat the above procedure for each channel.

The function keys are defined as follows:

F1 - Provides HELP associated with the particular adjustment
     being performed.

F2 - Dekeys the station, if the station was keyed via the field
     programmer.
.P
F3 - Sets EEPOT to the minimum value.  The relative value will be
     set to zero.

F4 - Saves the current EEPOT setting.  This becomes the new orginal
     value.

F5 - Dumps the information on the screen to a printer connected
     to your computer.

F6 - Restores the EEPOT setting to its original value.  The
     original value is defined as the value upon entering the
     adjustment routine or the last saved value.

F7 - Keys the station by issuing a LOC PTT and ACC DIS.
.P
F8 - Returns the user to the preceding adjustment as shown in the
     Individual Adjustments Screen.

F9 - Advances the user to the next adjustment as shown in the
     Individual Adjustments Screen.

F10 - EXITs the adjustment screen and returns the user to the
      Individual Adjustment Screen.
.P
#7 TX LINE LEVEL

Note: The deviations settings given are for 25 kHz channel spaced
      systems.  Deviation settings for 12.5 kHz channel spaced 
      systems are given in brackets "{ }".   

To properly set the Tx Line Level EEPOT the following equipment
is required:  
  Communications Systems Analyzer or Modulation Analyzer
  Audio Generator

The adjustment is made as follows:
     1. Input a 1 kHz tone at the desired level(typically 0 dBm to
        -10 dBm) into the station transmit wireline interface(Line 1,
        4 wire, or Line 2, 2 wire). 
.P
     2. Key the station by using the <F7> key of the Field Programmer.
        This will set the LIN PTT and TX PL DIS MUXbus bits.  If this 
        is a trunking station, create a Trunking PTT by disconnecting 
        the station from the central controller.
     3. Adjust the Tx Line Level EEPOT by using the Up/Down arrows to
        yield 3 {1.5} kHz deviation.  If option C101 or trunking 
        without options C514 or C115 exist in the station then it may
        necessary to adjust the Tx Coarse Level EEPOT.  The Coarse
        Level EEPOT is toggled thru different ranges by pressing the
        ALT-F1 key.  The ranges are 0 (gain of -10 dB), 1 (gain of 0
        dB), 2 (gain of 10 dB) and 3 (gain of 20 dB).  If adjusting
        the Tx Line Level EEPOT causes the deviation to exceed the 
        threshold value it is necessary to decrease the gain of the
        Coarse Level EEPOT. 
.P
     4. Dekey the station by using the <F2> key of the Field
        Programmer.
     5. When option C115, Console Priority, is included inject the 
        1 kHz tone into Line 3.  Leave and re-enter, adjust for
        3 {1.5} kHz deviation using the Coarse Level EEPOT adjustment
        if necessary (adjustment described in step 3 above).
     6. Reconnect the station to the central controller if 
        disconnected.

The function keys are defined as follows:

F1 - Provides HELP associated with the particular adjustment
     being performed.
.P
F2 - Dekeys the station, if the station was keyed via the field
     programmer.

F3 - Sets EEPOT to the minimum value.  The relative value will be
     set to zero.

F4 - Saves the current EEPOT setting.  This becomes the new orginal
     value.

F5 - Dumps the information on the screen to a printer connected
     to your computer.

F6 - Restores the EEPOT setting to its original value.  The
     original value is defined as the value upon entering the
     adjustment routine or the last saved value.
.P
F7 - Keys the station by issuing a LIN PTT and TX PL DIS.

F8 - Returns the user to the preceding adjustment as shown in the
     Individual Adjustments Screen.

F9 - Advances the user to the next adjustment as shown in the
     Individual Adjustments Screen.

F10 - EXITs the adjustment screen and returns the user to the
      Individual Adjustment Screen.
.P
#5 RX LEVEL

Note: The deviations settings given are for 25 kHz channel spaced
      systems.  Deviation settings for 12.5 kHz channel spaced 
      systems are given in brackets "{ }".   

To properly set the Rx Level EEPOT the following equipment is
required: 
  RF Signal Generator 
  AC Millivolt Meter

The adjustment is made as follows:
     1. Inject an on-channel 1 mV RF carrier modulated with a
        1 kHz tone at 2 {1} kHz deviation into the receiver.  
.P
     2. Set the PL DIS switch for PL stations.
     3. Adjust the Pot by using Up/Down Arrows so that:
        For a station without an antenna relay or for a trunking
        station with option C269, the voltage test point 1 is 400 mV.
        Otherwise, adjust the EEPOT for 3 {1.5} kHz deviation with RPT PTT
        for in-cabinet repeat stations.

The function keys are defined as follows:

F1 - Provides HELP associated with the particular adjustment
     being performed.

F2 - Dekeys the station, if the station was keyed via the field
     programmer.
.P
F3 - Sets EEPOT to the minimum value.  The relative value will be
     set to zero.

F4 - Saves the current EEPOT setting.  This becomes the new orginal
     value.

F5 - Dumps the information on the screen to a printer connected
     to your computer.

F6 - Restores the EEPOT setting to its original value.  The
     original value is defined as the value upon entering the
     adjustment routine or the last saved value.

F7 - Keys the station by issuing a LOC PTT.
.P
F8 - Returns the user to the preceding adjustment as shown in the
     Individual Adjustments Screen.

F9 - Advances the user to the next adjustment as shown in the
     Individual Adjustments Screen.

F10 - EXITs the adjustment screen and returns the user to the
      Individual Adjustment Screen.
.P
#C LINE 2 LEVEL

Note: The deviations settings given are for 25 kHz channel spaced
      systems.  Deviation settings for 12.5 kHz channel spaced 
      systems are given in brackets "{ }".  

To properly set the Line 2 Level EEPOT the following equipment
is required: RF Signal Generator
             AC Millivolt Meter

NOTE: If this is a Spectra Tac/DigiTAC system, use the procedure
      outlined in that section.



.P
The adjustment is made as follows:
     1. Inject an on-channel 1 mV RF carrier modulated with a
        1 kHz tone at 3 {1.5} kHz deviation into the receiver.
     2. Set the PL disable switch.
     3. Adjust the Pot by using the Up/Down Arrows for desired
        level (typically 0 dBm to -10 dBm) on line 2.  Measure 
        levels with 600 ohms across line 2.  If the station is
        equipped with option C514 and not options C388, C793, 
        C794 or C797 then the status tone level should be set up
        using steps 14 and 15 of the Spectra-Tac/DigiTAC Adjust-
        ment section.




.P
The function keys are defined as follows:

F1 - Provides HELP associated with the particular adjustment
     being performed.

F2 - Dekeys the station, if the station was keyed via the field
     programmer.

F3 - Sets EEPOT to the minimum value.  The relative value will be
     set to zero.

F4 - Saves the current EEPOT setting.  This becomes the new orginal
     value.


.P
LINE 2 LEVEL(cont.)

F5 - Dumps the information on the screen to a printer connected
     to your computer.

F6 - Restores the EEPOT setting to its original value.  The
     original value is defined as the value upon entering the
     adjustment routine or the last saved value.

F7 - Keys the station by issuing a LOC PTT.

F8 - Returns the user to the preceding adjustment as shown in the
     Individual Adjustments Screen.


.P
LINE 2 LEVEL(cont.)

F9 - Advances the user to the next adjustment as shown in the
     Individual Adjustments Screen.

F10 - EXITs the adjustment screen and returns the user to the
      Individual Adjustment Screen.








.P
SPECTRA-TAC/DIGITAC ADJUSTMENTS

#9 High End Equalization Level
#A Low End Equalization Level
#8 Status Tone Level

Note: The deviations settings given are for 25 kHz channel spaced
      systems.  Deviation settings for 12.5 kHz channel spaced 
      systems are given in brackets "{ }". 

Note: If the station is not equipped with Spectra-Tac, option C269,
      but is equipped with option C514 and not options C388, C793,
      C794, C795 or C797 then skip steps 1 - 13.

Note: Rx Level must be set before this adjustment is made.
.P
The following  equipment is  required:
  RF Signal Generator
  Audio Generator
  AC Millivolt Meter.

The adjustments are made as follows:
  1. Set the Spectra-Tac/DigiTAC Encode Level EEPOT to zero.
  2. Using an Audio Generator, input a 100 mV 1000 Hz signal into
     the Local Mic input(TP8) on the Station Control Board.  
  3. Set the Front Panel Intercom switch to on and activate the
     Loc PTT MUXbus bit by using the <F7> key of the field 
     programmer.



.P
  4. Use the Up/Down Arrow keys to set the Line 2 Level EEPOT, so
     that the station line 2 output is - 10 dBm.  Record the level
     at the SQM input.
  5. Adjust the input frequency at the Station Control Board to
     3 kHz.
  6. Use the Up/Down Arrow keys to set the Spectra-Tac/DigiTAC
     High End Adjust EEPOT to yield the same level at the SQM
     input as was recorded in step 4.
  7. Adjust the input frequency at the Station Control Board to
     3 kHz.
  8. Adjust the input frequency at the Station Control Board to
     400 Hz.
  9. Use the Up/Down Arrow keys to set the Spectra-Tac/DigiTAC
     Low End Adjust EEPOT to yield the same level at the SQM
     input as was recorded in step 4.
.P
  10.Remove the audio generator from the Station Control Board.
     Set the Front Panel Intercom switch to off and clear the 
     Loc PTT by using the <F2> key of the field programmer.
  11.Set the PL DISABLE Switch.
  12.Inject an on-channel 1 mV RF carrier modulated with a 1 kHz 
     tone at 5 {2.5} kHz deviation into the receiver (use 3 {1.5} 
     kHz deviation for trunked stations).
  13.Using the Up/Down Arrow Keys, adjust the Line 2 Level EEPOT
     for desired level (typically 0 dBm to -10dBm) at the station
     Line 2 output.  Record the at the SQM input. 
  14.Disconnect the RF input into the receiver and set the PL 
     Disable switch to its center (off) position.
  15.Using the Up/Down arrow keys, adjust the Spectra-Tac/
     DigiTAC Encode Level EEPOT until the level at the SQM input
     is 13 dB below the level recorded in step 13.
.P
The function keys are defined as follows:

F1 - Provides HELP associated with the particular adjustment
     being performed.

F2 - Dekeys the station, if the station was keyed via the field
     programmer.

F3 - Sets EEPOT to the minimum value.  The relative value will be
     set to zero.

F4 - Saves the current EEPOT setting.  This becomes the new orginal
     value.


.P
F5 - Dumps the information on the screen to a printer connected
     to your computer.

F6 - Restores the EEPOT setting to its original value.  The
     original value is defined as the value upon entering the
     adjustment routine or the last saved value.

F7 - Keys the station by issuing a LOC PTT.

F8 - Returns the user to the preceding adjustment as shown in the
     Individual Adjustments Screen.




.P
F9 - Advances the user to the next adjustment as shown in the
     Individual Adjustments Screen.

F10 - EXITs the adjustment screen and returns the user to the
      Individual Adjustment Screen.




.P
#D LINE 4 LEVEL

Note: The deviations settings given are for 25 kHz channel spaced
      systems.  Deviation settings for 12.5 kHz channel spaced 
      systems are given in brackets "{ }". 

To properly set the Line 4 Level EEPOT the following equipment
is required: 
  RF Signal Generator
  AC Millivolt Meter





.P
The adjustment is made as follows:
     1. Inject an on-channel 1 mV RF carrier modulated with a
        1 kHz tone at 3 {1.5} kHz deviation into the receiver.
     2. Set PL disable switch.
     3. Adjust the EEPOT by using the Up/Down Arrow keys to yield
        desired level (typically 0 to -10 dBm) on Line 4.  Measure
        levels with 600 ohms across Line 4.








.P
The function keys are defined as follows:

F1 - Provides HELP associated with the particular adjustment
     being performed.

F2 - Dekeys the station, if the station was keyed via the field
     programmer.

F3 - Sets EEPOT to the minimum value.  The relative value will be
     set to zero.

F4 - Saves the current EEPOT setting.  This becomes the new orginal
     value.


.P
F5 - Dumps the information on the screen to a printer connected
     to your computer.

F6 - Restores the EEPOT setting to its original value.  The
     original value is defined as the value upon entering the
     adjustment routine or the last saved value.

F7 - Keys the station by issuing a LOC PTT.

F8 - Returns the user to the preceding adjustment as shown in the
     Individual Adjustments Screen.




.P
F9 - Advances the user to the next adjustment as shown in the
     Individual Adjustments Screen.

F10 - EXITs the adjustment screen and returns the user to the
      Individual Adjustment Screen.







.P
#3 RECEIVER SQUELCH LEVEL

To properly set the Receiver Squelch Level EEPOT the following
equipment is required:
   RF Signal Generator.

The adjustment is made as follows:
     1. Inject an on-channel RF signal at the desired RF level
        into the receiver.
     2. Adjust the EEPOT by using the Up/Down Arrow keys until the
        receiver squelches (R1 UN SQ bit on DMP goes off).
.P
The function keys are defined as follows:

F1 - Provides HELP associated with the particular adjustment
     being performed.

F2 - Dekeys the station, if the station was keyed via the field
     programmer.

F3 - Sets EEPOT to the minimum value.  The relative value will be
     set to zero.

F4 - Saves the current EEPOT setting.  This becomes the new orginal
     value.
.P
F5 - Dumps the information on the screen to a printer connected
     to your computer.

F6 - Restores the EEPOT setting to its original value.  The
     original value is defined as the value upon entering the
     adjustment routine or the last saved value.

F7 - Keys the station by issuing a LOC PTT.

F8 - Returns the user to the preceding adjustment.

F9 - Advances the user to the next adjustment.

F10 - EXITs the adjustment screen and returns the user to the
      Individual Adjustment Screen.
.P
#2 REPEATER SQUELCH LEVEL

To properly set the Repeater Squelch Level EEPOT the following
equipment is required: 
  RF Signal Generator.

The adjustment is made as follows:
     1. Inject an on-channel RF signal at the desired RF level
        into the receiver.
     2. Adjust the Pot by using the Up/Down Arrows until the
        repeater squelches(RPT USQ bit on DMP goes off).
.P
The function keys are defined as follows:

F1 - Provides HELP associated with the particular adjustment
     being performed.

F2 - Dekeys the station, if the station was keyed via the field
     programmer.

F3 - Sets EEPOT to the minimum value.  The relative value will be
     set to zero.

F4 - Save the current EEPOT setting. This becomes the new orginal value.

F5 - Dumps the information on the screen to a printer.
.P
F6 - Restores the EEPOT setting to its original value.  The
     original value is defined as the value upon entering the
     adjustment routine or the last saved value.

F7 - Keys the station by issuing a LOC PTT.

F8 - Returns the user to the preceding adjustment as shown in the
     Individual Adjustments Screen.

F9 - Advances the user to the next adjustment as shown in the
     Individual Adjustments Screen.

F10 - EXITs the adjustment screen and returns the user to the
      Individual Adjustment Screen.
.P
#6 CODED DEVIATION LEVEL

Note: The deviations settings given are for 25 kHz channel spaced
      systems.  Deviation settings for 12.5 kHz channel spaced 
      systems are given in brackets "{ }".   

To properly set the Coded Deviation Level EEPOT the following 
equipment is required: 
  Communications Systems or Modulation Analyzer

The adjustment is made as follows:
  1. The Secure Board will automatically generate a 1 kHz test tone.
     Pressing ALT-F1 allows this tone to be generated at any time.
  2. Key the station using the F7 function key(sets TX CD DT bit).
.P
  3. Adjust the EEPOT by using the Up/Down Arrow keys to yield
     3.9 {1.95} kHz deviation. (Make sure the Analyzer is set for wide
     (>15 kHz) for this measurement).
  4. Dekey the station using the F2 function key.
  5. The 1 kHz tone is automatically turned off upon exiting this 
     screen. ALT-F2 allows this tone to be turned off at any time.

The function keys are defined as follows:

F1 - Provides HELP associated with the particular adjustment 
     being performed.

F2 - Dekeys the station, if the station was keyed via the field 
     programmer.
.P
F3 - Sets EEPOT to the minimum value.  The relative value will be 
     set to zero.

F4 - Saves the current EEPOT setting.  This becomes the new orginal 
     value.

F5 - Dumps the information on the screen to a printer connected 
     to your computer.

F6 - Restores the EEPOT setting to its original value.  The 
     original value is defined as the value upon entering the 
     adjustment routine or the last saved value.

F7 - Keys the station by issuing a TX CD DT.
.P
F8 - Returns the user to the preceding adjustment as shown in the 
     Individual Adjustments Screen.

F9 - Advances the user to the next adjustment as shown in the 
     Individual Adjustments Screen.

F10 - EXITs the adjustment screen and returns the user to the 
      Individual Adjustment Screen.

ALT-F1 - Turns on 1 kHz Test Tone.

ALT-F2 - Turns off 1 kHz Test Tone.
.P
DECRYPTED RX LEVEL

Note: The deviations settings given are for 25 kHz channel spaced
      systems.  Deviation settings for 12.5 kHz channel spaced 
      systems are given in brackets "{ }".   

To properly set the Decrypted Rx Level EEPOT the following 
equipment is required: 
  RF Signal Generator
  DVP Test Set
  AC Millivolt Meter

The adjustment is made as follows:
     1. Set the PL DISABLE switch.

.P
     2. Connect the coded output of a DVP test set to the modulation
        input of the RF Signal Generator.  The test set and the
        station must be programmed to the same code.
     3. Inject an on-channel 1 mV RF carrier modulated with an
        encoded (scrambled) 1 kHz tone at 4 {2} kHz deviation.
     4. Adjust the EEPOT by using the Up/Down Arrow keys to yield 
        desired clear level + 3 dB on line 2.  Measure levels with
        600 ohms across line 2. 







.P
The function keys are defined as follows:

F1 - Provides HELP associated with the particular adjustment 
     being performed.

F2 - Dekeys the station, if the station was keyed via the field 
     programmer.

F3 - Sets EEPOT to the minimum value.  The relative value will be 
     set to zero.

F4 - Saves the current EEPOT setting.  This becomes the new orginal 
     value.


.P
F5 - Dumps the information on the screen to a printer connected 
     to your computer.

F6 - Restores the EEPOT setting to its original value.  The 
     original value is defined as the value upon entering the 
     adjustment routine or the last saved value.

F7 - Keys the station by issuing a LOC PTT.

F8 - Returns the user to the preceding adjustment as shown in the 
     Individual Adjustments Screen.




.P
F9 - Advances the user to the next adjustment as shown in the 
     Individual Adjustments Screen.

F10 - EXITs the adjustment screen and returns the user to the 
      Individual Adjustment Screen.









.P
#1 FLUTTER FIGHTER LEVEL

Note: The Flutter Fighter Level EEPOT should only be adjusted 
      in Analog Plus stations.

To properly set the Flutter Fighter Level EEPOT the following 
equipment is required:  
  Communications Systems Analyzer or Modulation Analyzer

The Adjustment is made as follows:
     1. Inject an on-channel 1 mV RF carrier modulated with a  
        1 kHz tone at 1.5 kHz deviation into the receiver.
     2. Set the PL DIS switch for PL stations.
     3. Press ALT-F1.  This will disable the compandor circuit.
     4. Press F7 to Key the station using RPT PTT.
.P
     5. Adjust the Pot by using the Up/Down Arrows to yield 1.5
        kHz deviation.
     6. Press F2 to dekey the station.
     7. Press ALT-F2 to re-enable the compandor circuit.










.P
The function keys are defined as follows:

F1 - Provides HELP associated with the particular adjustment 
     being performed.

F2 - Dekeys the station, if the station was keyed via the field 
     programmer.

F3 - Sets EEPOT to the minimum value.  The relative value will be 
     set to zero.

F4 - Saves the current EEPOT setting.  This becomes the new orginal 
     value.


.P
F5 - Dumps the information on the screen to a printer connected 
     to your computer.

F6 - Restores the EEPOT setting to its original value.  The 
     original value is defined as the value upon entering the 
     adjustment routine or the last saved value.

F7 - Keys the station by issuing a RPT PTT.

F8 - Returns the user to the preceding adjustment as shown in the 
     Individual Adjustments Screen.




.P
F9 - Advances the user to the next adjustment as shown in the 
     Individual Adjustments Screen.

F10 - EXITs the adjustment screen and returns the user to the 
      Individual Adjustment Screen. 









.P
#F SAM ENCODER LEVEL

Note: The deviations settings given are for 25 kHz channel spaced
      systems.  Deviation settings for 12.5 kHz channel spaced 
      systems are given in brackets "{ }". 

To properly set the SAM Encoder Level EEPOT the following 
equipment is required: 
  Communications Systems or Modulation Analyzer

The adjustment is made as follows:
  1. A 1.2 kHz tone is automatically generated by the SAM board
     upon entering this screen.  Pressing ALT-F1 allows this tone
     to be generated at any time.
  2. Key the station using the F7 function key(sets DAT PTT).
.P
  3. Adjust the Pot by using the Up/Down Arrows to yield
     3.9 {1.95} kHz deviation. (Make sure the Analyzer is set for wide
     (>15 kHz) for this measurement).
  4. Dekey the station using the F2 function key.
  5. The 1.2 kHz tone is automatically turned off upon exiting this 
     screen. ALT-F2 allows this tone to be turned off at any time.









.P
The function keys are defined as follows:

F1 - Provides HELP associated with the particular adjustment 
     being performed.

F2 - Dekeys the station, if the station was keyed via the field 
     programmer.

F3 - Sets EEPOT to the minimum value.  The relative value will be 
     set to zero.

F4 - Saves the current EEPOT setting.  This becomes the new orginal 
     value.


.P
F5 - Dumps the information on the screen to a printer connected 
     to your computer.

F6 - Restores the EEPOT setting to its original value.  The 
     original value is defined as the value upon entering the 
     adjustment routine or the last saved value.

F7 - Keys the station by issuing a DAT PTT.

F8 - Returns the user to the preceding adjustment as shown in the 
     Individual Adjustments Screen.




.P
F9 - Advances the user to the next adjustment as shown in the 
     Individual Adjustments Screen.

F10 - EXITs the adjustment screen and returns the user to the 
      Individual Adjustment Screen.

ALT-F1 - Turns on 1.2 kHz Test Tone.

ALT-F2 - Turns off 1.2 kHz Test Tone.






.P
FORWARD POWER ALARM SET

To properly set the FORWARD POWER ALARM SET EEPot the following
equipment is required: Wattmeter.
The adjustment is made as follows:
     1. Key the station by pressing the F7 key(LOC PTT).
     2. Adjust the station output power, using Pot R426 on the
        Uniboard, to your desired trip point level.
     3. Press the F4 key to set the alarm trip point.
     4. Reset Forward Power Output to the Rated Power of the station.
     5. Dekey the station by pressing the F2 key.
.P
FORWARD POWER ALARM SET(cont.)

The function keys are defined as follows:

F1 - Provides HELP associated with the particular adjustment
     being performed.

F2 - Dekeys the station, if the station was keyed via the field
     programmer.

F4 - Save current EEPOT setting. This becomes the new orginal value.

F5 - Dumps the information on the screen to a printer connected
     to your computer.
.P
FORWARD POWER ALARM SET(cont.)
F7 - Keys the station by issuing a LOC PTT.

F8 - Returns the user to the preceding adjustment.

F9 - Advances the user to the next adjustment.

F10 - EXITs the adjustment screen and returns the user to the
      Individual Adjustment Screen.
.P
REFLECTED POWER ALARM SET

To properly set the REFLECTED POWER ALARM SET EEPot the following
equipment is required: Wattmeter.
The adjustment is made as follows:
     1. Key the station by pressing the F7 key(LOC PTT).
     2. Adjust the station output power, using Pot R426 on the
        Uniboard, to your desired trip point level.
     3. Press the F4 key to set the alarm trip point.
     4. Reset Forward Power Output to the Rated Power of the station.
     5. Dekey the station by pressing the F2 key.
.P
REFLECTED POWER ALARM SET(cont.)

The function keys are defined as follows:

F1 - Provides HELP associated with the particular adjustment
     being performed.

F2 - Dekeys the station, if the station was keyed via the field
     programmer.

F4 - Save current EEPOT setting.  This becomes the new orginal value.

F5 - Dumps the information on the screen to a printer.

F7 - Keys the station by issuing a LOC PTT.
.P
REFLECTED POWER ALARM SET(cont.)

F8 - Returns the user to the preceding adjustment as shown in the
     Individual Adjustments Screen.

F9 - Advances the user to the next adjustment as shown in the
     Individual Adjustments Screen.

F10 - EXITs the adjustment screen and returns the user to the
      Individual Adjustment Screen.
.P
ALARM SCREEN

This screen contains all 23 alarms.  An asterisk to the left of
the alarm name indicates that the alarm output has been enabled for the
particular system setup.  The setup can be viewed and changed from the
SAM Wildcard Outputs screen on the SAM Menu.  There are four basic
setups:  EXP_DATA, DATA, DIAGNOSTICS or WILDCARD.  The word ALARM to the
left of the alarm name indicates that the alarm is active.  The status
of all alarms is displayed in real time, provided the station is properly
connected.  The F8 key will reset all control boards in the station.
.P
SETTING/CLEARING BITS ON THE MUXBUS

To set bits on the MUXbus, use Up/Down/Right/Left Arrow, Tab, BackTab
and Enter keys to move the cursor to the desired bit name and press F3.
The bit name should become highlighted, indicating that the bit is indeed
set. If not, there may be a problem with the station or the interface.

If the cursor is moved to the desired bit name and the bit has already
been set by this program, pressing F3 will request the station to clear
this bit.

Note: Any MUXbus bits set by something other than this program cannot
      be cleared via this screen.
.P
The function keys are defined as follows:

F1 - Displays help text.
F2 - Enables user to change display update interval.
F3 - Causes the MUXbus bit at the current cursor position to change states.
F4 - Requests station to clear all MUXbus bits that were set by this program.
F5 - Print current screen.
F8 - Causes the station to be reset.
F10 - Exit the DMP screen. 

Brief definitions of each of the 16 MUXbus bits located at bit 0 of addresses
0 thru 15 are located on the following help pages.
.P
S ALM DS (Selective Alarm Disable) - Mutes repetitive alarm tones generated
 in response to active RWC bits on addresses 12 and 13.
INTCOM (Intercom) - Allows LOC PTT without keying the station, which enables
 a serviceman at the station to communciate with the console site via the
 wirelines.
RX1 ACT (Rx 1 Activity) - Indicates that Receiver 1 has met the qualifiers 
 set for it on the current mode.
R1 UN SQ (Rx 1 Unsquelch) - Active when the Receiver 1 audio carrier
 squelch circuit on the SSCB detects on-channel rf activity.
R2 UN SQ (Receiver 2 Unsquelch) - Active when the Receiver 2 audio carrier 
 squelch circuit detect on-channel rf activity.
RPT USQ (Repeater Unsquelch) - Receiver 1 repeater carrrier squelch circuit,
 located on the SSCB, detects activity.
.P
ENCRYPT (Digital Voice Encryption) - When active, enables the encryption
 function of the optional Encrypt/Decrypt Secure module (voice is 
 transmitted coded). When inactive voice is transmitted clear.
BAUD (IPCB Baud Rate) - Indicates that the IPCB serial baud rate is not
 the default speed (1200 baud). When active, the alternate speed is 300.
TX RX C8, TX RX C4, TX RX C2, TX RX C1 (Transmitter/Receiver 1 Channel) -
 These four bits are used to control the channel of the transmitter and
 Receiver 1. 
AUX C8, AUX C4, AUX C2, AUX C1 (Auxiliary Channel) - Four overflow bits
 used for indicating channel, mode, or  receiver 2 channel.
RX2 C8, RX2 C4, RX2 C2, RX2 C1 (Second Receiver Channel) - These four
 bits are used to control the channel of Receiver 2.
DOS (Data Operated Squelch) - In MCS stations, this bit is used to 
 indicate the second most significant bit of the active MCS user number.
.P
RW1 BAT (Battery Revert) - Indicates that the AC main to the station has
 been lost and that the station is operating on battery power.
RW5 TSTAT - Indicates a TSTAT (Transmitter Status) failure.
FW 1 - (Forward Wild Card 1) - Indicates that a forward wildcard is active. 
 These bits are usually driven by the TTRC module, in response to a TRC
 command from a console.
MODE 8 - MODE 1 (Station Mode) - These four bits are used to control
 the mode of the station.  



.P
SETTING/CLEARING BITS ON THE MUXBUS

To set bits on the MUXbus, use Up/Down/Right/Left Arrow, Tab, BackTab
and Enter keys to move the cursor to the desired bit name and press F3.
The bit name should become highlighted, indicating that the bit is indeed
set. If not, there may be a problem with the station or the interface.

If the cursor is moved to the desired bit name and the bit has already
been set by this program, pressing F3 will request the station to clear
this bit.

Note: Any MUXbus bits set by something other than this program cannot
      be cleared via this screen.
.P
The function keys are defined as follows:

F1 - Displays help text.
F2 - Enables user to change display update interval.
F3 - Causes the MUXbus bit at the current cursor position to change states.
F4 - Requests station to clear all MUXbus bits that were set by this program.
F5 - Print current screen.
F8 - Causes the station to be reset.
F10 - Exit the DMP screen. 

Brief definitions of each of the 16 MUXbus bits located at bit 1 of addresses
0 thru 15 are located on the following help pages.
.P
T ALM DS (Total Alarm Disable) - Unconditionally mutes all alarm tones 
 generated in response to active reverse wildcard bits on addresses 12 & 13.
LOC PTT (Local PTT)- Keys transmitter, modulating with Local Audio if no
 higher priority PTT is active.
RX2 ACT (Rx 2 Activity) - Indicates that the second receiver audio has met
 the qualifiers set for it on the current mode.
RX CD DT (Rx 1 Code Detect) - Indicates a Receiver Code Detect due to receipt
 of Secure data on Reciever 1.
R2 CD DT (Receiver 2 Code Detect) - Indicates a Receiver Code Detect due
 to receipt of Secure data on Receiver 2.
RPT KD (Repeater Knock-Down) - Disallows a Repeater PTT when active.
TX CD DT (Transmit Code Detect) - Indicates Wireline Code Detect is active
 due to receipt of Secure (12 Kbit) data on the wireline.
SP3, SP2, SP1 (Special Purpose 3 - 1)-Bits Reserved for future applications.
.P
TX RX C8, TX RX C4, TX RX C2, TX RX C1 (Transmitter/Receiver 1 Channel) -
 These four bits are used to control the channel of the transmitter and
 Receiver 1. 
AUX C8, AUX C4, AUX C2, AUX C1 (Auxiliary Channel) - Four overflow bits
 used for indicating channel, mode, or  receiver 2 channel.
RX2 C8, RX2 C4, RX2 C2, RX2 C1 (Second Receiver Channel) - These four
 bits are used to control the channel of Receiver 2.
RW2 PA (PA FAIL) - This bit is the rf power amplifier fail internal 
 station alarm parameter, activated by the SSCB. 
RW6 REFL - Indicates that Reflected Power is too high.
FW 2 - (Forward Wild Card 2) - Indicates that a forward wildcard is active. 
 These bits are usually driven by the TTRC module, in response to a TRC
 command from a console.
MODE 8 - MODE 1 (Station Mode) - These four bits are used to control
 the mode of the station.  
.P
SETTING/CLEARING BITS ON THE MUXBUS

To set bits on the MUXbus, use Up/Down/Right/Left Arrow, Tab, BackTab
and Enter keys to move the cursor to the desired bit name and press F3.
The bit name should become highlighted, indicating that the bit is indeed
set. If not, there may be a problem with the station or the interface.

If the cursor is moved to the desired bit name and the bit has already
been set by this program, pressing F3 will request the station to clear
this bit.

Note: Any MUXbus bits set by something other than this program cannot
      be cleared via this screen.
.P
The function keys are defined as follows:

F1 - Displays help text.
F2 - Enables user to change display update interval.
F3 - Causes the MUXbus bit at the current cursor position to change states.
F4 - Requests station to clear all MUXbus bits that were set by this program.
F5 - Print current screen.
F8 - Causes the station to be reset.
F10 - Exit the DMP screen. 

Brief definitions of each of the 16 MUXbus bits located at bit 2 of addresses
0 thru 15 are located on the following help pages.
.P
SCAN (SCAN ENABLE) - Indicates that the station is in Scanning Receiver mode.
LIN PTT (Line PTT) - Keys transmitter, modulating with TX Audio if no higher
 priority PTT is active.
TX ACT (Transmitter Activity) - Indicates that the transmitter is on.
R1 PL DT (Rx 1 PL/DPL Detect) - Active when PL, DPL, or CT coded 
 squelch is being detected on Receiver 1.
R2 PL DT (Receiver 2 PL/DPL Detect) - Active when PL, DPL, or CT coded 
 squelch is being detected on Receiver 2.
AUX DET (Auxiliary Detect) - An optional decoder is detecting on Receiver 1.
EX DA DT (External Data Detect) - When active, the SSCB mutes Tx, Local, 
 RX1 (Repeater), and MRTI audio from the transmitter unless specifically
 enabled for the current mode.
SP3, SP2, SP1 (Special Purpose 3 - 1)-Bits Reserved for future applications.
.P
TX RX C8, TX RX C4, TX RX C2, TX RX C1 (Transmitter/Receiver 1 Channel) -
 These four bits are used to control the channel of the transmitter and
 Receiver 1. 
AUX C8, AUX C4, AUX C2, AUX C1 (Auxiliary Channel) - Four overflow bits
 used for indicating channel, mode, or  receiver 2 channel.
RX2 C8, RX2 C4, RX2 C2, RX2 C1 (Second Receiver Channel) - These four
 bits are used to control the channel of Receiver 2.
RX INHB (Receiver 1 Inhibit) - Indicates that the receiver audio is
 inhibited from reaching the wireline.
RW3 SYN (Synthesizer Unlock)-Transmitter or receiver synthesizer unlocked.
RW7 FWRD - Indicates that Forward Power is too low.
FW 3 - (Forward Wild Card 3) - Indicates that a forward wildcard is active. 
 These bits are usually driven by the TTRC module, in response to a TRC
 command from a console.
.P
MODE 8 - MODE 1 (Station Mode) - These four bits are used to control
 the mode of the station.  









.P
SETTING/CLEARING BITS ON THE MUXBUS

To set bits on the MUXbus, use Up/Down/Right/Left Arrow, Tab, BackTab
and Enter keys to move the cursor to the desired bit name and press F3.
The bit name should become highlighted, indicating that the bit is indeed
set. If not, there may be a problem with the station or the interface.

If the cursor is moved to the desired bit name and the bit has already
been set by this program, pressing F3 will request the station to clear
this bit.

Note: Any MUXbus bits set by something other than this program cannot
      be cleared via this screen.
.P
The function keys are defined as follows:

F1 - Displays help text.
F2 - Enables user to change display update interval.
F3 - Causes the MUXbus bit at the current cursor position to change states.
F4 - Requests station to clear all MUXbus bits that were set by this program.
F5 - Print current screen.
F8 - Causes the station to be reset.
F10 - Exit the DMP screen. 

Brief definitions of each of the 16 MUXbus bits located at bit 3 of addresses
0 thru 15 are located on the following help pages.
.P
DAT PTT (Data Push-to-Talk) - Indicates if a Data PTT request is active.
RPT PTT (Repeater PTT) - A Repeater PTT or Trunking PTT is active.
TX PL DS (Tx PL/DPL Disable)-Disables PL, DPL, or Trunking Data from
 being added onto the transmitted signal.
RX PL DS (Rx PL/DPL Disable) - Indicates that the station has reverted 
 to carrier squelch only receiver operation for purposes of determining
 the status of RX1 ACT and RX2 ACT.
R2 MUTE (Receiver 2 Mute) - Causes the second receiver audio to be muted
 or attenuated.
GD TN DT (Guard Tone Detect) - High Level Guard Tone is being detected.
ACC DIS (Access Disable) - Station is in the Access Disable mode.
SP3, SP2, SP1 (Special Purpose 3 - 1)-Bits Reserved for future applications.
TX RX C8, TX RX C4, TX RX C2, TX RX C1 (Transmitter/Receiver 1 Channel) -
 These four bits are used to control the channel of the transmitter and
 Receiver 1. 
.P
AUX C8, AUX C4, AUX C2, AUX C1 (Auxiliary Channel) - Four overflow bits
 used for indicating channel, mode, or  receiver 2 channel.
RX2 C8, RX2 C4, RX2 C2, RX2 C1 (Second Receiver Channel) - These four
 bits are used to control the channel of Receiver 2.
TX INHB (Transmit Inhibit) - Indicates that the transmitter is inhibited.
RW4 OVG (Reverse Wild Card 4 - Battery Overvoltage) - Indicates that the
 battery overvoltage internal station alarm is active.
RW8 (Reverse Wildcard 8 - Main Standby) - Indicates that a problem
 exists with the main / standby system.
FW 4 - (Forward Wild Card 4) - Indicates that a forward wildcard is active. 
 These bits are usually driven by the TTRC module, in response to a TRC
 command from a console.
MODE 8 - MODE 1 (Station Mode) - These four bits are used to control
 the mode of the station.  
.P
SELECT CHANNEL

To change the channel of the station, move cursor into the channel
number field. Enter the new channel and move cursor to the next field
by pressing Enter, Tab, BackTab or any of the other cursor keys. If
a new channel number was entered, the program prompts the user that
the channel is about to be changed and asks for confirmation. Pressing
F2 confirms this and the station changes channels. Otherwise, nothing
is changed.



.P
CHANGE MUXBUS DISPLAY UPDATE INTERVAL

The MUXbus Display screen periodically requests the station to tell it its
current MUXbus status. To modify the time interval at which this is done
enter the new interval and press Enter. The range is 5 - 299 seconds.
The default value is every 60 seconds.

The function keys are defined as follows:

F1 - Displays help text.

F8 - Save the value to the configuration file and return to the DMP screen.

F10 - Exit and return to the DMP screen.

.P
PASSWORD

The password must be at least 4, but no more than 8 characters in length.
The set of valid keys for the password are:  0-9, a-z, A-Z and the
characters on the numeric keys (i.e. a shift 5 is % which is a valid 
character).  The password does not appear on the screen.  The password 
protection may be may be disabled via the Model Options screen, provided
the user knows the current password.

.P
CHANGING FORGOTTEN PASSWORD

To change a forgotten password, the user must have access to the front
panel of the station while executing the RSS. Enter any characters when
prompted for the CURRENT PASSWORD. Enter the NEW PASSWORD. Type the
NEW PASSWORD again--before pressing the <Enter> key, hold the SELECT/SET
switch, located on the far right side of the front panel of the station,
in the SELECT position. Press the <Enter> key. A message should appear
on the screen stating that the password has been successfully changed. 

.P

 
SETUP                                

The SETUP functions are used to configure your Radio Service 
Software to your particular application and computer environment. 

Function Key Descriptions:

F3 - PC CONFIGURATION is used to select the Asynchronous 
     Communications Port (COM 1,COM 2,COM 3,COM 4) to be used for 
     Programming purposes.

     Please refer to your computer owner's manual for a complete 
     description of path names and Asynchronous Communication Ports.
.P
SETUP (cont)           


F4 - ARCHIVE DIRECTORY CONFIGURATION is used to set up default directories
     for the archive files, help file and data file.  

F7 - SCREEN COLORS is used to enable the Color display option. 

F10 - Exit to Main Menu
.P
The SERIAL PORT CONFIGURATION screen contains editable fields for both
the Station Port and the Modem Port.  There may be from 1-4 (COM1 - COM4)
Serial Ports on a PC.  The Serial Port is used to transmit data back and
forth to the station or it can be used to connect a modem to the PC. The 
Station Port is the Serial Port that the RIB is connect to.  The Modem 
Port is the Serial Port that the modem is connected to.  The Station Port
contains the following fields: Serial Port and Baud Rate.  The Modem Port
contains the following fields: Serial Port, Modem Speaker Status, Modem
Speaker Volume, Wait For Dialtone/Carrier, Pause Between Calls and Number
Of Redials.  It is possible for both the Station Port and the Modem Port 
to be set to the same Serial Port, i.e. an external modem is connected to 
the serial port and the station is also connected to the same Serial Port.
The <BACKTAB> key is used to move the cursor to the previous field.  The 
<ENTER> and <TAB> keys are used to advance the cursor to the next field.
.P
If the Serial Port field is not set correctly, you will get a "Station
Does Not Respond" error message when trying to communicate with the 
station.

Definition Of Function Keys:

F1 - Provide HELP associated with the Serial Port Configuration screen.
F2 - Change the active Serial Port to the Station Port. Any data trans-
     mitted by the RSS will be sent to the station.
F3 - Change the active Serial Port to the Modem Port.  Any data trans-
     mitted by the RSS will be sent to the modem.  This function key is 
     only valid if the modem is `On-Line'.
F5 - Print the current page.
F8 - Save the current Serial Port Configuration to the `MSF.cfg' file.
F10 -Exit the Serial Port Configuration screen.
.P
SERIAL PORT:

The Serial Port field indicates which Serial Port on the PC that the
station is connected to.  The four choices COM1, COM2, COM3 and COM4
are selected by use of the Up/Dn arrow keys.  The default is COM1.

.P
BAUD RATE:

The Baud Rate field is the rate of transmission between the station and
the computer.  Baud Rate is expressed in bits-per-second (bps).  The 
five choices 0300, 1200, 2400,4800 and 9600 are selected by use of the
Up/Dn arrow keys.  The default is 1200 bps.
.P
SERIAL PORT:

The Serial Port field indicates which Serial Port on the PC that the
modem is connected to.  The four choices COM1, COM2, COM3 and COM4
are selected by use of the Up/Dn arrow keys.  The default is COM1.
.P
MODEM SPEAKER STATUS:

The Modem Speaker Status field indicates when the modem speaker is 
active.  The four choices ALWAYS OFF, ALWAYS ON, CARRIER (the speaker
is ON until a carrier is detected) and DIAL/CARR (the speaker is ON 
after dialing until a carrier is detected) are selected by use of the
Up/Dn arrow keys.  The default is CARRIER.
.P
MODEM SPEAKER VOLUME:

The Modem Speaker Volume field indicates the range of the modem's 
speaker.  The three choices LOW, MEDIUM and HIGH are selected by use
of the Up/Dn arrow keys.  The default is MEDIUM. 

.P
WAIT FOR DIALTONE/CARRIER:

The Wait For Dialtone/Carrier field instructs the modem how long to 
wait for dial tone after issuing the dial command and also how long
to wait for a connection after dialing the number.  If no dial tone
is detected or connection is not established then the modem will hang
up.  The valid range for this field is 1 to 255 seconds.  The default
is 30 seconds.
.P
PAUSE BETWEEN CALLS:

The Pause Between Calls field indicates how long the RSS will pause 
before dialing redialing the same number if no connection was made
in the previous attempt.  The valid range for this field is 1 to 30 
seconds.  The default is 30 seconds.
.P
NUMBER OF REDIALS:

The Number Of Redials field indicates how many times the modem should
attempt to redial a number until a connection is established.  The 
valid range for this field is 1 to 10.  The default is 3.
.P
BREAK DURATION:

The length of time to send a BREAK signal when the ALT-b key sequence
is pressed in the MODEM TERMINAL MODE Screen (ALT-F5 in MODEM SCREEN).
The default for this duration is 350 milliseconds.
.P
CONFIGURE COMPUTER SCREEN                 

SCREEN COLORS is used to select the type of display monitor that you are 
using with your computer, i.e. MONOCHROME or COLOR.  

For proper color operation, you must have a color monitor and the 
appropriate color display interface card installed in your computer.  Please 
refer to your computer owner's manual and/or your computer dealer if you 
have questions regarding the color capability of your computer.

You may also further customize your screen by selecting colors for the 
screen TEXT, STATUS LINE, MESSAGE LINE, TEXT HIGHLIGHT, BACKGROUND, and 
SCREEN OUTLINE.
.P
CONFIGURE COMPUTER SCREEN(cont)

Function Key Descriptions:

F8 - SAVE is used to save the configuration information to a file on your 
     program disk.  Every time you use the Radio Service Software, the 
     configuration that you SAVED last will be used.  At anytime the 
     configuration may be changed and SAVED.

F9 - RESET DEFAULT is used to reset the parameters on this screen to a 
     default value.  However, RESET DEFAULT does NOT save the 
     configuration.  If the default values are desired, you must save them 
     via the SAVE (F8) function.
.P
CONFIGURE COMPUTER SCREEN(cont)

MONITOR TYPE (Default = Mono)                                        
Use the UP/DOWN arrow keys to select a MONOCHROME or COLOR display monitor.

TEXT (Default = Yellow)                                            
Use the UP/DOWN arrow keys to select the desired color for screen TEXT.  

STATUS LINE (Default = White)
Use the UP/DOWN arrow keys to select the desired color for the STATUS LINE 
located in the lower portion of the top right-side window.

MESSAGE LINE (Default = White)                                
Use the UP/DOWN arrow keys to select the desired color for the MESSAGE LINE 
located in the upper portion of the top right-side window.       
.P
CONFIGURE COMPUTER SCREEN(cont)

HIGHLIGHT (Default = White)                                      
Use the UP/DOWN arrow keys to select the desired color for the HIGHLIGHTED 
screen text.

BACKGROUND (Default = Blue)                                      
Use the UP/DOWN arrow keys to select the desired color for the screen 
BACKGROUND.

SCREEN OUTLINE (Default = Lt Red)                         
Use the UP/DOWN arrow keys to select the desired color of the screen 
OUTLINE.  
.P
DIRECTORY CONFIGURATION SCREEN

ARCHIVE FILE DIRECTORY - This is the directory on the pc which contains
the codeplug files.  If an invalid drive or pathname is entered the 
program will prompt for a valid drive and pathname.        

HELP FILE DIRECTORY - This is the directory on the pc which contains
the help file.  If an invalid drive or pathname is entered the program 
will prompt for a valid drive and pathname.

ENGLISH.DAT FILE DIRECTORY - This is the directory on the pc which 
contains the textual data file.  This file is loaded in at the 
beginning of the program and contains messages that the program uses 
during runtime.  If an invalid drive or pathname is entered the program 
will prompt for a valid drive and pathname.  
.P
DIRECTORY CONFIGURATION SCREEN(cont.)

SP FILE DIRECTORY - This is the directory on the PC which contains
SP (Special Product) update files.  If an invalid drive or pathname is 
entered the program will prompt for a valid drive and pathname.

Function Key Descriptions:
F8 - SAVE is used to save the directory configuration information 
to a file (MSF.CFG) on your program disk.  Every time you use the
Radio Service Software, the configuration that you SAVED last will
be used.  At anytime the configuration may be changed and SAVED.

Note: If during runtime the files for the pathnames that have been 
specified cannot be found then the program will also search the
directory from which the msf.exe program was started.
.P
***********************WARNING**********************************
This screen should only be edited by advanced users as inserting
the wrong data into the codeplug can dangerously affect the 
station operation and affect the field programmer.  

A 2-digit value must be entered.  The valid range is 00 - FF.
<ENTER> takes user to next line
<TAB> takes user to next byte in same line
<SHIFT TAB> takes user to previous byte in same line


.P
 
STATION INFORMATION MENU                               

The Station Information Menu is the level of the program from 
which you select the type of station information that you wish to 
edit.  All selections are made via the "Function Keys", labeled 
F1 thru F10 on your keyboard. 
                                                                         
After making a selection, you will be directed to routines that 
will edit the type of data you selected.
.P
STATION INFORMATION MENU (cont)

Function Key Descriptions:

F1 - Specific help is available for each field on all data 
     entry screens.  Keyboard help is available within any HELP 
     screen by pressing F2.

F2 - Menu that Contains Tone Remote Control Table and DC Remote 
     Control Table.
   
F3 - Mode Information section allows the user to edit 
     all Mode Type data.
.P
STATION INFORMATION MENU(cont)

F4 - Channel Information section allows the user to 
     edit all Channel Type data.

F5 - Scan Receiver section allows the user to edit channel
     frequencies and scanning information.

F6 - Advanced Information allows the user to edit 
     information that does not fall into the Channel, 
     Mode or Remote Control categories.
                            
F7 - SAM Menu allows the user to program information for the
     Station Access Module.
.P
STATION INFORMATION MENU(cont)

F8 - Station Model/Options displays station operations
     and allows the user to edit Frequency Range,
     Repeater Operation,Spectra TAC Operation,and
     Full Duplex Operation.

F9 - MCS Information screen. This option may be enabled
     via Station/Model Options screen.  

F10 - Select EXIT to return to MAIN MENU.



.P
FLOATING PRIORITY

The valid toggle choices are OFF, RX, TX or RX & TX.  RX sets the
priority channel to the most recently active receive channel.  TX
sets the priority channel to the most recently active transmit
channel.  Selecting RX & TX allows the priority channel to be
assigned to the most recent transmit or receive channel.  If the 
Floating Priority field does not contain OFF then the Priority
Channel field will be set to FLOAT and become non-editable.  The
Floating Priority field cannot be set to a choice other than OFF
unless two or more channels are enabled for scan.  The default for
Floating Priority is OFF.
.P
PRIORITY CHANNEL

The Priority Channel field indicates which channel has priority. 
The only valid numbers for this field are those channels on which
scan is enabled.  The Priority Channel is scanned between all non-
priority channels.  The Priority Channel is also scanned during
periods of non-priority channel activity.  If a non-priority 
channel is active with a coded signal and the XL Decryption 
Operation is enabled on the Station Model Options Screen, then the
priority channel is not scanned until the current channel activity
stops.  The default for the Priority Channel field is OFF.
.P
TRC CONSOLE FEEDBACK

At this time, TRC Console Feedback is a non-editable field.  The
default value is DISABLED.
.P
CHANNEL MARKING

The valid toggle choices are OFF, NORM, PRIORITY or N & P.  This
feature allows the station to ignore scan channels that have
activity but not the correct coded squelch qualifier.  This speeds
up the scan by not waiting the full RX Qualify Time (shown on the
Advanced Information Screen) for a coded squelch detect if the 
channel has already been marked.  Selecting NORM will only enable
non-priority channel marking.  Selecting PRIORITY will only enable
priority channel marking.  Selecting N & P will enable both.  The
mark is removed as soon as the channel loses a carrier detect or
when another scan channel becomes active and the scan stops.  The
mark on the priority channel can only be removed by loss of activity
on the priority channel.  The default for Channel Marking is OFF.
.P
TX FREQ/RX FREQ

This screen shows a composite listing of all channel frequencies.
.P
AUDIO

The valid toggle choices are R1 or R2.  This field indicates which
RF tray's receiver audio is used for each channel.  This field may only
be toggled if the Model Options Screen has a valid frequency selection
for the R2 tray. The value selected for the Audio field will also 
appear on the channel screen as a non-editable field.
.P
SCAN

The valid toggle choices are ENABLED or DISABLED.  This field 
indicates whether or not each channel should be included in the
scan.  There must be at least two channels enabled in order to 
assure proper scan operation.  
.P
TX SLAVE

The valid toggle choices are ENABLED or DISABLED.  When the scan
stops on a channel with TX Slave enabled, the transmitter channel
number is immediately changed to the scan channel.  If TX Slave 
is disabled on any given channel, the station uses the previously
active transmit frequency or the previously selected transmit
channel frequency from the console.  If disabled, the transmit and
receive frequencies are no longer slaved to the same station 
channel.  The default for the TX Slave field is DISABLED.  
.P
CHANGE/VIEW COMMAND DATA MENU               

The Change/View Command Data Menu is the level of the program from 
which you select the Tone or DC Commands to edit.  All selections
are made via the "Function Keys", labeled F1 thru F10 on your keyboard. 
After making a selection, you will be directed to routines that 
will edit the type of data you selected.

F1  - HELP
F2  - Tone Remote Control Table allows the user to edit tone
      remote control commands.
F5  - DC Remote Control Table allows user to edit the 
      DC remote commands AND the RESET commands.
F10 - Exit to CHANGE/VIEW CODEPLUG DATA MENU.
.P
SCANNING REPEATER

At the time of the release of this RSS (January 1993), there were
plans to add the ability of the station to repeat while scanning.
Currently, this field has no affect on station operation. The 
current released version of SSCB firmware (R5.45, part number 
5191012H75)  DOES NOT repeat while scanning. 

.P
Once the Scanning Repeater option is added to the SSCB firmware
(no approximate release date at this point), this field will work
as follows:

The SCANNING REPEATER field can only be ENABLED if the station is
configured as a REPEATER (REPEATER OPERATION field in STATION/MODEL
OPTIONS Screen is set to ENABLED). If ENABLED, the station will 
keyup during SCAN when a received signal on one of the scan enabled
channels is detected. If DISABLED, the station will scan as normal,
but will not key.
.P
 
